The Project Gutenberg eBook of Farmhouse Plans

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Farmhouse Plans

Author: Wallace Ashby

Release date: May 25, 2019 [eBook #59599]

Language: English

Credits: Produced by Tom Cosmas compiled from images made available

by The Internet Archive.

*** START OF THE PROJECT GUTENBERG EBOOK FARMHOUSE PLANS ***

U. S. DEPARTMENT OF

AGRICULTURE

FARMERS' BULLETIN No. 1738

FARMHOUSE PLANS

T HE FARMHOUSE PLANS presented in this bulletin were developed in connection with the Farm Housing Survey made in the spring of 1934 by the United States Department of Agriculture and the agricultural colleges of 46 States, with funds provided by the Civil Works Administration. These plans were selected from more than 100 prepared under the cooperation of the following agencies and persons:

United States Department of Agriculture: Bureau of Agricultural Engineering, S. H. McCrory, Chief; Bureau of Home Economics, Louise Stanley, Chief, and Director of the Rural Housing Survey.

Alabama Polytechnic Institute: J. B. Wilson, extension engineer, department of agricultural engineering.

University of Arkansas: Deane G. Carter, head, department of agricultural engineering.

University of California: H. B. Walker, head, division of agricultural engineering.

University of Georgia: R. H. Driftmier, professor of agricultural engineering.

University of Illinois: E. W. Lehmann, head, and W. A. Foster, assistant chief in rural architecture, department of agricultural engineering.

Purdue University (Indiana): William Aitkenhead, head, department of agricultural engineering.

Iowa State College: Henry Giese, professor, department of agricultural engineering.

Kansas State Agricultural College: H. E. Wichers, rural architect, department of architecture.

Massachusetts Agricultural College: C. I. Gunness, head, department of agricultural engineering.

University of Minnesota: H. B. White, assistant professor, division of agricultural engineering.

University of Missouri: J. C. Wooley, chairman, department of agricultural engineering.

Ohio State University: R. C. Miller, professor, department of agricultural engineering.

Agricultural and Mechanical College of Texas: D. Scoates, head, department of agricultural engineering.

Virginia Polytechnic Institute: C. E. Seitz, head, department of agricultural engineering.

State College of Washington: L. J. Smith, head, department of agricultural engineering.

University of Wisconsin: S. A. Witzel, extension instructor, department of agricultural engineering.

At each of the cooperating institutions, home economics specialists were consulted by the designers in regard to the arrangement of the kitchen and other parts of the home.

Working drawings for building the houses shown in this bulletin are available from the extension services of the State agricultural colleges. In most cases a small charge is made for the drawings.

Washington, D.C. October, 1934

FARMHOUSE PLANS

By WALLACE ASHBY, Chief, Division of Structures,

Bureau of Agricultural Engineering[1]

[1] Acknowledgment is made of the extended collaboration of Louise Stanley, Chief. Bureau of Home Economics, in selecting and reviewing the plans presented herein; and of the helpful assistance of W. H. Nash, architect, Bureau of Agricultural Engineering, in the preparation of both the manuscript and illustrations for publication. Mary Rokahr, senior home-management specialist, Extension Service, and Eloise Davidson, director of domestic electric service program, Electric Home and Farm Authority, made valuable suggestions regarding arrangement of kitchens and other equipment. Helpful comments and suggestions have been received from many other persons. Many of the perspective sketches illustrating the house plans shown in this bulletin were drawn by C. W. Mead, Bureau of Agricultural Engineering,

CONTENTS

Page

Farmhouse requirements

1

Size

1

Comfort and convenience

2

Relation to other buildings and highway

3

Appearance

4

Safety

4

Construction materials

4

Costs

5

Cellars

5

Superstructures and porches

5

Estimating by unit costs

6

Working drawings

7

Caution regarding changes

7

Plans for houses

7

One-story growing houses

7

Moderate-sized one-story houses

34

Houses of more than one story

45

Very small houses

60

T HE PRINCIPAL PURPOSE of this bulletin is to supply plans A for low-cost farm dwellings designed to meet the requirements of the farm operator and his family. Some of the plans may be useful in eases where, in addition to the main dwelling, smaller homes are needed for relatives, tenants, or unmarried farm hands. Still others will be found useful in the construction of low-cost houses for temporary use.

A well-built farmhouse should last for 60 years or more. In the ordinary course of events at least two generations of children will be brought up in it. During these years the family operating the farm probably will have no other choice of dwelling. The builder should, therefore, think both of present needs and possible future requirements when selecting a plan for a new farmhouse.

FARMHOUSE REQUIREMENTS

SIZE

The first requirement of a satisfactory farmhouse is adequate size to provide needed working area, storage space, and living and sleeping quarters. For the average family at least three sleeping rooms are needed,[2] one for the parents, one for the boys, and one for the girls.

[2] Sometimes the living room must serve as one of the sleeping rooms.

All the space may not be needed at the time the house is built, but the chances are that it will be needed before many years. On the other hand, many families find that after the children have grown up and left home it is not necessary to use the entire house. For this reason it is desirable to have it arranged so that part of the rooms may be closed off or may be rented to tourists.

COMFORT AND CONVENIENCE

Adequate, well-used space for both the family and the furniture is a large factor in farmhouse comfort. The proper number, size, and placement of windows, doors, and stairs, and good construction are important. These matters have been carefully worked out in the plans shown in this bulletin. Comfort also depends to a large extent on good heating, plumbing, lighting, and screening. Information on some of these subjects is given in Farmers' Bulletin 1698, Heating the Farm Home; 1448, Farmstead Water Supply; 1426, Farm Plumbing; 1227, Sewage and Sewerage of Farm Homes; Department Circular 405, The Domestic Oil Burner; and in U.S. Department of Commerce bulletin, Insulation on the Farm, price 10 cents.

The convenient arrangement of the farmhouse begins with its relationship to the other farm buildings and to the highway. Unlike the city house, the farmhouse has its main line of communication through the back or side door. Therefore outside doors and porches should be located so as to give convenient entrance from the farm driveway and the path to the barn, and wherever possible should be on the sheltered side of the house.

If possible, there should be a convenient place near the rear entrance for men to leave their outer wraps and to wash before going into the house. These facilities are often provided in a washroom or in one corner of the workroom, but if there is no washroom or workroom in the house, there should at least be clothes hooks and a bench and washbasin for summer use on the back porch.

It is also desirable that the work portions of the house, where the housewife spends much of her time, look out over the farm buildings and the entrance roadway. Most farm women like also a glimpse of the highway from the kitchen window.

Preferably the traffic way from the rear entrance to the main portion of the house should not lead through the kitchen. If the kitchen must be used as a passageway, the doors should be so arranged that the traffic does not cross the work area. This not only decreases the possibility of interference with household activities but also makes possible a more compact and convenient arrangement of work equipment. An important factor is a workroom or porch, on about the same level as the kitchen, for laundry, canning, care of milk, and other farm activities and for supplementary food storage. This saves much clutter in the kitchen itself and contributes to more efficient arrangement.

At least one bedroom should be provided on the first-floor of the farmhouse, not too far from the kitchen, so that small children or sick persons may be cared for conveniently. The bathroom should be convenient to both downstairs and upstairs bedrooms, but preferably on the first-floor. A space for a bathroom is very desirable even if the fixtures cannot be put in at once.

Ample storage space should be provided for clothing, bedding and linen, wraps, food, dishes and utensils, cleaning equipment, toys, and fuel. In general, these needs have been met in the plans given in this bulletin by closets in halls and bedrooms, kitchen cabinets, shelves or pantries, and cellar storage. Closet, cabinet, and shelf space adds greatly to the convenience and comfort of a house and should not be omitted.[3]

[3] Plans for closets and storage spaces can be obtained from the Bureau of Home Economics.

In the smaller plans shown here, an alcove or an end of the kitchen is indicated for use as a dining area. In the larger plans, either a dining room or a space for dining in the living room is provided, and in most cases there is also space in the kitchen for "hurry-up" meals.

The following points have been kept in mind in planning the kitchens.

A sink in every house is recommended. Even when water must be carried into the house, the sink and drain add much to the convenience of the kitchen and may be installed very cheaply. Where running water is not available, a pump may be installed beside the sink. However, running water, hot and cold, adds more to the convenience of the farm-home than almost any other factor.

The sink should be well-lighted, with windows over or at one end of it. Windows over the sink should have the sills higher than the back of the sink. Such windows will need to be shielded from sun glare unless on the north side of the house. The sink should have a drain board at the left end, at the right a flat shelf for stacking dishes if there is no drain board there. Dish storage should be near enough the left end of the sink for the dishes to be put away without unnecessary steps.

The cookstove should be conveniently near the sink, preferably against the side wall, or across from it if the kitchen is narrow.

A small food-preparation surface, table or shelf, should be placed next to the stove at the same height as the cooking surface. There should be cupboard space near the stove for the storage of cooking utensils. A worktable should be provided for long mixing jobs; it should have knee space and toe space. Staple supplies should be stored near this table and, if possible, should be near the refrigerator and not too far from the stove.

The refrigerator should, for convenient use, be as near as possible to the worktable and stove; however, the higher the surrounding temperature the greater the cost of operating the refrigerator. If an ice refrigerator is used, a location near the outside door lessens the tracking of dirt into the house. A ventilated cupboard near the worktable is convenient for storing the less perishable foods and reduces the season during which ice is needed.

RELATION TO OTHER BUILDINGS AND HIGHWAY

A house designed for the south or west side of the highway should be reversed if it is to be built on the north or east. For example, plan 6521 (p. 23) would fit nicely on either the south or the west side of the main road. If it were south of the highway, with the drive as shown, the kitchen would be on the east where it would have the advantage of the morning sunlight and in most localities the screened porch would be sheltered from the coldest winds. If the house were on the west side of the road, the kitchen would still get morning sunlight, and the porch would protect it from the afternoon sun. On the other hand, if the house were to be built on the north or east side of the road, the kitchen would be badly sheltered and lighted, but reversing the plan so that the kitchen would be on the right instead of the left side of the house would remedy these conditions.

Before deciding to build any house the plan should be studied carefully to see how it will best fit the location and the arrangement of the rest of the farmstead.

APPEARANCE

Attractive appearance of a farmhouse is to be obtained by:

Good taste in its proportions and exterior design.

Materials chosen to suit the local environment and type of house, effectively employed.

A pleasing color scheme for the house, in harmony with its surroundings.

Proper planning with relation to the natural features of the site, the other farm buildings, and the highway.

Grading the site and planting trees, shrubs, and flowers.

If the homes shown in this bulletin are carefully built according to the drawings, they will be satisfactory with respect to the first two points.

Proper location of the house is exceedingly important and must be worked out on the ground. Farmers' Bulletin 1132, Planning the Farmstead, and 1087. Beautifying the Farmstead, will be found helpful in this and in the planting of trees and shrubs around the house. Farmers' Bulletin 1452, Painting on the Farm, discusses kinds and uses of paints. Other bulletins on these subjects are available from several of the State agricultural colleges.

SAFETY

Safety in the farmhouse depends first on good construction for protection from damage by wind, fire, decay, and termites. Safety is promoted also by planning to avoid hazards from low beams, steep or unguarded stairways, or badly placed doors and windows. The working drawings for the houses illustrated herein embody good practice in these matters. The welfare and convenience of the occupants will be further permanently safeguarded through rat-proof construction, which eliminates "rat harbors", and denies easy entrance of the rodents to the building. Additional safety may be secured at slight cost by following the recommendations in Farmers' Bulletins 1590, Fire Protective Construction on the Farm; 1638, Rat Proofing Buildings and Premises; and 1649, Construction of Chimneys and Fireplaces; Leaflet 87, Wind-Resistant Construction for Farm Buildings, and Leaflet 101, Injury to Buildings by Termites.

CONSTRUCTION MATERIALS

The houses shown in this bulletin may, with slight changes, be built of wood, stone, concrete, brick, tile, earth, steel, or other materials. The choice depends largely on owner's preference, local availability and price, and the skill of local builders in using one or another. Many new materials for various purposes such as roofing, flooring, and insulation are on the market and deserve consideration.

The practice common among farmers of hauling their own stone or concrete materials, cutting their own logs where possible, having their lumber sawed at local mills, and doing part of the actual construction work, aid in reducing the cash outlay and in making possible a better house for the same money expenditure. This is especially true where lumber is sawed long enough before building starts to allow thorough seasoning. This seasoning of lumber is important and is too often disregarded.

COSTS

The most satisfactory way to learn the probable cost of a house is to obtain estimates from one or more local builders. Approximate costs may, of course, be obtained by comparing the proposed house with one built recently in the same community, or rough estimates may be based on the size of the house and typical unit costs for the locality.

Unit costs based on prices and wages prevailing in the spring of 1934 for houses suitable for the localities were obtained for about 300 counties by the Farm Housing Survey, A summary of the figures is as follows:

CELLARS

Costs for ordinary cellars were reported for most sections as varying from 50 cents to $1 per square foot of floor space. The cost per square foot is, of course, less for a large than for a small cellar, other things being equal. Easy excavation and low-cost materials also make for low unit cost. Costs of nearly $2 per square foot were reported in some sections where the ground-water level is high and cellar walls and floor must be carefully waterproofed. In sections where cellars are not ordinarily used the cost of the foundation was reported as part of the cost of the house superstructure.

SUPERSTRUCTURES AND PORCHES

Reported costs of one-story frame superstructures, including heating, plumbing, and lighting equipment ordinarily used in the locality, ranged from $1.25 to $2.25 per square foot of floor space in the South, from $2.25 to $3.50 in the West and Southwest, from $2.50 to $4 in the North, and from $3 to $4.50 in New England. Costs in Maryland, Virginia, and West Virginia and in a narrow belt along the east coast, including Florida, were reported from $2 to $3.25, and in the timber-producing sections of the Northwest at about $2 per square foot. Costs in any locality are influenced by local factors, generally being relatively high near cities and in thickly settled sections and relatively low in places where there are local supplies of lumber or other materials.

Differences in cost between the various sections are due to differences in the kinds of houses built, as well as to differences in material costs and wages. The typical house in the North is much more compact and substantial and provided with more expensive heating equipment than the typical house in the South.

The cost per square foot of floor area of two-story frame houses was reported as being 5 to 15 percent less than that of one-story houses in the same locality.

The costs of typical masonry superstructures were generally reported at $2 to $3 per square foot of floor area in the southern third of the United States, from $3 to $4 per square foot in the central third, and more than $4 per square foot in the northern third of the country. There were many variations from these general levels, however, costs of about $2 per square foot being reported in many localities in the States bordering on or south of the Ohio River. Costs reported for counties along the Atlantic and Gulf coasts were generally higher than for those in the interior. Little difference in cost per square foot of floor area in one-story and in two-story masonry houses was reported. The higher costs reported for masonry houses as compared with frame are probably due in part to better grades of finish and equipment used in the masonry houses.

The costs per square foot of floor space of open porches were reported as being about half the costs per square foot of floor space in one-story houses of similar materials.

ESTIMATING BY UNIT COSTS

The floor areas of the cellar, the porches, and the house itself (the superstructure) are shown with each plan. They do not include unexcavated cellar space nor unfinished space in attics. The areas were figured from the working drawings (see p. 7) because in some cases the dimensions given in the plans herein are approximate only. The superstructure area of a house of more than one story is given here as the area of the first-floor plus the usable area of the second-floor. Stairways, halls, and closets are included. To estimate very roughly what a house might cost, multiply the number of square feet of cellar floor space by a cost per square foot based on the costs stated above. Do the same for the house superstructure and the porches, and add the figures together. This, with allowance for price changes since the spring of 1934, will give a rough estimate of total cost of the house. The actual cost will, of course, be affected by the materials and home equipment which the owner selects and by the skill and efficiency of the builders.

If the owner can furnish part of the material or labor, or if interior finish or equipment is omitted, the initial cash outlay may be reduced. Estimates based on local prices and wage rates are to be preferred to those based on the cost figures given above.

Little study has been given to what amounts farm people are justified in spending for their houses, but several investigations have been made of expenditures for housing by people with fixed incomes. It is generally agreed that the house ordinarily should not cost more than two and one-half times the average annual net income of the family. In the case of the farm family the value of the living furnished by the farm should be considered as part of the income. Another generally accepted rule, which perhaps is more nearly applicable to farm conditions, is that not more than 25 percent—usually not more than 20 percent—of the average annual net income of the family should be required for housing, including principal payments, interest, taxes, insurance, repairs, and miscellaneous costs.

WORKING DRAWINGS

Working drawings have been prepared giving all necessary dimensions and details for building these homes. Farmers may obtain copies of these drawings from the agricultural extension services of the State agricultural colleges. The State extension services will supply only those plans which are suitable in their respective States, and usually will make a small charge to cover printing and mailing.

CAUTION REGARDING CHANGES

These plans have been carefully prepared by competent architects in consultation with home-management specialists and agricultural engineers familiar with farm conditions in all parts of the United States. It is urged that the plans be studied carefully before making a selection, but that no changes be made in them except for alternate arrangements indicated by the drawings or descriptions. Changing the size of a room or the location of a door or window may spoil some other valuable feature, and is almost certain to harm the appearance of the house. Doors and windows should be selected according to the descriptive material on the drawings. Sizes should be closely adhered to for best appearance.

The prospective builder should not try to obtain too much originality, but rather should base his selection on those features of the plan which will give the utmost satisfaction in the long run. Differences in slope of ground, location of the drive and farm buildings, and position and amount of trees and shrubbery, all will contribute to the distinctive appearance of the home.

For homes of the type offered in this bulletin, the surroundings should be kept free from distracting adornments. As a general rule, a few trees to provide shade, some flowering shrubs of native growth grouped close to the building to break harsh lines, and a bed or two of flowers selected for their color value, will be sufficient decorative relief.

PLANS FOR HOUSES

The 40 house plans shown in this bulletin have been arranged in four groups representing, respectively, (1) 1-story growing houses; (2) 1-story houses originally built with two or more separate bedrooms; (3) houses of 1^1/2 or 2 stories; and (4) very small houses. Some of the plans might have been placed in another group about as well as in that in which they are shown.

ONE-STORY GROWING HOUSES

There are many arguments in favor of the growing house for the farm. The first unit can be erected at a moderate cost, yet the finished house may have all the features considered important. As more space is needed the owner often can build the additions himself, taking advantage of slack times to cut lumber from his own land, haul sand and gravel for concrete, and in other ways reduce the cost of the additions. The chief difficulty with the growing house is that it is likely to grow very slowly. By the time additions are made the house is considered old by its occupants, and the additions are likely not to receive as careful attention as the original house.

The growing houses in this bulletin have been carefully planned so that both the first units and the final structure are satisfactory in usefulness and in appearance. The additions fit into the original units with a minimum of ripping out and rearrangement.

PLAN 6511,[4] FOR THE SOUTHWEST

Floor areas: Superstructure, first unit 605 square feet; with 1-bedroom addition 815 square feet; with 2-bedroom addition 960 square feet.

This plan is for a permanent dwelling of frame, stucco, stone, adobe, or other construction. If desired, the first unit may be built without bedrooms, as shown, and the living room used for sleeping quarters until the house is completed. The two large closets of this living room add much to its value, and the arrangement with all doors at one end of the room permits efficient use of the space.

If the first unit is to be used for several years before the bedrooms are added, the small bathroom with shower will be especially desirable. That space must be used for other purposes, however, and the bathroom fixtures moved when one or both bedrooms are added.

An alternate kitchen arrangement suggested by the Bureau of Home Economics for houses in which only an oil, gas, or electric stove is needed and meals will usually be eaten in the living-dining room is shown on p. 9.

[4] Prepared by W. K. Bartges and Earl Barnett for the department of agricultural engineering, University of California.

PLAN 6512,[5] FOR THE SOUTH

Floor areas: Superstructure, first stage 715 square feet; second stage with one bedroom 1,085 square feet; third stage 1,515 square feet. Porch, 250 square feet.

Plan 6512 is designed for southern conditions, to afford ample shade from a glaring summer sun. The arrangement of rooms permits the building to face toward the south, thus taking advantage of the summer breezes from that direction. The glazed porch on the north side offers a cool spot for summer meals, while the meals served during cold weather would naturally be more enjoyable in front of a blazing fire at the west end of the living room.

The second stage of the house adds the center bedroom of the three shown in the third stage. The partitions for the hall and the closets near the south porch are not needed until the third stage. If at all possible, the center bedroom should be built with the original unit to provide more sleeping space; but if it is necessary to watch the budget closely, the large living room or the glazed porch can be pressed into temporary service as sleeping quarters.

[5] Prepared by J. B. Atkinson and J. E. Hudson for the department of agricultural engineering, Agricultural and Mechanical College of Texas.

PLAN 6513,[6] FOR THE SOUTH

Floor areas: Superstructure, first unit 490 square feet; with first addition 705 square feet; completed house 1,015 square feet. Porches, first unit 25 square feet; with first addition 240 square feet.

The first unit of house 6513 is modest, and yet provides complete kitchen equipment, toilet facilities, a workroom or laundry, and g bedroom of comfortable size. The first addition increases the living accommodations and, with its front and rear porches, offers a cool retreat in hot weather. The second addition provides two more bedrooms and an adjoining bath, thus completing the six-room house. If desired, these two bedrooms may be made larger than shown in the plans.

The interior view shows the compact arrangement of kitchen cabinets and sink, and indicates the bright work area that is planned to lighten the duties of the housewife. An alternate arrangement of the kitchen, with no workroom, is shown on p. 13.

During the first two stages of development adequate space will be found in the kitchen for dining; but when two bedrooms are added in the final wing, the original bedroom (adjoining the kitchen) might be converted into a dining room. On the other hand, if at times the entire house is not needed by the family, the last wing of the house will make very desirable rooms for renting to tourists or summer boarders, or may be closed.

In some parts of the South the fireplace will not provide sufficient heat in cold weather, but a circulator heater may be set in front of the fireplace and connected to the chimney through a metal shield. If the plan is used in the North, a cellar may be constructed under the second unit, with stairs leading down from the rear porch, which should be enclosed.

[6] Prepared by W. H. Nash for the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6514,[7] FOR THE MIDDLE WEST

Floor areas: Superstructure, original house 670 square feet; with addition 940 square feet. Cellar, 255 square feet. Porches, 120 square feet.

House 6514, with basement and furnace, is well adapted to northern or mid-western conditions. The steps to the basement may be outside the building as shown, or the washroom may be extended so as to include the steps and provide greater protection during stormy weather.

The original house, in order to come in the class of low-cost houses, does not contain a bath. A pump at the kitchen sink provides water until funds permit of the installation of a modern plumbing system.

The first unit of the house may be heated either by a circulator heater in the living room or by a furnace. The furnace will be especially desirable after the second unit is added.

The added bedroom wing is recessed from the main building line to permit cross ventilation through the bedroom in the original house.

[7] Prepared by W. E. Pettit and Fred Riebel for the department of agricultural engineering, Ohio State University.

PLAN 6515,[8] FOR THE SOUTH

Floor areas: Superstructure, first unit 565 square feet; with first addition 900 square feet; completed house 1,255 square feet. Porches, 175 square feet.

This begins as a three-room house but is planned so that eventually three bedrooms and a bath may be added. The kitchen in the original house is nicely arranged, as shown in the plan. When the house is completed, the first bedroom may be used as a dining room, with a door cut through from the kitchen. The range should then be placed against the living room wall. The fireplace and range will heat the first three rooms. Hall space for a circulator heater is provided in the first addition.

[8] Prepared by C. W. Heery, Fred J. Orr, and B. G. Danner for the department of agricultural engineering, University of Georgia.

PLAN 6516,[9] FOR THE SOUTH

Floor areas: Superstructure, original unit 685 square feet; with first addition 1,035 square feet; completed house 1,345 square feet. Porches, original 90 square feet; completed house 155 square feet.

The original unit of house 6516 is a two-room structure of ample size. The dining room and kitchen are combined in one room, while the other room is temporarily both bedroom and living room. A porch leading directly into the kitchen affords entrance during the initial stage. In the center of the first unit are an unusually large storage closet and a chimney reminiscent of colonial Virginia. In localities where firewood is not readily available the fireplace may be omitted and a stove used for heating the bedroom.

Additions to the house are indicated on both sides of the original; the first addition undoubtedly would be that with the bedroom and bath. The rear porch can be enclosed if needed, and will then serve for laundering and other work that is more convenient not to do in the kitchen. The second addition will complete the house with a living room and front porch.

The addition of the living room and front porch requires considerable change in the arrangement of the kitchen to keep traffic from the back door to the living room from passing directly in front of the range. It will be best to set the range against the end wall, and preferably to use an electric or oil range so that no new chimney will be required. After the living room is added, less dining space will be needed in the kitchen.

[9] Prepared by H. B. Boynton and J. M. Thompson for the department of agricultural engineering, Virginia Polytechnic Institute.

PLAN 6517,[10] FOR THE SOUTH

Floor areas: Superstructure, original house 660 square feet; completed house 1,025 square feet. Porches, 300 square feet.

In plan 6517 a large amount of space is provided at low-cost by using the cheapest type of construction and omitting the interior finish at the time of building, for when a large family must be housed and funds are limited space is often more desirable than good finish and ease of heating. The exterior walls are of vertical boards and battens, and the roof is of galvanized corrugated metal. The house may be improved at any time by lining the walls and ceiling. The kitchen arrangement shows a treatment recommended by home economists, the sink and worktable at right angles to the wall, with shelves above them. This scheme has the advantage of separating the working and dining areas, yet it does not hamper easy communication between the rooms at meal hours. If desired, a bed may be placed in the living room, yet the house is so arranged that each sleeping room will have complete privacy. The side wall of the small bedroom next to the kitchen is intended to be made of 1-inch boards with battens on both sides.

The addition of bedrooms with closets and a bathroom is suggested. This addition will provide space for a circulator heater, which is a convenience when no cellar is planned.

[10] Prepared by the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6518[11]

Floor areas: Superstructure, first stage 835 square feet; with addition 1,160 square feet. Porches, 120 square feet.

Several novel features about this small dwelling will appeal to the farm-home builder. A heater room on the main floor near the rear entrance and the kitchen avoids the need for a cellar. A kitchen like this, with three outside walls to give light and cross ventilation and a better view of the farmstead and highway, is often desirable. The end of the living room next the kitchen is narrowed to a dining alcove, and when more space is needed the dining table may be extended into the living room. The completed bungalow has three bedrooms, with ample closet space. The rear porch will provide a comfortable, shady place to work outside during the warm summer days.

In the first stage of construction the two bedrooms at the rear may be omitted. This would still leave one bedroom and the bathroom and temporary closet space in the original bungalow. Then the two other bedrooms can be added later, when funds become available, or a screened and glazed sleeping porch with outside entrance could be built instead. A porch off the living room could also be added.

[11] Prepared by L. J. Smith for the department of agricultural engineering, State College of Washington.

PLAN 6519,[12] FOR THE SOUTHWEST

Floor areas: Superstructure, original house 775 square feet; with addition 1,075 square feet. Porches, 160 square feet.

The plans and perspectives on these pages show two methods of roofing this house. In each plan the original unit of the house is complete, and pleasing in appearance, and the additions fit the house gracefully with very little tearing out or rearrangement.

As in some other plans, the kitchen is designed for the use of an oil, gas, or electric cookstove. The house may be heated by a circulator hot-air heater, by a hot-water system with a radiator boiler in the living room, or possibly by radiant gas or electric heaters in the bedrooms.

The type of design favors keeping the house close to the ground. If floor-joist construction is used, the topsoil should be removed from under the house so that joists will not come too close to the ground surface. A concrete subfloor could be placed directly on the ground, supporting wood sleepers and wood floors.

[12] Prepared by H. E. Wichers, O. S. Ekdahl, and N. F. Resch for the department of architecture, Kansas State Agricultural College.

PLAN 6520[13]

Floor areas: Superstructure, first unit 450 square feet; with first addition 730 square feet; completed house 985 square feet. Porches, 255 square feet.

With their low-pitched roofs, and modest design both inside and out, plans 6520 and 6521 represent very desirable types of farmhouses. Such buildings blend with their surroundings to produce a real homey atmosphere. Originally planned for southern conditions, where a circulator heater placed in the hall should be adequate, these plans are adapted to colder regions if the houses are well constructed and are provided with basements and central heating plants as indicated on the working drawings.

PLAN 6521[13]

Floor areas: Superstructure, first unit 630 square feet; with first addition 985 square feet; completed house 1,285 square feet. Porches, 385 square feet.

In both designs the development from two large rooms progresses logically, the main difference being that in plan 6520 the additions are made at the side, while in plan 6521 the new rooms are added at the rear of the first unit. Although all the rooms of 6521 a r e shown as larger than those of 6520, by slight alterations either size of house may be built from either plan. The choice should be determined largely by the slope of the building site.

In each original house a temporary partition provides 2 bedrooms in place of a living room. The first addition adds 2 other bedrooms, and the removal of the partition between the temporary bedrooms provides a large living room. The second addition increases the total number of bedrooms to 3 by adding 2 and refitting 1 in the first addition as a bathroom.

Each kitchen is ideally located to command a view of the driveway, highway, and farm buildings. Closets, pantry, and other equipment utilize the darker part of the room, leaving the lighter portions for working area and dining table. These arrangements are complete in the original house.

On the screened back porch, which is equipped with laundry trays and closet, men coming from the fields may hang their outside work garments and, except in cold weather, wash before entering the house. Here a great deal of the dirty and messy work in preparing fruits and vegetables for canning may be done. Entrance from the screened porch to the bath or bedrooms reduces to a minimum the traffic through the kitchen and living room. In plan 6520 the screened porch might be divided by a lattice into work and living spaces.

[13] Prepared by Eldred Mowery and C. E. Cope for the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6522[14]

Floor areas: Superstructure, original house 640 square feet; with addition A. 950 square feet; with addition B 930 square feet. Porch, addition B, 120 square feet.

On account of its compact arrangement, this low-cost house furnishes a very satisfactory amount of usable space for the small family and may be enlarged to three-bedroom size, as indicated on the plans. The kitchen is well-arranged, with moderate storage space, and a wood box filled from outside, with a ventilated cupboard or cooler above it. The workroom, unusually large for a small house, is a good place for laundry or canning and for men to clean up before coming in to meals. Dining space is provided at the rear of the living room. This house should be compared with no. 6527 (p. 36).

Board and batten construction is very suitable for a low-cost house, but any other type of construction may be used for plan 6522 if preferred. If the house is built in a cold climate, probably it will be desirable to omit the fireplace and heat the living and bedrooms with a circulator heater.

[14] Prepared by the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6523,[15] FOR THE SOUTH

Floor areas: Superstructure, first unit 990 square feet; with addition A 1,420 square feet; with addition B 1,375 square feet. Cellar, 350 square feet. Porches, 100 square feet.

Communication between rooms is an important consideration in modern house planning. This has been provided in house 6523 by a small hall, which permits access not only from one room to another but also to the outside, the basement stairs, the washroom, the bathroom, and the linen closet, thus eliminating the necessity of using any room as a passageway.

Alternate extensions are shown, the choice probably depending upon the surrounding ground contour. Addition B should receive first consideration, because it brings the two new bedrooms into closer relation with the bathroom and does not destroy the washroom adjoining the rear entrance. It does, however, reduce the size of one of the first bedrooms.

If addition A is contemplated, the window at X should be located at Y when the first unit is built. The steps in the hall of addition A may be omitted if the ground slopes down at the rear so that the floor of the addition can be built at a lower level than the floor of the original house.

If addition B is to be used, the window at Z should be located so as to come in the hall of the addition.

[15] Prepared by C. W. Heery and B. G. Banner for the department of agricultural engineering, University of Georgia,

PLAN 6524[16]

Floor areas: Superstructure, first unit 1,245 square feet; with addition 1,735 square feet. Porches, 25 square feet. Cellar, 400 square feet.

The charm of house 6524 lies in its informality and simplicity. It is built for comfort and service. The broad expanse of roof, relieved by a gable, gives it a substantial yet homelike appearance. This is an easy house to move around in, and the kitchen is very nicely arranged. The screened porch, in addition to providing a cool and inviting summer dining and work space, affords ready access to all the rooms of the house. If the future addition of bedrooms is contemplated, the hall window in the first unit should be replaced with a door. This will not only provide an extra exit from the house but obviate unnecessary cutting and tearing out when the addition is built.

The cellar provides space for a central heating plant, it desired.

[16] Prepared by C. W. Heery, Fred J. Orr and B. G. Banner for the department agricultural engineering, University of Georgia.

PLAN 6525[17]

Floor areas: Superstructure, first unit 795 square feet; with bedroom addition 1,080 square feet; with both additions 1,375 square feet. Porches, 105 square feet. Cellar, 795 square feet.

This simple farmhouse develops into a home of dignity and charm. The original unit furnishes all modern conveniences and an ample basement. Future bedrooms may be added as required, while the extended living room might be built as the final touch of growing prosperity.

It will be of interest to the reader to note the similarity of arrangement of this house and no. 6519 (p. 20). These plans were developed independently, but the coincidence emphasizes the practicability of having the work and living areas on the side of the building next to the driveway and the bedrooms toward the rear, with the bathroom located as centrally as possible. The design of a small house for farm use is greatly influenced by the rather fixed location of the kitchen.

[17] Prepared by H. B. Boynton and J. M. Thompson for the department of agricultural engineering, Virginia Polytechnic Institute.

MODERATE-SIZED ONE-STORY HOUSES

Houses of this group can best be built complete at one time, though in several cases it is noted that rooms may be omitted from the original building or extra rooms added. The larger houses of this group provide about the same features as the completed growing houses. The more compact two-bedroom houses are well adapted to farms where two or more separate dwellings are needed.

PLAN 6526,[18] FOR TIMBERED SECTIONS

Floor areas; Superstructure, 845 square feet. Porches, 300 square feet.

In spite of present-day improvements in building materials, there is something about the rugged appearance of a log cabin that harmonizes with rural settings. Log construction blends into wooded surroundings more intimately than boards, bricks, or stucco.

House 6526 will accommodate 4 persons comfortably, or even 5 or 6 persons if a couch is placed in a corner of the living room.

The location of the bathroom not only serves the bedrooms but is convenient to the kitchen and the rear porch.

The central chimney serves the kitchen range, circulator heater, and fireplace. The ample size of the kitchen, and its built-in cupboards, dish cabinets, and other conveniences add greatly to the desirability of the design. If a pass cupboard between kitchen and living room is desired, it may be arranged in the cabinet next to the outer wall.

[18] Prepared by N. G. Napier for the department of agricultural engineering, University of Arkansas.

PLAN 6527[19]

Floor areas: Superstructure, main house, 915 square feet; with storage addition 1,120 square feet. Cellar, 115 square feet. Porches, 130 square feet.

This house is similar in many respects to the first unit of 6522 (p. 26), but is enlarged to provide for the bathroom. A shallow root cellar with room above is added at the rear of the house to provide extra storage if needed in localities where a cellar is not practicable. As in the case of plan 6522, two more bedrooms may be added to the left side of the house by taking space from the rear bedroom for a hallway.

The house is planned to be heated by a jacketed heater in the workroom with a cold-air return duct under the floor and cold-air registers in the living room and bedrooms. This arrangement will keep all handling of coal and ashes out of the living parts of the house.

[19] Prepared by O. R. S. Trabor for the department of agricultural engineering, University of Missouri.

PLAN 6528,[20] FOR THE NORTH

Floor areas: Superstructure, 800 square feet. Cellar, 800 square feet.

House 6528 is intended for use in cold, snowy regions, where farmers need cellars for storing fuel and vegetables. The hip roof helps to brace the house against the wind and is economical of material. A well-insulated ceiling is recommended to help keep the house comfortable. The substantial chimney in the center of the house, with separate flues for furnace, kitchen range, and fireplace, insures good draft and no wasted heat. The vestibule at the front and the hall arrangement at the side door also aid in keeping the house warm. Both doors are convenient to the driveway and the path to the barn.

The washroom and laundry of this house are in the cellar. This is a satisfactory and economical arrangement where there is good drainage for both the cellar and the plumbing fixtures, and is particularly advantageous on rolling ground. But one should beware of putting a deep cellar in a poorly drained location. (See Farmers' Bulletin 1572, Making Cellars Dry.)

[20] Prepared by S. A. Witzel for the department of agricultural engineering, University of Wisconsin.

PLAN 6529[21]

Floor areas: Superstructure, 740 square feet. Porches, 250 square feet.

This house was designed to meet the needs of a family of 4 to 6 people. The porch faces the highway, and paths from the front and side porches lead to the farm drive.

The kitchen is complete and compact. The extra space found in many farm kitchens has been omitted and a workroom added to provide for laundry and other rough work. This also provides a place for men to leave their outer wraps and wash before entering the living room. Storage space can be obtained in the attic by the use of a disappearing stair in the workroom ceiling.

No wood or coal range is provided for in this plan, because the use of an oil, gas, or electric stove saves space in the kitchen and correspondingly reduces the cost of the house. This saving and the convenience of a small, compact cooking unit deserve careful consideration in localities where these fuels are cheaply available. Heating is accomplished by means of a circulator heater in the living room.

The designer of this plan states:

The bedrooms are small. They are little used during waking hours, thus they can be reduced with less injury to family comfort than any other room. The large living room more than compensates for this.

When funds are limited it is always debatable, in a great portion of the United States, whether spending money for a porch is wise, because the same money could be used instead to increase the area of the house proper. In this particular case the porch could be left off without harm.

[21] Prepared by H. E. Wichers and O. S. Ekdahl for the department of architecture, Kansas State Agricultural College.

PLAN 6530[22]

Floor areas: Superstructure, 1,155 square feet. Porches, 245 square feet.

The well-known economy of square house construction is illustrated by this plan. A choice of heating methods without a cellar is indicated. If a circulator heater is used in the hall, as shown, the chimney between the bedrooms will not be needed, and if extra bedrooms are wanted they may be added as in plan 6517 (p. 18). A fireplace in the back bedroom would, of course, interfere with taking a hall off this room.

Kitchen doors are located to permit easy communication between the screened porch and the hall without interference with the work area while the screened porch is useful as both work and dining area. This latter feature, together with the ample size of the bedrooms, living room kitchen, makes the dwelling especially suitable for the small family in the South. The addition of a cellar under one-half of the house and of a central heating plant would adapt this plan to other sections of the country, though the rooms are rather larger than is common in the North.

[22] Prepared by W. C. Breithaupt and H. W. Dearing for the department of agricultural engineering, Alabama Polytechnic Institute.

PLAN 6531[23]

Floor areas: Superstructure, 1,185 square feet. Porches, 155 square feet.

House 6531 should be compared with no. 6533. The two plans were developed independently, but are very similar and illustrate a logical grouping of rooms for a farmhouse. In some respects the arrangement of 6531 works out more satisfactorily because it is not restricted by the structural details of framing a pitched roof.

This house is a model of compactness and efficiency. Note the simple but effective way in which the kitchen and heater room are located back to back. The floor of the heater room is a concrete slab, two steps below the main floor level. A pass cupboard between the kitchen and dining room is handy for serving meals. It also provides storage space beneath its counter. The entire bedroom side may be omitted from the original house, in which case the workroom would serve for dining and the dining room for a bedroom.

All dimensions of this house are multiples of 3^1/2 feet. Wall, door, and window sections might be prefabricated so that erection would consist merely of bolting the sections together, or the house can be built in the ordinary way. The sketch at the top of p. 41 illustrates the use of sheet metal as an exterior covering, the one in the center shows concrete blocks, and the bottom view shows the walls covered with a combination of lap siding and shingles or wide boards.

The flat roof should be covered with good roofing and well-insulated for comfort in both summer and winter as described in the working drawings. The cost of the insulated flat roof should not be greater than that of an ordinary pitched roof without insulation. The accumulation of snow will help to keep the building warm.

[23] Prepared by Albert Frey for the Bureaus of Agricultural Engineering and Home Economies, U.S. Department of Agriculture.

PLAN 6532[24]

Floor areas: Superstructure, 1,125 square feet Porches, 35 square feet.

This is a new type of low-cost house designed to provide five small single bedrooms or sleeping compartments and one bedroom of average size. The sleeping compartments are not very large, but to secure privacy and yet maintain economy of construction, something must be sacrificed. In this case it is unnecessary space.

The sketch showing the arrangement of bunks illustrates an interesting feature of this house. In the right-hand room the bunk is near the floor, and wardrobe and dresser space is obtained in the partition between the two rooms. In the left-hand room the bunk is 4 feet above the floor and projects over the one on the other side of the partition. Wardrobe space is arranged under the bunk. This room is especially suitable for a boy. A folding study table is provided under the window in each room. On warm nights air circulation would be obtained by opening the bedroom doors to the hall, which is ventilated by the windows above the lower roof. By omitting all but one of the partitions forming the five small bedrooms two good-sized rooms can be obtained.

The exterior appearance may seem, at first glance, unusually severe, but by omitting a pitched roof and the ornamental features of cornice moldings and trim decorations, the cost of construction is materially lowered. Here everything has been reduced to the simplest form possible.

With the heater room adjoining the kitchen, there is little need for a basement, thus an important item of expense is eliminated. The kitchen and workroom form a compact and very convenient unit along the driveway side of the house, while the large living room commands a good view of the highway. The living room and halls are lighted and ventilated by the small windows above the lower roofs. Closet space is provided in every room.

As in plan 6531 (p. 40), all dimensions are multiples of 3^1/2 feet so that the house can be either prefabricated or built in the ordinary way.

[24] Prepared by Albert Frey and R. G. Allen for the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6533[25]

Floor areas: Superstructure, 1,130 square feet. Porch, 80 square feet. Cellar, 280 square feet.

House 6533 is one of the few designs in which a separate dining space was allotted. Many people do not consider a separate dining room essential in the small farmhouse, and additional space adds to the cost, but in this case the arrangement adds to the spaciousness of the interior without greatly increasing the cost.

The rear entry is large enough to serve as laundry and washroom, and constitutes a back way from the kitchen to the bedrooms and bathroom without passing through the living room.

The kitchen, with cross ventilation and ample cupboard and counter space, is a pleasant workshop for the housewife, and is so arranged that easy service to the dining alcove is possible.

The bedrooms and adjoining bath are grouped together, allowing that portion of the house to be closed off from the living portion.

In the cellar is the heating plant, with fuel bin.

The house is kept low to give it an appearance of hugging the ground, but in no case should the joists be below the ground level. Shingles, beveled siding, or clapboards may be used for the exterior surface.

[25] Prepared by Max Uhlig for the department of agricultural engineering, Massachusetts Agricultural College.

HOUSES OF MORE THAN ONE STORY

In many respects houses of more than one story are better suited for farm use in the Northern States than single-story buildings. They are more economical in foundation and roof construction, and are easier to heat. They should be arranged with one bedroom and a bath, or at least a toilet, on the ground floor. A cellar for fuel and vegetable storage and a central heating plant are usually needed with this type of house. The laundry may also be located in the cellar if suitable drainage and a grade door to the outside can be obtained, but in a poorly drained location it is best to keep the laundry above-ground. In building a cellar advantage should be taken of the slope of the ground to obtain good lighting and an easy entrance on the low side of the slope.

To avoid uncomfortably warm second-floor bedrooms in summer cross ventilation should be provided in each room. Insulation of the ceiling is valuable both in summer and in winter.

It is very convenient to have a bathroom on the second-floor as well as one on the first-floor, especially if rooms are to be rented to tourists when the family does not need the whole house.

PLAN 6534[26]

Floor areas: Superstructure, original house, 1,420 square feet; with living room addition, 1,720 square feet. Cellar, 775 square feet. Porches, 285 square feet.

The first-floor and cellar plans of house 6534 are almost the same as the original unit of no. 6525 (p. 32), but there are comfortable bedrooms, a bath, and closet space on the second-floor. If funds are available to build the living room wing indicated, the entire dwelling will breathe the traditional southern spirit of hospitable spaciousness.

The hall and stair arrangements of this house are very good. Persons coming in at the back door can leave wraps in the vestibule at the head of the cellar stairs and go directly to any downstairs room or to the cellar, yet there is little lost space.

If the house should at some time be occupied by a small family, the entire upstairs could be shut off. Persons wishing rooms for tourists will find either the upstairs bedrooms or the downstairs bedroom and bath very suitable for this purpose.

[26] Prepared by H. B. Boynton and J. M. Thompson for the department of agricultural engineering, Virginia Polytechnic Institute.

PLAN 6535[27]

Floor areas: Superstructure, 820 square feet. Porch, 30 square feet.

This might well be considered the smallest story-and-a-half farmhouse that could be practicably built. The designer has utilized the space to good advantage, omitting a bath in the original structure for the sake of economy. The working drawings show a future addition to the house which provides a bedroom and bath on the first-floor. The alternate floor plan shows a dormer in the rear like the one on the front, to make room for a second-floor bath.

A distinctive feature of this compact design is the L-shaped kitchen with its well-grouped and well-lighted working surfaces and dining table. The arrangement of an L-shaped room is often a problem when enlarging or remodeling. The living room is arranged for both day and night use, with a folding bed in a closet.

[27] Prepared by C. T Bridgman for the department of agricultural engineering, Iowa State College.

PLAN 6536,[28] FOR THE NORTH

Floor areas: Superstructure, 1560 square feet. Cellar, 400 square feet. Porch, 210 square feet.

This design illustrates a type of farmhouse frequently built in recent years because of its simple lines and economy of construction. It illustrates the pleasing possibility of fitting the farmhouse to sloping ground, with ample light in the basement and easy flights of steps between the house proper, the large workroom at the rear, and the cellar.

The partition between the main rooms downstairs is carried up to divide the second-floor, giving these bedrooms ample size and good cross ventilation and making a strong construction that will not sag in years to come. A second bathroom may be provided in the storage space by the chimney, thus adding to the comfort of the home and making the upstairs rooms suitable for rental to tourists if desired. The roof should be insulated to give comfort both in summer and in winter.

The downstairs hall, lighted by the windows on the stairs, is compact and provides easy communication between all rooms. The living room is well-lighted and has good wall spaces for furniture. The combined kitchen and dining room, with the sink at right angles to the outside wall, as shown in the interior view, gives the housewife three walls of continuous work surfaces and in addition light and the view from all the windows of the room. Children can play or older members visit in the dining end with slight interference to the housewife's work. This is especially helpful on chilly days in the fall and spring when the kitchen stove provides the only heat in the house.

The part basement furnishes space for a furnace and for storage of fruits and vegetables.

[28] Prepared by C. J. Poiesz and Eldred Mowery for the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6537[29]

Floor areas: Superstructure (including enclosed porch) 1,520 square feet. Cellar, 840 square feet. Terrace and steps, 100 square feet.

House 6537 is similar in many respects to no. 6536, and has much the same advantages, though the rooms are somewhat smaller. A second downstairs bedroom can be added beside the bathroom, if needed, or the two bedrooms on the second-floor can be left unfinished if funds are not on hand to complete the building in the beginning.

The sketch indicates the roof line sweeping down snug over the window of the first-floor bedroom, a feature which is carried out with similar success in plan 6538. Designs of this type help to keep a two-story home from appearing too tall and make it a more harmonious unit in the farmstead scheme.

[29] Prepared by T. A. Zink for the department of agricultural engineering, Purdue University.

PLAN 6538[30]

Floor areas: Superstructure, 1,740 square feet. Cellar, 385 square feet. Stoops, 80 square feet.

House 6538 may be roofed in a number of ways, with slight alterations in the arrangement of the second-floor. The appearance is, of course, greatly altered; but in each case is pleasing. With the modernistic flat roof, any waste spaces caused by the sloping roofs in the other designs are eliminated. The storage room on the second-floor then becomes suitable for a child's bedroom, a sewing room, or an office, and the flat-deck porch roof will serve as a sleeping porch.

The plan is simple and well proportioned. Since the arrangement of the entrance is a little unusual, the location of the driveway and the path to the barn should be given careful study before deciding upon the site and placing of the house.

Construction should be simple. In the case of the modernistic house, concrete or stucco is suggested for the first story and boards and battens for the second.

[30] Prepared by W. K. Bartges and Earl Barnett for the department of agricultural engineering. University of California..

PLAN 6539,[31] FOR THE NORTH

Floor areas: Superstructure, original house, 1,100 square feet; with kitchen addition, 1,270 square feet; with all additions shown, 1,620 square feet. Porches, original house, 90 square feet; completed house, 285 square feet. Cellar, 565 square feet.

FIRST FLOOR PLAN

Thousands of farmhouses in all parts of the North and Middle West have begun like house 6539, and the development illustrated for this one should offer helpful suggestions both to farmers who plan to build new and those who expect to remodel present houses. It is a very practical design, expressing honest dignity.

The plans on this page show the original unit, which would supply a comfortable yet economical dwelling, with a basement for fuel and storage. The first addition might be either the new 7 kitchen and porch or the downstairs bedroom, bath, and laundry. If needed, a third upstairs bedroom and a bathroom can be added over those in the first-floor addition, as shown in the working drawings, with little loss of material or work, because the downstairs bedroom has a flat-deck roof. This would increase the floor area of the superstructure to 1,900 square feet.

[31] Prepared by J. M. Deibert for the Bureaus of Agricultural Engineering and Home Economics, U.S. Department of Agriculture.

PLAN 6540[32]

Floor areas: Superstructure, 1,380 square feet. Porch, 70 square feet. Cellar, 760 square feet.

This plan is intended for use in the North, where the compact floor plan with cellar and inside chimney and the front vestibule will simplify the heating problem. The first-floor level is above the ordinary height of packed snow in winter, but the grade entrance gives easy communication with both the cellar and the main part of the house. This permits convenient use of the cellar as a washroom and laundry, if in a well-drained location, as well as for storage purposes.

The house is roomy and well-arranged, with a downstairs bedroom and bathroom. By a slight change to make the second-floor like the first, a bathroom or toilet could be arranged in the large closet by the stairs. Storage space is provided in the attic.

All second-floor partitions are directly above those of the first floor, thus making a strong, rigid house with the least framing material.

[32] Prepared by H. W. Orth and R. A. Gmeinder for the division of agricultural engineering, University of Minnesota.

VERY SMALL HOUSES

The dimensions of the houses in the very-small-house group are kept to the minimum by using the living rooms for sleeping rooms at night. These houses cannot be considered adequate for the typical farm family, but will serve for young married couples or for tenants with small families.

PLAN 6501[33]

Floor areas: Superstructure, 325 square feet. Stoop, 15 square feet.

In plan 6501, sleeping space is provided in double-deck beds screened from the living room by draw curtains. If more space is wanted later, a bedroom wing can be added at the end of the living room. To save space, the kitchen is planned for an oil, gas, or electric stove. With a house of this size, part of the housework would have to be done outdoors, and a paved or graveled space under a tree near the house would be a convenience.

[33] Prepared by H. E. Wichers, N. F. Resell, and O. S. Ekdahl, for Kansas State College.

PLAN 6502[34]

Floor areas: Superstructure, 600 square feet. Stoop, 35 square feet.

The special feature of plan 6502 is the well-arranged kitchen, with good storage space and a compact work area at one side of the direct line of travel from the back door. Some privacy at night is afforded by the double wardrobes and folding screen between the two beds in the living room. The side porch will serve the double purpose of workroom and sleeping porch. It should be screened and have curtains to keep out the rain. By adding 4 feet to the living room and an additional partition, a third room could be provided. A shower bath may be installed in the large closet as shown.

[34] Prepared by A. L. Matthews and N. G. Napier for the department of agricultural engineering, University of Arkansas,

PLAN 6503[35]

Floor areas: Superstructure, original house 520 square feet; with addition, 825 square feet.

Small homes are often cut up into several rooms, with the result that in them a person has a "boxed-in" feeling. In plan 6503 the rooms are few, and each is used for more than one purpose. If the cost must be kept to a minimum, the bedroom and sleeping porch may be omitted in the original construction. The kitchen-dining room is unusually large for a house of this size, and the equipment is grouped in the front part of the room where the housewife can have a good view of the highway.

When the bedroom and sleeping porch are built, the bunk in the kitchen-dining room may be taken out to provide more dining space; or if one desires a cellar under part of the house, the cellar stairway may replace the bunk space. A large window and high-beamed ceiling are features of the living room. The chimney must not be too small; it is a feature of the house.

[35] Prepared by R. A. Deal and W. W. DeNeff for the department of agricultural engineering, State College of Washington.

PLAN 6504,[36] FOR THE SOUTHWEST

Floor areas: Superstructure, 430 square feet. Porches, 145 square feet.

Plans 6504 and 6505 were designed for the central valleys of California, where outdoor sleeping is invited, by the mild nights.

These were designed for temporary homes to be used later as shops, bunk houses, storage buildings, or for other uses, so concrete floors are recommended. Low-cost "frameless" construction is shown in the working drawings. There are no ceilings. The shower baths shown in the plans can be installed cheaply.

The kitchens and work porches are large enough for the needs of a good-sized family. Plenty of windows are provided for ventilation. The kitchen arrangement shows a wood-burning stove, and a large refrigerator placed against an inside wall for protection from the outdoor heat. It is expected that meals will ordinarily be eaten in the kitchen or outdoors.

PLAN 6505,[36] FOR THE SOUTHWEST

Floor areas: Superstructure, 410 square feet. Porches, 125 square feet.

[36] Prepared by W. K. Bartges and Earl Barnett for the department of agricultural engineering, University of California.

PLAN 6506,[37] FOR NEW ENGLAND

Floor areas: Superstructure, 540 square feet. Porches, 60 square feet.

Though the rooms in plan 6506 have been kept as small as possible in order to reduce cost, good use of space is realized in the arrangement. Additions to the house would enable it to accommodate an average-sized family.

A work-porch addition beside the kitchen and living room, between the windows, would provide a place for laundry work and for hanging outer wraps. A bathroom might be built by enclosing a portion of the front porch and enlarging the window to make a doorway from the hall. If desired, a third bedroom could be added at the end of the living room.

[37] Prepared by Bernhard Dirks for the department of agricultural engineering, Massachusetts State College.

PLAN 6507,[38] FOR THE NORTH

Floor areas: Superstructure, original house, 380 square feet; with first addition 600 square feet. Porches and entrances, 50 square feet. Cellar, first unit 380 square feet; with addition 600 square feet.

Plan 6507 is intended for snowy sections, and the first-floor is purposely raised above the winter snow level. The house can be built in either one or two stages.

No partition divides the kitchen and living room, which permits heating the house with the kitchen range in mild weather. It also aids ventilation in summer and facilitates serving of meals in the living room.

The steps to the cellar are outside the house, protected by a storm door. There is ample space in the cellar for laundry and storage. A cistern under the kitchen provides soft water.

[38] Prepared by S. A. Witzel for the department of agricultural engineering, University of Wisconsin.

PLAN 6508,[39] FOR THE NORTHWEST

Floor areas: Superstructure, first stage 385 square feet; second stage 605 square feet; third stage 755 square feet. Porches and steps, first stage 20 square feet; second and third stages 70 square feet.

This house is designed for the minimum requirements of beginners on the land, the first portion being 16 by 24 feet outside. It may either be enlarged for a permanent dwelling or later used as a service building. The bedroom is ample in size, but the living room, because it must also be used temporarily as a kitchen and dining room, will be crowded. This unit may be made 18 feet instead of 16 feet wide. Later the kitchen and a small bedroom may be added at the rear of the first unit, with a side porch off the kitchen. The door between the kitchen and living room will then be changed to the right of the chimney, and a narrow hall taken off the rear of the front bedroom.

If an additional bedroom is desired, it can be added to the left of the bathroom, making the third stage for this house. The closet in the kitchen should be removed and a door cut through to allow easy access from the kitchen to the bath and bedrooms. The bedroom closets must be rearranged to allow for these changes.

[39] Prepared by R. A. Deal and W. W. DeNeff for the department of agricultural engineering, State College of Washington.

PLAN 6509,[40] FOR THE SOUTH

Floor areas: Superstructure, 525 square feet. Porches and steps, 90 square feet.

Plans 6509 and 6510, for the South and the Middle West, respectively, are low-cost houses for families that need only one bedroom. The kitchens are well-arranged and have good storage space. Closet space also is ample for houses of this size.

A storage and workroom, as shown in plan 6510, is a good feature for the North but is not so much needed in the South, where mild weather permits doing much housework outdoors. The living room fireplace and kitchen range should heat house 6509 comfortably under ordinary southern conditions, but in the North arrangements should be made for a stove or circulator heater as in plan 6510.

[40] Prepared by W. C. Breithaupt and H. W. Dearing for the department of agricultural engineering, Alabama Polytechnic Institute.

PLAN 6510,[41] FOR THE MIDDLE WEST

Floor areas: Superstructure, 740 square feet. Porches and steps, 60 square feet.

[41] Prepared by H. J. McKee and Arthur Wupper for the department of agricultural engineering, University of Illinois.

U.S. GOVERNMENT PRINTING OFFICE: 1934

For sale by the Superintendent of Documents, Washington, D.C. Price 10 cents

Transcriber Notes

All illustration were move so that paragraphs were not split. All plan footnotes were moved to the end of that plan. On page 3, reference to plan 6521's page number was corrected.

*** END OF THE PROJECT GUTENBERG EBOOK FARMHOUSE PLANS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

FARMHOUSE PLANS

CONTENTS

FARMHOUSE REQUIREMENTS

SIZE

COMFORT AND CONVENIENCE

RELATION TO OTHER BUILDINGS AND HIGHWAY

APPEARANCE

SAFETY

CONSTRUCTION MATERIALS

COSTS

CELLARS

SUPERSTRUCTURES AND PORCHES

ESTIMATING BY UNIT COSTS

WORKING DRAWINGS

CAUTION REGARDING CHANGES

PLANS FOR HOUSES

ONE-STORY GROWING HOUSES

PLAN 6511,[4] FOR THE SOUTHWEST

PLAN 6512,[5] FOR THE SOUTH

PLAN 6513,[6] FOR THE SOUTH

PLAN 6514,[7] FOR THE MIDDLE WEST

PLAN 6515,[8] FOR THE SOUTH

PLAN 6516,[9] FOR THE SOUTH

PLAN 6517,[10] FOR THE SOUTH

PLAN 6518[11]

PLAN 6519,[12] FOR THE SOUTHWEST

PLAN 6520[13]

PLAN 6521[13]

PLAN 6522[14]

PLAN 6523,[15] FOR THE SOUTH

PLAN 6524[16]

PLAN 6525[17]

MODERATE-SIZED ONE-STORY HOUSES

PLAN 6526,[18] FOR TIMBERED SECTIONS

PLAN 6527[19]

PLAN 6528,[20] FOR THE NORTH

PLAN 6529[21]

PLAN 6530[22]

PLAN 6531[23]

PLAN 6532[24]

PLAN 6533[25]

HOUSES OF MORE THAN ONE STORY

PLAN 6534[26]

PLAN 6535[27]

PLAN 6536,[28] FOR THE NORTH

PLAN 6537[29]

PLAN 6538[30]

PLAN 6539,[31] FOR THE NORTH

PLAN 6540[32]

VERY SMALL HOUSES

PLAN 6501[33]

PLAN 6502[34]

PLAN 6503[35]

PLAN 6504,[36] FOR THE SOUTHWEST

PLAN 6505,[36] FOR THE SOUTHWEST

PLAN 6506,[37] FOR NEW ENGLAND

PLAN 6507,[38] FOR THE NORTH

PLAN 6508,[39] FOR THE NORTHWEST

PLAN 6509,[40] FOR THE SOUTH

PLAN 6510,[41] FOR THE MIDDLE WEST

THE FULL PROJECT GUTENBERG LICENSE