The Project Gutenberg eBook of Portable Flame Thrower M2-2

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Portable Flame Thrower M2-2

Author: United States. War Department

Release date: December 5, 2016 [eBook #53669]

Most recently updated: October 23, 2024

Language: English

Credits: Produced by deaurider, Brian Wilcox and the Online

Distributed Proofreading Team at http://www.pgdp.net (This

file was produced from images generously made available

by The Internet Archive)

*** START OF THE PROJECT GUTENBERG EBOOK PORTABLE FLAME THROWER M2-2 ***

The cover image was created by the transcriber and is placed in the public domain.

War Department Technical Manual

TM 3-376A

PORTABLE

FLAME THROWER

M2-2

RESTRICTED

DISSEMINATION OF RESTRICTED MATTER. The information contained in restricted documents and the essential characteristics of restricted material may be given to any person known to be in the service of the United States and to persons of undoubted loyalty and discretion who are cooperating in Government work, but will not be communicated to the public or to the press except by authorized military public relations agencies. (See also par. 18b, AR 380-5, 28 Sep 1942.)

War Department - 16 May 1944

Washington, D. C.

WAR DEPARTMENT,

Washington, 25, D. C. 16 May 1944

TM 3-376A, Portable Flame Thrower M2-2 is published for the information and guidance of all concerned.

[A. G. 300.7 (21 March 44)]

By order of the Secretary of War:

G. C. MARSHALL,

Chief of Staff.

Official:

J. A. ULIO,

Major General,

The Adjutant General.

Distribution:

R & H (5); Bn 2, 7, 17 (2); C & H 3 (5); IC & H 5 (5); C 2, 7, 17 (2); X. ID: T/O & E 72T, Light Div; 17, Armd Div; IR: T/O 5-192, Hq & Hq Co, Engr Comb Gr; 5-171, Engr Comb Regt; IBn: T/O 5-15, Engr Comb Bn; 5-35, Engr Bn Sep; 5-175, Engr Bn, Comb Regt; 5-215, Armd Engr Bn; 5-475T, Engr Bn, Light Div; IC: T/O 5-16, Hq & Hq & Sv Co, Engr Combat Bn; 5-17, Engr Comb Co; 5-192, Hq & Hq Co, Engr Comb Gr; 5-36, Hq & Hq & Sv Co, Engr Bn (Sep); 5-37, Co, Engr Bn (Sep); 5-176, Hq & Hq Det, Engr Bn, Engr Comb Regt; 5-216, Hq & Hq Co, Armd Engr Bn; 5-217, Co, Armd Engr Bn; 5-476T, Hq & Hq Co, Engr Bn, Light Div; 5477-T, Co, Engr Bn, Light Div.

(For explanation of symbols see Par 26, FM 21-6)

TECHNICAL MANUAL

PORTABLE FLAME THROWER M2-2

WAR DEPARTMENT

WASHINGTON, 25, D. C., 16 May 1945

CHANGES}

No. 1   }

TM 3-376A, 16 May 1944, is changed as follows:

10. ITEMS WITH EACH FLAME THROWER.

*            *             *            *            *

b. Kit, spare parts, for portable flame thrower M2-2, assembly B81-6-190.

*            *             *            *            *

g. (Added). Army Service Forces Catalog CW 7-440114, Organizational Spare Parts and Equipment: 1st and 2d Echelons: for Flame Thrower, Portable, M2-2.

Fig. 8. Contents of tool kit:

*            *             *            *            *

B. 1 Wrench, hex, * * * set screws, H22-49-12.

2 Wrench, hex, 5/32-inch across flats for 5/16-inch socket-head set screws, H22-49-140.

*            *             *            *            *

Fig 9. Contents of spare parts kit:

F. (Added). 3 Tubes, deflector, A81-1-501. (See fig. 39.)

G. (Added). 3 Locknuts, pipe, hex, 1/8-inch, H98-5-382 (for use with deflector tube). (See fig. 39.)

H. (Added). 1 Support, diaphragm, A81-1-428. (See fig. 47.)

12. NEW EQUIPMENT.

*            *             *            *            *

m. (Added). New gun may be received with valve spring removed from barrel and valve assembly. Spring comes tied to barrel. This is done to prevent strain on valve diaphragm assembly caused by pressure of spring in gun during storage and shipment. When weapon is being prepared for operation, spring must be untied from barrel and installed in gun, as described in paragraph 75.

n. (Added). Pressure regulator may be shipped at zero adjustment to prevent possibility of strain on diaphragm during shipment and storage. A regulator shipped in this condition has a tag (tied to the tank coupling) stating that the regulator is not set. When weapon is received in this condition, it must be adjusted as described in paragraph 67 before it can be operated.

*These changes supersede TB 3-376A-1, 19 October 1944.

15. TRAINING.

*            *             *            *            *

b. Use of water in training. Water may be used (instead of fuel) for elementary practice firing. Ignition cylinders are * * * piece, and lubricated (Par. 49). Use of water, however, should always be supplemented by firing ignited fuel because water does not give a correct impression of stream and flame characteristics.

*            *             *            *            *

17. CONNECTING TANK GROUP AND GUN GROUP.

*            *             *            *            *

a. Place the new * * * to 2 minutes. Slight pressure sometimes builds up in the fuel tanks, even though the pressure-tank valve has not been opened, and causes some overflow of fuel when the coupling plug is removed. This pressure may be relieved by—

(1) Standing the tank group upright.

(2) Slightly opening filling plug on top of fuel tanks to bleed the pressure.

(3) Closing the opening at filling plug and tightening it with wrench.

*            *             *            *            *

18. LOADING WITH IGNITION CYLINDER.

*            *             *            *            *

b. Precautions. Care must be * * * front of gun. Do not ignite the ignition cartridge until the weapon is to be fired at the target.

*            *             *            *            *

30. AFTER FIRING.

When the firer * * * mission, he should:

a. First, remove and discard the ignition cylinder, as the ignition cylinder should never be present when blowing out fuel or after blowing out fuel except when preparing for a new mission. To remove cylinder, proceed as follows:

*            *             *            *            *

b. Close the pressure-tank valve by turning valve handle clockwise (to conserve remaining pressure in pressure tank) only if additional shots are to be fired before refilling and recharging.

c. If no additional shots are to be fired before refilling and recharging, open pressure-tank valve by turning handle counterclockwise. Point the gun away from personnel and blow out the remaining fuel and pressure, if any, from the fuel tanks by squeezing the valve lever and grip safety until there is no further discharge. The trigger should not be used during this operation. Then close the pressure-tank valve to prevent entrance of foreign matter into the pressure system.

d. (Superseded). Carefully remove tank group from the back. This may be done most easily by sitting or squatting with back to a tree stump, flat rock, packing box, or other object. Release the body and shoulder straps and ease tank group off the back. Avoid dropping equipment on the ground as this may damage it.

*            *             *            *            *

31. IGNITION CYLINDER.

*            *             *            *            *

c. Packing. Ignition cylinders are * * * each flame thrower. Fifty cans (100 ignition cylinders) are contained in each ignition cylinder packing box. Wooden packing box with contents weighs approximately 50 to 55 pounds. Outside dimensions of the box are approximately 16-1/4 inches by 14-3/4 inches by 10-1/4 inches. Cubage is 1-3/12 cubic feet.

*            *             *            *            *

32. CHARGING PRESSURE TANK.

*            *             *            *            *

b. Charging from air compressor. Compressor, air, gasoline * * * cylinders as well. Instructions for use of the compressor will be found in TM 3-377.

*            *             *            *            *

Figure 23. Charging two pressure tanks, using charging and filling lines, and cylinders of compressed air or nitrogen. As many as four pressure tank and valve assemblies, on or off tank groups, can be charged at one time from cylinders coupled as shown in figure 24.

33. PRECAUTIONS WHEN PRESSURE-CHARGING.

*            *             *            *            *

m. (Added). Inspect carefully to be certain that no traces of grease, flame thrower fuel, oil, dirt, or other foreign matter are present in flame thrower pressure tanks, outlets of air compressor, connections, hose, or cylinders containing compressed air.

n. (Added). Hands and tools must be free of oil or grease when charging or servicing flame thrower pressure systems.

o. (Added). Discharge any remaining compressed air in flame thrower pressure tanks before recharging.

p. (Added). If compressed air is to be used, and if any grease, oil, or flame thrower fuel is detected by sense of smell or sight within pressure tank and valve assemblies or cylinders, return tanks or cylinders for cleaning to the appropriate third-echelon maintenance agency of Chemical Warfare Service.

35.1 PEPTIZED FUELS (Added).

a. Characteristics.

(1) Pour more readily than usual thickened fuels.

(2) Give a larger diameter flame than thickened fuels.

(3) Give longer effective ranges than liquid fuels.

(4) Prepared more quickly in cool temperatures than thickened fuels.

b. Preparation.

(1) Open 5-1/4-pound can or cans of thickener.

(2) Add 2 mess kit spoonfuls of water to each can of thickener. Stir until the water disappears in the thickener. It is not necessary to mix the water uniformly with all of the thickener.

(3) Proceed at once as directed in paragraph 35. Avoid accidental addition of any water to the thickener or fuel other than that stated in (2) above.

(4) Peptized fuels set a little more quickly than the usual thickened fuels, but their general appearance after setting is the same. After standing, however, peptized fuels spontaneously become thinner and may be poured without use of pressure. The time it takes for thinning to occur depends on the temperature of the fuel. At 75° Fahrenheit or higher, thinning occurs in approximately 1 to 2 hours. At temperatures below 60° Fahrenheit, thinning occurs several days after preparation of the peptized fuel.

(5) If water has accidentally gotten into fuel before addition of the thickener, peptizing action takes place, but the results are unpredictable because the quantity of water added is not controlled.

36. PREPARATION OF LIQUID FUELS.

a. Choice of ingredients. Thin fuels are * * * reaching the target. For this reason, liquid fuels should contain the lowest proportion of gasoline and the highest proportion of heavier fuels that permit easy ignition. In hot climates, * * * of great importance. The gasoline used can be any U. S. grade of motor fuel or aviation gasoline. Suitable blends are as follows:

*            *             *            *            *

(3) (Added). By volume, 20 to 25 percent gasoline and 75 to 80 percent light fuel oil.

*            *             *            *            *

40.1 USE OF PACKBOARDS (Added).

Detachable pressure tank and valve assemblies (par. 66.1) make possible the use of packboards for transporting pressure tanks, 5-gallon cans of fuel, wrenches, and additional ignition cylinders close to the front line of combat to troops using flame throwers. As packboards are not manufactured specifically for servicing flame throwers, standard quartermaster-issue packboards are used. Packboard transportation is practicable only with pourable fuel. (Pourable fuels include some thickened fuels and all liquid fuels.)

a. The following is a suggested procedure for packboard transportation:

(1) Lash all necessary filling and charging supplies for one flame thrower to packboard, using lashing rope and straps.

(2) Tie one pressure tank and valve assembly to top of one flat 5-gallon fuel can so that flexible shaft and handle hang down parallel to one side of the fuel can.

(3) Carry wrench with large enough opening to unscrew filling plugs from tops of fuel tanks and to tighten plugs after filling.

(4) Carry extra ignition cylinders.

b. Return empty pressure tank and valve assembly along with empty fuel can and wrench on packboard to flame thrower servicing point.

c. If a supply of flame thrower tank groups is available, they may be preferred to the packboard method of transportation. Tank groups are easy to carry, and a filled and charged tank group can replace an emptied one as quickly as packboard method can be used to service flame thrower.

*            *             *            *            *

48. SERVICE KIT.

*            *             *            *            *

a. Tools.

*            *             *            *            *

1 Screw driver, common, * * * blade diameter, H22-50-6. (Fig. 8.)

2 Wrenches, hex, 5/32 inch across flats (for 5/16-inch socket-head set screws), H22-49-140. (See B, fig. 8.)

2 Wrenches, hex, * * * set screws), H22-49-91.

*            *             *            *            *

b. Accessories and spare parts.

*            *             *            *            *

1 Tank and valve, pressure, assembly (less valve shaft assembly, B81-1-883) B81-1-879. (See fig. 35.2.)

1 Shaft, valve, assembly B-81-1-883. (See fig. 35.2.)

2 Case, spring, assemblies B81-1-444. (Fig. 9.)

*            *             *            *            *

1 Regulator, pressure, assembly (Grove type) B81-1-778. (Fig. 35.2.)

1 Compound, anti-seize, white * * * 1/4-pound can, H99-3-12.

2 Gages, pressure * * * assembly B81-6-90. (Fig. 32.)

6 Tubes, deflector, A81-1-501. (See fig. 39.)

6 Locknuts, pipe, hex, 1/8-inch, H98-5-382. (See fig. 39.)

2 Supports, diaphragm, A81-1-428. (See fig. 47.)

6 Springs, R81-1-922 (for socket). (See fig. 35.8.)

6 Washers, backing, R81-1-924 (brass washer for socket). (See fig. 35.8.)

12 Washers, B81-1-923 (synthetic rubber washer for socket). (See fig. 35.8.)

6 Caps, plug, B81-1-926 (with chain) (dust cap for plug). (See fig. 35.3.)

12 Nuts, wing, A81-1-877. (See fig. 35.4.)

2 Army Service Forces Catalogs CW 6-445115, Sets of Tools, Equipment, and Similar Material: Kit, service, for Portable Flame Thrower, M2-2.

2 Army Service Forces Catalogs CW 7-440114, Organizational Spare Parts and Equipment: 1st and 2d Echelons: for Flame Thrower, Portable, M2-2.

2 War Department Technical Manuals 3-376A, Portable Flame Thrower M2-2.

49. LUBRICATION.

a. Gun group.

*            *             *            *            *

(2) Frequency of lubrication. The surfaces of * * * lubricated before reassembly. Do not soak or wash the spring case assembly in solvent because this may remove the grease which is factory packed in the spring case assembly. This grease cannot be replaced. To clean spring case assembly, wide outside surfaces with cloth saturated with solvent.

*            *             *            *            *

53. SERVICE WHEN FILLING AND CHARGING.

*            *             *            *            *

d. Testing for leaks in pressure system. After charging and * * * to test pressure. (Fig. 32.) To install gage, unscrew check-valve cap, moisten end of check valve with water or saliva, and screw gage in check-valve body. Use of water or saliva as lubricant prevents cutting of the rubber washer by the check valve. If pressure has * * * and then retested.

66. PRESSURE TANK AND VALVE ASSEMBLY.

a. Description and functioning. The pressure tank * * * assembly (Fig. 33) includes:

(1) Pressure tank. The pressure tank * * * the fuel tanks. The pressure-tank clamp may be adjusted to different outside diameters of pressure tanks by means of a nut and screw tightening device (fig. 35.1) or by means of a stepped ring at end of clamp.

FIGURE 35.1. (Added.) Adjustable pressure tank clamp, showing use of nut and screw tightening device.

*            *             *            *            *

b. Removal. (Fig. 33.)

*            *             *            *            *

(2) Removal procedure.

*            *             *            *            *

(h) (Added). To remove check valve, unscrew check valve cap and check valve body, using wrenches.

c. Installation. (Figs. 33 and 39.)

*            *             *            *            *

(7) (Added). To install check valve, apply thread compound lightly to threads of cheek valve body and screw into opening in pressure-tank valve. Tighten check valve body in position, using wrench. Screw check valve cap on check valve body and tighten with wrench.

*            *             *            *            *

66.1 DETACHABLE PRESSURE TANK AND VALVE ASSEMBLIES (Added).

Newly developed detachable pressure tank and valve assemblies provide an improved and speedier method of servicing M2-2 portable flame throwers in forward combat zones.

a. Description and functioning.

(1) Detachable pressure tank and valve assemblies (figs. 35.2 and 35.3) are used in modified flame throwers. They make it unnecessary to replace empty complete tank groups with filled and charged complete tank groups.

(2) Replacement of complete tank group, however, may be preferred when an extra supply of tank groups is available, or if thickened fuel is too stringy and viscous to pour.

(3) Detachable pressure tank and valve assemblies can be attached only to flame throwers which include sockets (figs. 35.2 and 35.3) and shortened regulator tubes. Flame throwers produced recently include this design modification.

(4) A plug and cap (fig. 35.3) on detachable pressure tank and valve assembly replace tube elbow (fig. 33) used on nondetachable pressure tank and valve assembly.

b. Removal. Care must be taken to prevent damage to connections during removal and installation. The procedure for removal of pressure tank and valve assembly is as follows:

(1) Close pressure-tank valve. Press valve lever and safety grip on gun to release all pressure from fuel system and gun.

(2) Unscrew wing nut from valve flexible shaft. (See fig. 35.4.) Be careful not to misplace wing nut.

(3) Pull clamp and shaft from stud which is welded on fuel tank.

(4) With one hand under pressure tank, unclamp but do not fully open pressure-tank clamp.

(5) Supporting pressure tank valve with top of right hand, push knurled socket in and away from pressure tank valve. Left hand may be placed at back of regulator tube so that tube does not bend away from socket. (See fig. 35.5.) Pull out pressure tank and valve assembly.

FIGURE 35.2. (Added.) Pressure system disassembled, showing removable pressure tank and valve assembly, nomenclature, and Chemical Warfare Service stock numbers.

FIGURE 35.3. (Added.) Detachable pressure tank and valve assembly, connected to modified regulator tube assembly.

FIGURE 35.4. (Added.) Removing wing nut to free valve flexible shaft.

FIGURE 35.5. (Added.) Pushing knurled socket away from pressure tank, permitting pressure tank and valve assembly to be removed from tank group.

(6) Put cap as far as it will go over opening of the plug. (See fig.35.6.) This prevents dust and other foreign matter from entering empty pressure tank.

(7) Flame thrower is now ready to receive a charged pressure tank and valve assembly. (See fig. 35.7.)

c. Installation. To install a charged or replacement detachable pressure tank and valve assembly, proceed as follows:

(1) Remove dust cap from plug of charged pressure tank and valve assembly. (Never open pressure-tank valve with cap on plug.)

FIGURE 35.6. (Added.) Pressure tank and valve assembly with dust cap over plug opening.

(2) Support socket and tube with left hand and insert plug in socket with right hand. If tube is not supported, it is difficult to lock the plug in the socket and it is possible that tube may become bent. Press bottom of tank until plug snaps into socket. Test by attempting to pull tank and plug from socket. Plug must not pull out; if it does, insert again and press bottom of tank. Grasp knurled collar of socket and test for end play. If collar slides freely back and forth on socket, the connection is not tight and plug should be pressed in farther.

FIGURE 35.7. (Added.) Tank group, ready to receive a charged pressure tank and valve assembly.

(3) Replace small clamp (valve-stem clamp) over stud projecting from fuel tank, and screw wing nut on stud to secure valve flexible shaft in place. Do not use wrench on wing nut.

d. Maintenance. Follow maintenance instructions given in paragraph 66. In addition, if leaks occur and signs of wear are visible, carry out the following procedures:

(1) Worn washer. Replace synthetic rubber washer by disassembling socket (fig. 35.8), prying out washer, placing new washer in position, and reassembling socket.

FIGURE 35.8. (Added.) Cutaway view of socket and plug. Disassembly is permitted only as directed in paragraph 66.1.

(2) Damaged plug. Repair damaged or nicked end of plug by filing plug end square and smooth. File off as little as possible. Test for leakage at socket by installing pressure tank and valve assembly, as in c above, and then opening pressure-tank valve. If leak persists at joint between socket and plug, replace plug by unscrewing old plug, screwing new plug in position, and tightening with wrench. Replace entire plug. Do not attempt to unscrew the cylindrical portion from the square portion.

67. PRESSURE REGULATOR.

*            *             *            *            *

e. Maintenance (Added).

(1) Spring type (Hoke) pressure regulator. Except for adjustment to increase or decrease pressure, do not attempt to maintain or repair the spring type (Hoke) pressure regulator. If damaged or defective, it must be replaced by a dome type (Grove) pressure regulator.

(2) Dome type (Grove) pressure regulator (B81-1-778). Replacement parts for maintaining the dome type (Grove) regulator are available for use by chemical maintenance companies, as shown in Army Service Forces Catalog CW 9-440114, List of All Service Parts and Higher Echelon Spare Parts for Flame Thrower, Portable, M2-2 (25 November 1944).

74. VALVE GRIP.

*            *             *            *            *

c. Installing valve grip.

(1) Place grip safety * * * right valve grip. (Fig. 48.) Do not accidentally place the lower forward extension of the grip safety over the lower rear extension of the valve lever. If this overlapping occurs, the small projection at the bottom of the grip safety may be broken off. Be sure the * * * of grip safety.

*            *             *            *            *

77. SHIPMENT AND STORAGE.

*            *             *            *            *

c. Class of supply (Added). The portable flame thrower is a class IV supply item.

78. REFERENCES.

Reference pertaining to * * * flame throwers include:

*            *             *            *            *

TM 9-850 Cleaning, Preserving, Lubricating * * * the Ordnance Department

TM 3-377, Compressor, Air, Gasoline Engine-driven, 7CFM, M1 (For Charging Flame Throwers and Cylinders)

TB CW 18, Kit, Fuel Filling, Flame Thrower, E6 (for filling mechanized and portable flame throwers)[*]

TB CW 20, Cleaning Interiors of Compressed Gas Cylinders, Tanks, and Accessories[*]

TB ENG 39, Safe Handling of Compressed Gases[*]

ASF Catalog CW 7-440114, Organizational Spare Parts and Equipment: 1st and 2d Echelons: for Flame Thrower, Portable, M2-2 (25 November 1944)

ASF Catalog CW 9-440114, List of all Service Parts and Higher Echelon Spare Parts for Flame Thrower, Portable, M2-2

ASF Catalog CW 6-445115, Sets of Tools, Equipment, and Similar Material: Kit, Service, for Portable Flame Thrower, M2-2

ASF Catalog CW 9-445115, List of all Parts and Higher Echelon Spare Parts for Kit, Service, for Portable Flame Thrower, M2-2

FS 3-33, Portable Flame Thrower M2-2, Part 1, Nomenclature and Operation.

* Technical Bulletins are to be superseded by appropriate War Department manuals or changes to manuals.

[AG 300.7 (11 Apr 45)]

BY ORDER OF THE SECRETARY OF WAR:

G. C. MARSHALL

Chief of Staff

Official:

J. A. ULIO

Major General

The Adjutant General

DISTRIBUTION:

AAF (Cml O) (10); AGF (Cml O) (10); ASF (2); T of Opn (Cml O) (10); Arm & Sv Bds (1); Def Comd (2); S Div ASF (1); Tech Sv (2) except CWS (45); SvC (Cml O) (4); PE (Attn: Cml O) (2); Sub-PE (Cml O) (2); PG (2); Ars 3 (2); ASF Dep (CW Sec) (2); ASF Dep (2); Dep 3 (2); Pro Dist 3 (2); Tech Sv C (2); USMA (20); Tng C (2); A (2); CHQ (5); B (1); R (5); Bn 2 (2), 3 (5), 7, 17 (2); C 2 (2), 3 (5), 7, 17 (2); AF (2); W (Cml O) (1); Five (5) copies to each of the following: T/O & E 5-15; 5-16; 5-17; 5-35; 5-36; 5-37; 5-171; 5-175; 5-176; 5-192; 5-215; 5-216; 5-217; 5-235; 5-236; 5-238; 5-475T; 5-476T; 5-477T.

Refer to FM 21-6 for explanation of distribution formula.

TABLE OF CONTENTS

PART ONE

INTRODUCTION

Paragraph

Page

SECTION I.

GENERAL

Scope

1

1

Records

2

1

SECTION II.

DESCRIPTION AND DATA

Uses of flame throwers

3

1

Characteristics and employment

4

4

Description and functioning

5

6

Identification information

6

9

Differences in models

7

9

Interchanging parts with M1 or M1A1 flame thrower

8

9

Data

9

9

SECTION III.

TOOLS, PARTS, AND ACCESSORIES

Items with each flame thrower

10

11

PART TWO

OPERATING INSTRUCTIONS

SECTION IV.

GENERAL

Scope

11

14

SECTION V.

SERVICE UPON RECEIPT OF EQUIPMENT

New equipment

12

14

Used equipment

13

15

SECTION VI.

CONTROLS

Controls

14

15

SECTION VII.

OPERATION UNDER USUAL CONDITIONS

Training

15

16

Charging, filling, and servicing

16

16

Connecting tank group and gun group

17

16

Loading with ignition cylinder

18

17

Carrying the tank group

19

21

Carrying the gun

20

21

Opening pressure-tank valve

21

22

Ranges

22

22

Wind deflection

23

22

Firing positions

24

23

Aiming

25

23

Firing

26

23

Ceasing or interrupting fire

27

26

Additional bursts

28

26

Soaking the target

29

26

After firing

30

26

SECTION VIII.

AUXILIARY EQUIPMENT

Ignition cylinder

31

27

Charging pressure tank

32

28

Precautions when pressure-charging

33

32

Characteristics of fuels

34

33

Preparation of thickened fuels

35

34

Preparation of liquid fuels

36

38

Filling by pouring

37

39

Filling by force pump

38

40

Filling by blowing

39

40

Precautions with fuels

40

43

SECTION IX.

OPERATION UNDER UNUSUAL CONDITIONS

Wet conditions

41

44

Dust and mud

42

44

Heat

43

44

Cold

44

45

Wind

45

45

SECTION X.

DEMOLITION TO PREVENT ENEMY USE

Destruction procedure

46

45

PART THREE

MAINTENANCE INSTRUCTIONS

SECTION XI.

GENERAL

Scope

47

46

SECTION XII.

SPECIAL ORGANIZATIONAL TOOLS AND EQUIPMENT

Service kit

48

46

SECTION XIII.

LUBRICATION

Lubrication

49

49

SECTION XIV.

PREVENTIVE MAINTENANCE SERVICES

General

50

49

Before-operation service of tank group

51

50

Before-operation service of gun group

52

50

Service when filling and charging

53

52

Service when firing

54

53

Service after firing

55

53

Service after six firing missions

56

54

SECTION XV.

TROUBLE SHOOTING

Precautions

57

55

Fuel leaks

58

55

Safety head “blows” (breaks)

59

56

Carrier uncomfortable

60

56

Short range

61

56

Fuel-valve failure

62

57

Failure of ignition cylinder to ignite

63

57

Failure of fuel to ignite

64

58

SECTION XVI.

TANK GROUP

General

65

58

Pressure tank and valve assembly

66

59

Pressure regulator

67

63

Fuel-tank assembly

68

65

Filling and safety-head plug assemblies

69

67

Tank coupling

70

69

Carrier

71

71

SECTION XVII.

GUN GROUP

General

72

74

Fuel-hose assembly

73

74

Valve grip

74

75

Barrel and valve-body assembly

75

77

Ignition head

76

82

APPENDIX

SECTION XVIII.

SHIPMENT AND STORAGE

Shipment and storage

77

86

SECTION XIX.

LIST OF REFERENCES

References

78

87

INDEX

Fig 1. Portable flame thrower M2-2.

PART ONE

INTRODUCTION

Section I GENERAL

1. SCOPE.

a. Arrangement. This manual is published to guide and inform personnel using and maintaining flame thrower, portable, M2-2. Part One contains general information; Part Two is a guide to operation; Part Three gives maintenance procedures. The Appendix discusses shipment and storage procedures, and applicable publications.

b. References. References are listed in the Appendix. The list includes field manuals, technical manuals, and Army Regulations.

2. RECORDS.

Although no standard maintenance forms and records are furnished, an improvised list should be kept of the number of times each flame thrower has been fired. The list indicates when it is necessary to provide the after-six-missions preventive maintenance and lubrication. It should be tacked or glued to the inside surface of the packing-chest lid and each flame thrower should always be returned to its own chest.

Section II DESCRIPTION AND DATA

3. USES OF FLAME THROWERS.

Flame throwers can: a. Penetrate openings, such as embrasures and gun ports, and fill the fortifications with flame and smoke.

b. Burn, asphyxiate, and blind enemy personnel, causing casualties, shock, panic, and abandonment of a fortified position.

c. Ignite combustible parts of shelters and materiel and start detonation of sensitive ammunition and explosives.

Fig 2. Firing with liquid fuel.

Fig 3. Firing with thickened fuel. Thickened fuel has longer range than liquid fuel and burns on target for several minutes.

d. “Shoot around corners,” when fuel is fired from dead or blind angles. This is made possible by the billowing and swirling movements of flaming gases. Blazing thickened fuels also ricochet from wall to wall in fortifications.

e. Cause the enemy to close ports, temporarily putting the emplacement out of action and thus protecting the demolition party.

f. Mop up dug-in personnel.

g. Eliminate enemy nests in street or jungle fighting.

4. CHARACTERISTICS AND EMPLOYMENT.

a. Action. Fuel is propelled into the target by a charge of highly compressed air or nitrogen. As fuel leaves the gun of the M2-2 portable flame thrower (Fig 1), it is ignited by contact with flame from charges of incendiary mix held in an expendable ignition cylinder.

b. Bursts. A continuous stream or separate bursts may be fired for approximately 8 to 9 seconds, not including time between the bursts. The five incendiary charges in the ignition cylinder are controlled by the trigger and can ignite several bursts.

c. Range. Portable flame throwers are fired at extremely close or point-blank range for best results. (Par 22) Effective range for liquid fuels (Fig 2) is as far as 20 yards, and for thickened fuels (Fig 3), 40 yards, but underbrush and adverse winds can reduce the distances.

d. Weight. To keep the weight as light as possible and still provide strength to withstand very high pressures, most parts are made of aluminum or sheet steel.

e. Tactics. Two or more flame throwers are generally used on a mission with other weapons of the assault squad. (See FM 31-50, “Attack on a Fortified Position and Combat in Towns.”)

f. Firers and assistants. One man carries and fires each flame thrower. Well-armed assistants accompany firers to give close protection and to serve as emergency replacements. Whereas the M1A1 portable flame thrower may require the help of an assistant to open the pressure-tank valve, the M2-2 flame thrower pressure-tank valve is located within reach of the firer and is operated by him without assistance. Firers and assistants should be thoroughly trained in operation of the weapon.

Fig 4. Tank group.

g. Charging and filling. In order to replace pressure tanks (cylinders) of earlier types of flame throwers, it is necessary to unscrew and screw threaded connections. Experience has shown that this frequently resulted in damage to threads, leakage, loss of pressure, and loss of range. It is also necessary to use tools to replace each pressure tank (cylinder). The design of the M2-2 flame thrower eliminates these difficulties. The tank group (Fig 4) may be charged and filled as a unit with or without gun and hose. The quick-connecting tank coupling permits rapid interchanging of empty and full tank groups by the firers or assistants. This is done without tools, takes very little time, and cannot cause leakage, loss of pressure, and loss of range due to damaged threads.

5. DESCRIPTION AND FUNCTIONING.

The flame thrower consists of two major groups: tank group and gun group. Detailed descriptions of assemblies and parts are included in Paragraphs 66 through 76.

a. Tank group. (Figs 4 and 5) Carried upon the firer’s back, the tank group holds fuel and pressure. The tank group may be identified as tank, fuel, portable flame thrower, M2, assembly D81-1-482. It consists principally of:

(1) Two fuel tanks, holding a total of 4 gallons of fuel, and joined by a tank connector to form a single fuel reservoir.

(2) Pressure tank, charged with highly compressed air or nitrogen used to propel fuel from the fuel tanks through the gun to the target. The tank is large in capacity to assure ample pressure and uniformly long range throughout the firing.

(3) Pressure-tank valve, which releases air or nitrogen through the pressure regulator to the fuel tanks. The valve can be opened by the firer without the assistance required in the case of the M1A1 flame thrower.

(4) Pressure regulator, which automatically assures delivery of air or nitrogen to the fuel tanks at the proper pressure. The regulator is located in a position where it cannot easily be damaged.

(5) Carrier, which supports the tank group on the firer’s back and shoulders and secures it to his body. It includes body and shoulder straps and quick-releasing fasteners.

b. Gun group. (Fig 6) Carried, aimed, and operated by the hands of the firer, the gun group ignites the fuel and directs the flame into the target. It includes:

(1) Fuel hose, which conveys fuel from the tank group to the gun. The fuel hose may be requisitioned as hose, fuel, portable flame thrower, M1, assembly B81-1-498.

(2) Gun, which ignites the fuel and directs it to the target. The gun may be identified as gun, portable flame thrower, M2, assembly D81-1-405. It consists of:

(a) Fuel valve, which discharges fuel through the barrel. The valve is operated by squeezing the valve lever and the grip safety, which are on opposite sides of the valve grip. The valve also includes a barrel from which the fuel is ejected. The ignition head is supported on the front of the barrel.

(b) Ignition head, which ignites the fuel as it passes from the nozzle of the barrel. With each pull of the trigger on the front grip, one of five charges of incendiary mix in an ignition cylinder is ignited. This pilot flame ignites the fuel as it is propelled from the gun.

Fig 5. Tank group with carrier folded back to show construction.

Fig 6. Gun group of portable flame thrower M2-2.

6. IDENTIFICATION INFORMATION.

The words “Chemical Warfare Service,” model numbers, serial numbers, lot numbers, weight, cubage, manufacturers’ names, contract number, and date of packing are indicated on the packing chest or the equipment. The numbers and letters shown on the equipment should be referred to when repairs are required. The tank group and the gun (without the fuel hose) may each be marked “M2” and the fuel hose may be marked “M1,” although all of these are components of the M2-2 portable flame thrower.

7. DIFFERENCES IN MODELS.

a. M2-2 and E3 portable flame throwers. Portable flame thrower M2-2 is identical in all important respects with portable flame thrower E3. (The E3 flame thrower, when standardized with some modifications, became the M2-2.) Operation and maintenance of the M2-2 and E3 are in general the same, and the parts are interchangeable.

b. M2-2, M1, and M1A1 portable flame throwers. Portable flame thrower M2-2 has the same fuel capacity but differs in construction from portable flame throwers M1 and M1A1. Parts are not interchangeable except as stated in Paragraph 8.

8. INTERCHANGING PARTS WITH M1 OR M1A1 FLAME THROWER.

To use an M2-2 gun with tank group (fuel unit) of an M1 or M1A1 portable flame thrower:

a. Remove fuel hose from M2-2 gun.

b. Screw a 3/4-inch by 1/2-inch pipe bushing into the side opening of the fuel-valve body. This bushing is furnished in the spare parts kit of each M2-2 portable flame thrower. (Par 10)

c. Screw the fuel-hose assembly of the M1 or M1A1 flame thrower into the 1/2-inch opening of the bushing, using a wrench to make a tight connection.

9. DATA.

All data are approximate.

a. Range. See Paragraph 22.

b. Duration of fire.

(1) Fuel.

(a) Continuous discharge of approximately 8 to 9 seconds, or

(b) Several short bursts totalling approximately 8 to 9 seconds (not including time between bursts).

(2) Ignition cylinder. Five charges in each cylinder, 8 to 12 seconds per charge.

c. Weights.

Pounds

Portable flame thrower M2-2, empty, in shipping chest (including the chest and all contents)

110

Portable flame thrower M2-2, empty

43

Portable flame thrower M2-2, filled with fuel

68 to 72

Tank group, empty

35

Tank group, filled with fuel

60 to 64

Gun group

8

d. Dimensions.

Inches

Gun, length

30

Fuel hose, length

37

Tank group, height

27

Tank group, width

20

Tank group, breadth

11

Packing chest

(Cube of packing chest: 8-1/2 cubic feet)

34 x 23 x 19

e. Capacity of weapon.

Ignition cylinder (M1 or E1)

1 (which includes 5 incendiary charges)

Fuel

4 gallons plus void for air or nitrogen

f. Pressures.

Pounds per sq. in.

Pressure tank

1,700 to 2,100

Fuel tanks

350

g. Ratio of expended supplies. For every 100 complete fillings of the flame thrower, the following supplies are normally expended:

(1) Nitrogen contained in fifteen 220-cubic-foot cylinders or an equivalent volume of compressed air. (Eleven cylinders are expended if the four-place arrangement described in Paragraph 32 is used.)

(2) 450 gallons of fuel (400 gallons plus 50 gallons for spillage, spoilage, and evaporation).

(3) 100 ignition cylinders.

(4) If thickened fuel is used, 135 pounds (in cans of 5-1/4 pounds each) of U. S. Army fuel thickener.

Section III TOOLS, PARTS, AND ACCESSORIES

10. ITEMS WITH EACH FLAME THROWER.

The items listed below or their equivalents (Fig 7) are included in each M2-2 flame-thrower packing chest, in addition to the flame thrower. Numbers listed with items are Chemical Warfare Service stock numbers.

a. Kit, tool, for portable flame thrower M2-2, assembly B81-6-50.

b. Kit, spare parts, for portable flame thrower M2-2, assembly B81-6-52.

c. Cylinder, ignition, portable flame thrower M1. (6 cylinders, in 3 cans containing 2 each)

d. Technical Manual 3-376A, “Portable Flame Thrower M2-2.”

e. Gun mounting board. (Fig 10)

f. Plug, coupling, E81-1-514 (for use in tank coupling when filling tank group with gun detached).

Fig 7. Items packed in chest with each flame thrower: A—Spare parts kit; B—Packing list; C—Three cans of ignition cylinders; D—Tool kit; E—Coupling plug; F—TM 3-376A, “Portable Flame Thrower M2-2.”

Fig 8. Contents of tool kit:

A. 1 Screw driver, cabinet, 4-1/2-inch blade length, 3/16-inch blade diameter, H22-50-13.

B. 1 Wrench, hex, 1/8-inch across flats for 1/4-inch socket-head set screws, H22-49-12.

C. 1 Wrench, engineers’, double head, 3/4-inch and 7/8-inch openings, 9 inches approx length, H22-49-115.

D. 1 Screw driver, common, 6-inch blade length, 5/16-inch blade diameter, H22-50-6.

E. 1 Wrench, valve-adjusting, assembly, A81-6-48.

F. 1 Wrench, heavy “S”, 1-3/8-inch and 1-1/2-inch openings, 12 inches approx length, H22-49-113.

G. 1 Wrench, engineers’, single head, 1-1/8 inch opening, 10-1/2 inches approx length, H22-49-31.

H. 1 Wrench, adjustable, single end, 6 inches approx length (crescent type), H22-49-67.

I. 1 Wrench, heavy “S”, 1-3/8-inch and 1-3/4-inch openings, 12 inches approx length, A81-6-49.

Fig 9. Contents of spare parts kit:

A. 1 Diaphragm, valve, assembly, A81-1-416.

B. 1 Case, spring, assembly, B81-1-444.

C. 1 Bushing, pipe, head, 3/4-inch by 1/2-inch (galvanized iron), H98-5-93.

D. 2 Washers, coupling, A81-1-513.

E. 3 Heads, safety, R81-1-561.

Fig 10. Packing chest open, with gun on mounting board. Tool kit, spare parts kit, and cans of ignition cylinders in boxes at right.

PART TWO

OPERATING INSTRUCTIONS

Section IV GENERAL

11. SCOPE.

Part Two of this manual is for the guidance of operating personnel. It includes information on the controls and on operation.

Section V SERVICE UPON RECEIPT OF EQUIPMENT

12. NEW EQUIPMENT.

Upon receipt of a new flame thrower, the following procedure should be carried out:

a. Cut packing-chest steel straps and seals with pliers.

b. Remove the screws, if present, from top of chest.

c. Open two latches at front of chest.

d. Lift lid backward and connect chain from inside of chest to inside of lid.

e. Remove moistureproof paper.

f. Remove gun from carton. After removing waterproofing tape from ends of hose, connect hose and gun. (Par 17)

g. Remove mounting board and place gun with hose on the board as shown in Figure 10.

Fig 11. Screwing deflector tube in safety head on left fuel tank.

Fig 12. Controls for operation of portable flame thrower M2-2.

h. Remove spare parts kit, tool kit, cans of ignition cylinders, and other items from packing chest.

i. Compare contents with packing list found in or on packing chest. Inspect all contents carefully for completeness, correct adjustment, and good condition.

j. Insert deflector tube in safety head on left fuel tank. (Fig 11) Outlet should face to rear and at a 45-degree angle to operator’s left shoulder. (Fig 18) Screw in deflector tube by hand; do not use wrench on deflector tube. Tighten lock nut with wrench.

k. Before use on a mission, test-fire the weapon. (Par 56 b)

l. Save the packing chest for storage of the equipment when flame thrower is not being carried on a firing mission or serviced.

13. USED EQUIPMENT.

When they apply, the same steps should be taken as in Paragraph 12. Any worn or damaged parts should be replaced. Areas where paint has worn off should be touched up with fresh paint.

Section VI CONTROLS

14. CONTROLS.

The firer uses the pressure-tank valve handle, the trigger, and the valve lever and grip safety (Fig 12) in succession as follows:

a. Valve handle. The pressure-tank valve is operated by turning a handle on the valve flexible shaft within reach of the firer. Counterclockwise operation of handle releases pressure to the fuel tanks. Clockwise turning closes the valve.

b. Trigger. The trigger is at the front grip of the gun. Pulling the trigger vigorously ignites an incendiary charge in the ignition cylinder. This in turn ignites the fuel as it leaves the gun. The trigger action also causes the ignition cylinder to revolve one-fifth of a turn, presenting another charge for firing. Each of the five charges may thus be used in rapid succession, if necessary, by pulling the trigger vigorously as many as five times.

c. Valve lever and grip safety. The valve lever and grip safety are mounted on opposite sides of the valve grip of the gun. When both controls are compressed, fuel is propelled from the gun. If either the valve lever or the grip safety is not compressed, the fuel valve remains closed and the fuel remains in the weapon.

Section VII OPERATION UNDER USUAL CONDITIONS

15. TRAINING.

Effective use of the M2-2 portable flame thrower can be achieved only by diligent practice with the weapon. Untrained firers or assistants should never be sent on a mission.

a. Practice. Firers should practice under varying conditions of wind, range, elevation, depression, and traverse. The shortness of the total firing time (approximately 8 to 9 seconds) demands split-second judgment and coordination.

b. Use of water in training. Water may be used (instead of fuel) for elementary practice firing. Ignition cylinders are not used with water. The water under pressure may cause serious injuries to personnel at 10 yards. After practice with water, the gun should be disassembled (Pars 73 through 76), cleaned and dried piece by piece, and lubricated. (Par 49)

c. Use of fuel in training. When using fuel in training, select or prepare a practice field of fire which provides at least 125 yards for range and 30 yards for spread. If the field contains dry grass, brush, or other flammable material, a fire-fighting squad should be available with equipment and source of water. Assistants and observers should stay well behind the firer because of danger from wind shifts. See Paragraph 40 for additional precautions.

16. CHARGING, FILLING, AND SERVICING.

Before use on missions or for training, flame throwers must be charged, filled, and serviced. Charging with compressed air or compressed nitrogen is described in Paragraphs 32 and 33; filling with fuel in Paragraphs 34 through 40; and servicing in Paragraphs 50 through 56. Test for pressure. (Par 53 d)

17. CONNECTING TANK GROUP AND GUN GROUP.

If a charged and filled tank group has been brought up to replace an emptied one:

a. Place the new tank group on the ground with the tank coupling on top. If the filling is thickened fuel, allow the tank group to rest in this position for from 1 to 2 minutes.

b. Remove coupling plug from new tank group and disconnect gun group from emptied tank group. Place unthreaded end of fuel hose in tank coupling and lock in place. (Par 70)

c. Lock the coupling plug in the emptied tank group.

18. LOADING WITH IGNITION CYLINDER.

a. General. Just before the start of a mission, load an unused ignition cylinder into the ignition head. (M1 and E1 ignition cylinders are identical and may be used interchangeably.) Cylinders are packed two to a can. Do not open cans until ready to load for a mission. The second cylinder in the can should be used in another flame thrower on the same mission or as soon as possible after opening the can. Partly used cylinders may be employed in training.

b. Precautions. Care must be taken, whenever cylinders are handled, to avoid any blows or pressure against the metal match ends. (Fig 13) Face, hands, and other parts of the body should never be exposed to front of cylinder or front of gun.

Fig 13. Ignition cylinder before use.

c. Procedure. Loading procedure is as follows:

(1) Unscrew and remove ignition shield. (Fig 14)

(2) Place ignition cylinder on end of barrel (Fig 15), being careful not to grasp cylinder by its ends.

(3) Raise nozzle end of gun so cylinder slides down against the spring case of the ignition head. (Fig 16) If necessary, rotate cylinder so it slips down all the way. Do not force cylinder into place as forcing may prematurely ignite it.

(4) Rotate spring case and ignition cylinder clockwise as far as they turn freely.

(5) Place ignition shield over cylinder. Engage the slot in the shield on the spring-case pin.

(6) Turn shield, screwing it onto ignition-head body. Make sure the threads engage during the first turn of the shield. When the slot on the shield engages the latch on the ignition head (Fig 17), the gun is loaded.

(7) If shield cannot be turned by hand tight enough to engage latch, unscrew shield. Then turn shield backwards until threads engage and repeat (6) above.

Fig 14. Unscrewing ignition shield, with pressure on latch.

Fig 15. Placing ignition cylinder on gun. Care must be taken to avoid striking or pushing metal matches of cylinder.

Fig 16. Ignition cylinder in place on gun before replacement of ignition shield.

Fig 17. Ignition head assembled for firing of gun.

Fig 18. Tank group adjusted on firer.

19. CARRYING THE TANK GROUP.

The tanks are supported on the firer’s back and secured to it by two shoulder straps and two pairs of body straps. (Fig 18) The straps may be adjusted by the buckles to fit the operator. The shoulder straps pass over the shoulders and under the arm pits; the lower body straps are clasped tightly in front of the body; and the upper body straps are clasped across the chest to prevent the shoulder straps from slipping and the tank group from rolling off the back. Adjustments to the various straps should be made until the unit is carried with the bottom of the fuel tanks at the small of the operator’s back. The tank group should fit snugly so that it does not shift if the operator changes position quickly.

20. CARRYING THE GUN.

Fig 19. Carrying the gun, with hands in position to fire.

The procedure for carrying the gun is as follows:

a. Carry the gun with the hose at the right side. (Fig 19)

b. Grasp the valve grip with the right hand and the front grip with the left hand, being careful not to operate the controls until ready to fire.

c. Keep the gun pointed away from friendly personnel at all times.

d. Do not face the front of the gun at any time. Even when no fuel is being ejected, the incendiary charges of the ignition cylinder can cause severe burns.

e. Keep the gun dry and clean if possible. Avoid getting dirt or foreign matter into the weapon.

f. Avoid rough handling.

g. Wear gloves if available.

h. Carry any extra ignition cylinders only in metal containers.

21. OPENING PRESSURE-TANK VALVE.

The release of pressure into the fuel tank causes a hissing sound. Therefore, open the pressure-tank valve while still out of hearing range of the enemy. Do not, however, open it prematurely because of the possibility of pressure leaks. To prevent frothing of the fuel, keep the tank group in as nearly an upright position as possible when opening pressure-tank valve. Be sure to turn the valve handle all the way in a counterclockwise direction. Stiffening of the fuel hose occurs when the pressure-tank valve is opened.

22. RANGES.

Firers and assistants should learn to judge ranges by frequent practice under varying conditions. The firers should be trained to approach as close as practicable to the target and to fire if possible at point-blank range for the greatest results.

a. Point-blank range.

(1) Effects. At very close (point-blank) range almost all of the burning fuel can be fired at great velocity directly through ports and openings into the target. Maximum casualties and damage are caused in the hostile position.

(2) Protection. Common sense precautions are taken to prevent casualties to friendly personnel from possible ricochet or rebounding of flame. If the target includes a vertical wall at a right angle to the firer or other friendly personnel, the weapon should not be fired at closer than 7 to 10 yards. When the weapon is fired at small openings in a bunker or pillbox, the firer and other members of the assault squad should not approach closer than 7 to 10 yards from the target.

b. Other effective ranges.

(1) Open fields of fire. When thickened gasoline is used, portable flame throwers may fire with considerable effect as far as 40 yards under normal conditions, depending on wind direction and wind speed. Under the same conditions, liquid fuel maybe effective at 20 yards. Results and accuracy are not as great as at point-blank range.

(2) Jungle or thick underbrush. If the target is located in jungle or thick underbrush without cleared fields of fire, the effective range of the flame thrower is reduced by as much as one half, depending on the nature and density of the vegetation.

c. Ineffective ranges. Although the flame may reach considerably farther than the ranges stated in b (1) above it may be useless because of the steep angle of descent and because much of the fuel is burned before it reaches the target.

23. WIND DEFLECTION.

Wind is an important factor because of the low velocity of the flaming fuel. Wind can lengthen, shorten, or deflect the flame.

a. Head winds. Head winds of more than 5 miles per hour tend to carry heat or even flame back toward the firer. Liquid fuel should not be fired into a head wind of more than 5 miles per hour. The range and accuracy of thickened fuels is reduced.

b. Following winds or very light winds. Best results are obtained under these conditions.

c. Cross winds. When firing at or near maximum range, cross winds deflect, breakup, and disperse the flame. They also reduce the range.

24. FIRING POSITIONS.

a. Ease of aiming. The flame thrower can be fired from any position that permits sufficient freedom to aim the weapon, subject to the conditions in b, c, and d, below. This includes standing, kneeling, and prone. In some instances, flame throwers have been fired with tank groups resting on the ground or on skids. If used in this way, the tops of the fuel tanks must be propped up to conform to b, below.

b. Angles of the tanks. When firing, the bottoms of the fuel tanks must always be substantially lower than the tops. The tops of both tanks must also each be the same distance above the horizontal and neither tank should be tilted to one side. Otherwise, only a small part of the fuel may be blown from the tanks.

c. Recoil. Stability must be sufficient to withstand the recoil from the gun. If possible, the firer should hold the gun snugly against his right side to support it and to absorb its recoil.

d. Protection. Full advantage should be taken of cover and concealment, such as shell craters and vegetation.

25. AIMING.

a. Sighting. There are no sights on the gun because of the short range from which it is fired, the variety of fuels used, and the marked effects of wind. (Par 23)

b. Fortifications. When firing at a fortified position, flame must be directed into openings (gun ports, firing slits, ventilation screens, doorways). Flame inside gives the desired effects, but flame on the outside has little effect on personnel within.

c. Thickened fuel. (Figs 3 and 20) When firing at or near maximum range, it may take several seconds for a burst of thickened fuel to carry through the air to the target area. Short bursts may result in misses at long range for this reason. Skill in aiming is particularly important with thickened fuel.

d. Liquid fuel. With liquid fuel, the greatest effect may be obtained by placing the flame directly on the target. (Fig 21)

Fig 20. Thickened fuel flame hitting and clinging to target. Fuel burns for several minutes.

Fig 21. Flame (liquid fuel) hitting target.

26. FIRING.

With pressure-tank valve open:

a. Pull trigger. Pull the trigger rapidly and vigorously. A flash should appear at the front of the gun. This shows that an incendiary charge of the ignition cylinder has been ignited. Release the trigger. (If the flash does not appear, pull the trigger again, or as often as necessary up to five times, until a flash appears.)

b. Squeeze fuel valve. Immediately after pulling trigger, compress the valve lever and grip safety vigorously with the right hand. Burning fuel will be propelled from the gun.

c. Adjust fire. Direct the flaming fuel at the target. Continue to squeeze the valve lever and grip safety throughout the burst. When thickened fuel is fired, follow the fuel with eyes to the side of the stream in order to observe and correct aim. (If eyes are directly behind the stream, the flame may obscure the target.)

27. CEASING OR INTERRUPTING FIRE.

To cease or interrupt firing, release the controls.

28. ADDITIONAL BURSTS.

To fire additional bursts, repeat procedure followed in Paragraphs 26 and 27, keeping in mind that there are five incendiary charges in the ignition cylinder and that the total firing time, not including time between bursts, is approximately 8 to 9 seconds. Each of the five incendiary charges in the ignition cylinder burns for from 8 to 12 seconds.

29. SOAKING THE TARGET.

When liquid fuel is used, it may be desirable to soak the target with fuel first and ignite it afterward. To do this, fire one or two short bursts without pulling the trigger. Then follow with an ignited burst, as in Paragraph 26.

30. AFTER FIRING.

When the firer has returned from his mission, he should:

a. Remove and discard the ignition cylinder, as follows:

(1) Point gun at the ground.

(2) Press latch. (Fig 14)

(3) Unscrew the ignition shield and allow ignition cylinder to fall out. (Be careful to keep the hands away from the front of the cylinder.)

(4) Save the partly used cylinder for training use or destroy it by firing from gun after fuel tanks have been emptied. For information on care, handling, and storage of cylinders, see Paragraph 31.

b. Close the pressure-tank valve by turning valve handle clockwise (to conserve remaining pressure in pressure tank).

c. Point the gun away from personnel and blow out the remaining fuel, if any, from the fuel tanks by squeezing the valve lever and grip safety until there is no further discharge. The trigger should not be used during this operation.

d. Take off tank group from the back.

e. Inspect, clean, and maintain the flame thrower (Pars 55 and 56) or, if experienced maintenance personnel is close at hand, turn the weapon over to them for servicing.

f. After servicing, place the weapon in the packing chest (Par 77) for protected storage, or prepare it for the next mission. (Pars 50 through 53)

Section VIII AUXILIARY EQUIPMENT

31. IGNITION CYLINDER.

a. Description and functioning. (Figs 13 and 22) Either the M1 or E1 ignition cylinder may be used. It fits over the fore part of the barrel assembly and is revolved by the spring case. (Par 76) The five incendiary charges in the cylinder are spaced sufficiently far apart in the plastic body to prevent their igniting one another. Lead-foil seals, plastic closure plates, and waterproof cement make the unit comparatively waterproof.

Fig 22. Cutaway view of ignition cylinder (M1 or E1).

b. Action. When the trigger rod is pushed forward, one of five metal matches tipped with red phosphorus scratches an igniting mixture. The ignition carries to a starter mix and to a few grains of black powder on top of the incendiary charge. The black powder blows the foil seal and closure plate clear of the flame thrower, and the incendiary charge ignites the fuel as it is discharged from the nozzle. The incendiary charge burns for from 8 to 12 seconds.

c. Packing. Ignition cylinders are packed two per waterproof can. Three cans are furnished with each flame thrower. Fifty cans (100 ignition cylinders) are contained in each packing box of extra cylinders.

d. Care, handling, and storage. Ignition cylinders contain hazardous incendiary material and must be handled with due care. The following precautions should be observed.

(1) Opening cans. Do not open cans containing cylinders until ready to load for a mission. (Par 18) If an extra cylinder remains in an opened can, use it as soon as possible. Any defective cylinders, such as those with damaged closure plates, should be destroyed. (Pars 30 and 46) Moisture may affect the cylinders and all possible care should be taken to avoid exposing them to dampness.

(2) Handling cylinders. Pressure on any of the five metal matches (Fig 13) may ignite an incendiary charge in the cylinder. Care must be exercised to avoid putting pressure on the projecting ends of the matches except when firing the weapon. Ignition cylinders and cylinder containers should be protected against shock. Boxes and cans containing cylinders must not be thrown or dropped.

(3) Storing containers. Containers of ignition cylinders are best stored in a dry, well-ventilated place, out of the direct rays of the sun, well protected against excessive temperatures. Smoking is not permitted and matches are not used where ignition cylinders are stored.

32. CHARGING PRESSURE TANK.

a. General. The pressure tank of the flame thrower must be fully charged with compressed air or compressed nitrogen before the start of a mission. For the M2-2 flame thrower, a pressure of at least 1,700 pounds per square inch is required. This may be provided either by the use of an air compressor capable of producing a pressure of at least 1,700 pounds per square inch, or by the use of commercial cylinders. The filling and charging lines from the service kit are used in conjunction with the cylinders. Before and after charging, follow the procedures described in Paragraphs 51 and 55.

b. Charging from air compressor. Compressor, air, gasoline engine driven, 7CFM, M1, is a self-contained, skid-mounted machine designed for use with flame throwers. It is capable of charging pressure tanks of flame throwers and large 200- or 220-cubic-foot commercial cylinders as well. Instructions for use of the compressor will be found in the manual accompanying it.

c. Charging from cylinders. If an air compressor is not available, it is necessary to use cylinders containing nitrogen or air.

(1) Volume and pressure. Cylinders come charged with 200 to 220 cubic feet of air or nitrogen. Since cylinders with 220 cubic feet of air or nitrogen have a higher initial pressure, it is recommended that they be procured, if obtainable. All cylinders used must have a pressure of at least 600 pounds per square inch. One or more of the cylinders must have a pressure of at least 1,800 pounds per square inch. Two or more cylinders, preferably at least four, should be used, if available.

(2) Charging capacity. Fully charged cylinders, if properly used in rotation, have capacity for charging pressure tanks approximately as follows:

1 cylinder (used alone)

2

pressure tanks

2 cylinders (in combination)

6

pressure tanks

4 cylinders (in combination)

24

pressure tanks

5 cylinders (in combination)

36

pressure tanks

6 cylinders (in combination)

48

pressure tanks

(3) Apparatus. The apparatus for charging two pressure tanks by the use of cylinders consists of a filling line, two charging lines, and two cylinders. (Fig 23) The filling line and charging lines are obtained from the service kit. (Par 48) Plugs are provided to close off either half of the filling line when only one flame-thrower tank group is to be charged.

(4) Warning. Oxygen is sometimes shipped in cylinders having the same threads as nitrogen cylinders. If oxygen not mixed with nitrogen, as in air, is introduced into the fuel tanks of the portable flame thrower, a violent explosion may result. Therefore, the greatest care must be exercised to see that only air or nitrogen is used. Before a cylinder is connected, it should be tested to determine that it does not contain straight oxygen or some combustible gas. This may be done by introducing a burning splint into a jet of the contents. Oxygen causes the splint to burn quickly, whereas nitrogen extinguishes the flame. To make the test:

(a) Fasten a thin splint of wood to a wire at least a foot long.

(b) Ignite the splint.

(c) Stand aside and hold it before the cylinder outlet.

(d) Crack the valve slightly to permit a small stream of gas to emerge.

(e) If the flame flares up, the gas is oxygen and MUST NOT be used.

(f) If the gas itself catches fire, it may be hydrogen, acetylene, or some other combustible gas, which also must not be used.

(5) Attaching lines to cylinders. (Fig 23) The procedure for charging two flame thrower pressure tanks from two cylinders of nitrogen or compressed air begins as follows:

(a) Remove the valve-protection caps from the cylinders.

Fig 23. Charging two pressure tanks, using charging and filling lines, and cylinders of compressed air or nitrogen.

(b) Place the cylinders side by side with both outlets facing in the same direction. (If the ground is not level enough for the cylinders to stand up side by side, lay them horizontally with both outlets face up.)

(c) Before attaching the filling line to the cylinders, blow out dust. (Par 33) Then connect, using wrenches to make the joints pressure tight. Do not kink or bend the flexible hose. Cylinders must be close enough together to prevent strain on the flexible hose.

(d) Attach a charging line to each of the two couplings on the filling line.

(6) Attaching charging lines to pressure tanks.

(a) Close pressure-tank valves.

(b) Unscrew caps from check valves.

(c) Screw the charging-line fittings onto the check valves.

(d) Close bleeders.

(7) Charging. The operation of charging two pressure tanks from two cylinders is as follows:

(a) Close both filling-line valves.

(b) Open cylinder valves.

(c) Determine which cylinder has the lower pressure by the gages. Open the filling-line valve at the gage showing the lower pressure and fill the pressure tanks to the pressure shown by the gage. Close the valve. Then open the other filling-line valve and fill the pressure tanks until they reach pressures of at least 1,700 pounds per square inch as shown by the gage.

(d) When the pressure tanks have been filled, close the filling-line valves. Open the bleeders on the charging lines and leave them open until the pressure in the charging lines is released. Then close bleeders. Remove the charging-line fittings from the check valves. Screw the threaded caps on the check valves and tighten caps with a wrench.

(e) Repeat steps in (a) through (d) above for as many pairs of empty flame-thrower tanks as require charging.

(8) To insure proper pressure. Care should be taken to make certain that the compression delivered to the flame-thrower pressure tank is a full 1,700 pounds per square inch.

(a) If a filling-line valve leaks, tighten the packing nut on the valve with a wrench.

(b) When the higher pressure shown on the filling-line gages is less than 1,700 pounds per square inch, close the filling-line valve and the cylinder valve on the cylinder having the lower pressure. Remove and replace this cylinder with a fully charged cylinder. With chalk, mark the pressure on the cylinder which has been withdrawn.

(9) After charging. When charging has been completed:

(a) Close the filling-line valves. Observe the pressure indicated on each gage and mark the pressure on each cylinder using crayon, chalk, or pencil.

(b) Close the valves on the cylinders.

(c) Remove the charging-line fittings from the check valves, replace the threaded caps on the check valves, and tighten caps with a wrench.

(d) Remove the filling lines from the cylinders. Use two wrenches and take care not to twist or kink the flexible hose. Support the lines during the operation so that their full weight does not hang on the flexible hose during removal.

Fig 24. Arrangement of cylinders and lines for charging four flame throwers. Flexible hose (assembly E81-3-6) from service kit is used to connect two filling lines.

(10) Use of four-place lines. (Fig 24) The filling and charging lines found in two or more service kits may be combined for more efficient charging of large numbers of pressure tanks. An additional flexible hose is provided in each service kit for connecting two filling lines. The procedure for charging is similar to that described above for the two-place line. Air or nitrogen is taken first from the cylinder with the lowest pressure and last from the cylinder with the highest pressure. See a (2) above.

33. PRECAUTIONS WHEN PRESSURE-CHARGING.

Personnel will familiarize themselves with the following precautions:

a. Handling. Handle all cylinders and flame throwers carefully; never drop them and never subject them to shocks or blows. Keep valve-protection caps secured when cylinders are being handled, except when such handling is incident to the use of the nitrogen or air.

b. Storage. Keep all cylinders and charged flame throwers or tank groups (Par 77) in open or closed storage. They must, however, be protected from dampness and excessive rise in temperature caused by the direct rays of the sun or other source of heat. Avoid storing them near highly flammable substances, or in places where they may be struck by moving objects. Segregate empty cylinders to avoid confusion.

c. Personnel. Do not attempt to use compressed gases unless trained in this work. Use gases only for the purposes for which they are intended.

d. Cylinder valves. Do not tamper with safety devices in cylinder valves. If available, use the proper replacement parts for safety devices which are in need of repair. If such parts are not available, do not attempt to use makeshifts or nonstandard parts.

e. Opening of valves. Open valves slowly and fully each time nitrogen or compressed air is transferred from a cylinder. When a wrench is used, be sure it is one that fits properly, and that it is kept ready for instant use while the compressed gas is being released.

f. Threads. See that threads match before making connections. Some valves are provided with special threads which must be matched by the threads in the equipment being connected.

g. Correct equipment. Use gages, regulators, hose, pipe, and tubing of the type manufactured or specified for the particular apparatus or compressed gas.

h. Repair. Never attempt to alter or repair a cylinder.

i. Flames and sparks. Do not permit flames, sparks, or ignition from the flame thrower or other source to touch hose.

j. Blowing out dust. Immediately before coupling an attachment to the pressure tank or cylinder valve, open it for an instant to blow out any dust or dirt. Never stand where gas or dirt may be blown into the eyes or face. If the valve is difficult to open, apply more force gradually.

k. Special devices. Do not attempt to use any special connections or equipment without the approval of a qualified expert.

l. Keeping valves closed. Keep the valve of each cylinder closed when its contents are not actually being released from or admitted to the cylinder. This applies alike to all cylinders, whether they contain a compressed gas or are empty.

34. CHARACTERISTICS OF FUELS.

Thickened fuels give up to twice the range of liquid fuels. The stream of thickened fuel is comparatively narrow. Most of the glue-like fuel clings to and burns in or on the target for as long as 6 minutes. Liquid fuels, on the other hand, are largely consumed in flight to the target. If the location of small openings in the target is known, the stream of thickened fuel can be spotted by accurate aiming so that most of the fuel enters directly into the openings. While it does not billow around corners as does liquid fuel, thickened fuel strikes the target with force enough to ricochet inside. It clings to skin and clothing while burning. It also has excellent incendiary effects. The initial flame and smoke are less from thickened fuel than from liquid fuel, but the lower visibility, greater range, and much longer burning period of thickened fuel compensate for its smaller screening effect. Liquid fuels are easier to pour when filling than are thickened fuels.

35. PREPARATION OF THICKENED FUELS.

a. Ingredients. Thickened fuels consist of U.S. Army fuel thickener mixed with fuel.

(1) Thickener. U.S. Army thickener is supplied in airtight cans, each containing 5-1/4 pounds of the material.

(2) Gasoline and fuel oil. Gasoline alone is often used with thickener, but mixtures of gasoline and light fuel oil may be used satisfactorily. The light fuel oil can be either No. 1 fuel oil, No. 2 fuel oil, automotive diesel oil, or kerosene. These mixtures give more heat and do not form crusts. Except in hot climates, 75 percent or more of the mixture by weight or volume should be gasoline. (If too much light fuel oil is included, the fuel tends to separate into two layers.) In tropical theaters, a thickened blend of 50 percent gasoline and 50 percent light fuel oil has been reported to give favorable results. Storage qualities are not known, however. Another mixture which has been well recommended in field reports is 15 gallons of gasoline to 5 gallons of diesel fuel oil. Issue gasoline may be used, but locally procured gasolines which contain alcohol are not suitable.

b. Proportion of thickener to fuel. Less thickener is recommended than formerly. A low ratio of thickener gives a thickened fuel with many of the characteristics of liquid fuel. One can of thickener to 20 U.S. gallons of gasoline, or gasoline and light fuel-oil mixture, gives good results. This is a 4.2 percent by weight mixture. Except in hot weather, a fuel mixture of less than 3 percent thickener requires such long stirring that its preparation is impractical.

c. Equipment. An open-head 55-gallon or 42-gallon drum and an improvised wooden mixing paddle are used. Five-gallon cans may be employed to transfer the ingredients. The paddle should be approximately 5 feet long, 2 inches wide, and 1 inch thick. If a standard 55-gallon, open-head drum with an internal diameter of 27-7/16 inches is used, the improvised paddle should be marked to indicate gallons as follows:

Gallons

Inches

40

23-1/2

20

11-3/4

Do not use a metal paddle because of the danger of striking a spark from the drum. Never use galvanized containers for mixing and storing thickened fuels. These may cause the fuel to break down and become excessively thin. An improvised funnel may be helpful in filling drums with prepared fuel for aging or transporting.

d. Temperatures.

(1) Below 50 degrees. If the temperature is below 50 degrees Fahrenheit, it is helpful to prepare thickened fuel indoors, in a heated room. All precautions should be particularly observed. (Par 40)

(2) Above 90 degrees. When the fuel is hotter than 90 degrees Fahrenheit, the thickener reacts very rapidly. In this case, it is easier to prepare batches of 20 gallons each, but any number of batches may be prepared in succession.

e. Moisture.

(1) Effect of moisture. Water in thickened fuel breaks down or reduces the viscosity of the gel and thereby reduces the range of the flame thrower. This effect may not be noticeable at once, but the stability of the fuel is affected.

(2) Dryness of thickener. Dry thickener is extremely hygroscopic, that is, it absorbs moisture from the atmosphere very rapidly. For this reason, thickener is shipped in hermetically sealed tin cans containing the exact quantity of powder required for mixing with 20 gallons of fuel to prepare a 4.2 percent mixture. It is important that the gasoline or fuel oil and gasoline be measured out before the thickener container is opened. The powder then should be poured immediately into the liquid.

(3) Dryness of containers. It is important that all containers used in mixing and handling the fuel be dry.

(4) Keeping water out of gasoline. Gasoline, especially when it has been stored in vented containers, frequently includes free water. Therefore, when using gasoline from a bulk-storage tank or an open drum, first place it in a clean, dry drum; allow it to stand quietly for at least an hour; then carefully pour off the gasoline from the top and discard the last gallon or two.

f. Pouring and stirring. (Fig 25) The liquid fuel is poured into the open drum; a pail or a paddle (Par 35 c) is used for measuring. One man then stirs the fuel vigorously. Another takes a can of thickener, splits it with a machete, bayonet, or ax, and pours it immediately into the fuel. Any large lumps of powder are broken by hand before the powder is added to the fuel. When mixing 40 gallons at a time, the two cans of thickener should be opened and added to the fuel in rapid succession. If the contents of the first can are permitted to gel before adding the second can, it will be difficult to obtain a uniform mix. Continue to stir.

Fig 25. Measuring fuel ingredient into mixing drum. Paddle for measuring and stirring is improvised.

Fig 26. Transferring newly mixed thickened fuel from mixing drum to storage or shipping container for aging.

g. Examining fuel. Lift the paddle quickly. If the mixture drops or runs from the paddle, additional stirring is necessary. When the paddle comes out clean, except for an adhering film, stirring should be stopped, provided there is no further visible settling of particles of thickener.

h. Loading shipping drums. When stirring is completed, the mix is immediately bucketed (Fig 26) through a funnel into the shipping drum. The second bung hole should be open, if possible, to provide a vent to aid in pouring. Two men do the bucketing, each handling one pail so that the funnel may be kept loaded with mix and the shipping drum filled as rapidly as possible. Finally, the open-end drum should be picked up and its contents poured into the funnel. Not more than 50 gallons of thickened fuel should be loaded into a 55-gallon drum. The funnel should then be removed and replaced by a plug. The vent opening of the drum should also be closed. (See Paragraph 39 for pressure method of filling storage drums.)

i. Unused thickener. Any thickener remaining in opened cans should be discarded. Since moisture in the air can quickly ruin its properties, no attempt should be made to save it.

j. Aging and storing. Newly mixed fuel has the appearance of tapioca pudding. (Fig 27) It should preferably be stored overnight before use. It may, however, be fired within 1 hour after mixing. To keep fuel in good condition, drums for shipping and storing must be clean, moistureproof, dry, strong, and unrusted, but not galvanized. They must be kept tightly closed and should be laid on their sides so that rain water will not collect around the bungs.

k. Testing fuel. Before use on missions, all fuels should be tested by being fired from a flame thrower. This is advisable because the characteristics of the fuel ingredients often vary.

Fig 27. Contrasting newly mixed thickened fuel (right) with aged fuel (left).

36. PREPARATION OF LIQUID FUELS.

a. Choice of ingredients. Thin fuels are easy to ignite, but they lack range and are largely burned in flight before reaching the target. For this reason, liquid fuels should contain the lowest proportion of gasoline and the highest proportion of heavier oils that permits easy ignition. In hot climates, less gasoline is needed than in cold climates. Exactness of proportion, however, is not of great importance. Suitable blends are as follows:

(1) Equal parts by weight or by volume of gasoline, light fuel oil, and heavy (bunker) fuel oil. The light fuel oil can be either No. 1 fuel oil, No. 2 fuel oil, automotive diesel oil, or kerosene.

(2) One part gasoline to four parts of cleaned crankcase drainings. (Par 36e) Unused motor lubricating oil can be employed in place of crankcase drainings, but usually it will be unavailable for flame-thrower use.

b. Preparation of ingredients. Before mixing blends, the following steps should be taken:

(1) Gasoline, diesel oils, and fuel oils. These fuel materials should be allowed to stand quietly for at least 30 minutes to permit any small quantity of water present to settle to the bottom. When transferring the fuel to another container, remove the fuel carefully so that no water is remixed with it.

(2) Crankcase drainings. If possible, crankcase drainings should be allowed to stand quietly in a container for at least 1 day. When pouring, take care to prevent the transfer of any of the sludge which may have settled in the bottom of the container.

c. Equipment. An open-head 55-gallon or 42-gallon drum and an improvised wooden mixing paddle are used. The paddle should be approximately 5 feet long, 2 inches wide, and 1 inch thick. A metal paddle should not be provided because of the danger of striking a spark from the drum. Five-gallon cans may also be furnished for measuring and transferring ingredients. Clean, unrusted, steel storage drums should be at hand. They should be at least 16-gage to have sufficient strength to withstand the internal vapor pressure of the fuel.

d. Stirring. All the ingredients should be stirred in the drum with the paddle until they appear to form a uniform mixture. This should require approximately 2 minutes.

e. Crankcase-draining blends. If crankcase drainings are used as an ingredient (Par 36b), it is preferable to allow the prepared mixture to settle for 24 hours after stirring, because the gasoline in the mixture may cause additional sludge to be deposited. Even after this settling period, it is recommended that the mixture be poured through cheesecloth or some similar fabric before the flame thrower is filled. Crankcase-draining blends should be allowed to stay in the flame thrower only long enough for completion of a mission, because additional sludge which may form from standing will clog the weapon.

f. Transferring. The mixture should be transferred either directly into the flame-thrower fuel tanks (Pars 37 through 40) or into storage drums. (Par 35h)

g. Emergency mixing in fuel tanks. In an emergency, mixing can be done in the flame-thrower fuel tanks by adding the ingredients in correct proportions and then shaking or stirring.

h. Testing fuel. Before fuel is used on a mission, it should be tested, if possible, by being fired from a flame thrower.

i. Storage. Fuels may be used immediately after preparation. If the blend contains crankcase oils, the fuel should be fired as soon as practicable after filling. Other liquid blends may be stored indefinitely until required for use. For storage precautions see Paragraph 40. The storage drums also should be kept tightly closed to prevent loss of gasoline through evaporation and to prevent moisture from entering the fuel. If stored in the open, the drums should be laid on their sides so that rain water will not collect adjacent to the bungs. An unrusted and undamaged 16-gage or 18-gage drum has sufficient strength to withstand the internal vapor pressure of the fuel.

37. FILLING BY POURING.

Fig 28. Filling fuel tanks by pouring. Any clean container may be used. A funnel may be improvised.

(Fig 28) This method is the simplest and quickest for liquid fuel, but it may be too slow for some thickened fuels. The procedure is as follows:

a. Stand the tank group on the ground or a platform. If the tank group is not connected to the gun group, lock coupling plug in tank coupling. (Par 70)

b. Using a 1-3/4-inch wrench, unscrew the filling plug and the safety-head plug.

c. Inspect interior of tanks to see if clean and free from foreign matter. If not clean, flush with gasoline.

d. Using an improvised funnel, fill to within 2 inches of the top of both plug openings. This allows sufficient void. The tanks will then contain approximately 4 gallons of fuel.

e. Wipe the fuel-tank plug seats and the plug threads with a clean, dry cloth. (Fig 29) If plug has a tendency to freeze to seat, lubricate (Par 49 b) before screwing in the filling and safety-head plug assemblies. Tighten with wrench.

Fig 29. Wiping plug seat.

f. Wipe any spilled fuel from weapon.

38. FILLING BY FORCE PUMP.

A force pump, if available, may be installed with a short length of pipe in the top opening of a drum of fuel for filling flame-thrower fuel tanks. Keep working parts of pump clean.

39. FILLING BY BLOWING.

Thickened fuel may be readily forced into the fuel tanks of flame throwers by the use of extremely low pressures of compressed air or nitrogen. Flame thrower fuel filling kit E6 or equivalent may be used. When equipment is available, filling by blowing is more efficient for filling large numbers of flame throwers with thickened fuel. Pouring or pumping are more time-consuming, depending on the consistency of the gel. The consistency may vary among batches even when the same proportion of thickener is used. The amount of moisture in the fuel seems to cause this variation. The precautions listed in Paragraph 40 should be observed.

Fig 30. Blowing thickened fuel into fuel tanks by use of cylinders of compressed air or nitrogen.

a. Source of pressure. When the pressure in cylinders of compressed air or nitrogen has fallen too low to be of further use in filling pressure tanks of flame throwers, the remaining pressure may be used to blow fuel into fuel tanks if the regulator valve can reduce pressure down to 20 pounds per square inch. For precautions, see Paragraph 33. An air compressor or a hand air pump (tire pump) may be used in place of a cylinder if the latter is not available. Pressure of no more than 15 to 20 pounds per square inch should be used on the fuel drums. Only a diaphragm-type regulator valve can be used safely. This valve must be capable of regulating any pressure that may be applied to it.

b. Drums. Clean, noncorroded, steel, 55-gallon drums should be used. Drums of United States manufacture which meet requirements will be stamped ICC-5 or ICC-5A, followed by three numbers in sequence, for example, “14-55-44.” The number “14” indicates the gage of the metal; “55” indicates the capacity in gallons; and “44” indicates the year of manufacture. A steel drum of 14 gage, or heavier, is preferable, but lighter drums (of 16 or 18 gage) may be used. Drums made of gages lighter than 18 gage (20-or 22-gage) must not be used. Drums should never be moved while under pressure.

c. Connections. The source of pressure (see a above), the drum of fuel, the fuel-filling line, the air hose, and other parts, are connected as shown in Figure 30. Threaded adapters are used, as necessary, to fit lines to the drum. All threaded connections should be made tight by the use of wrenches on the joints. The drum and the pressure cylinder (if the latter is used) should be laid on their sides on the ground or a platform. The opening of the drum connected to the fuel-filling hose should be close to the ground or platform. If tank group is filled without gun group, lock coupling plug (Par 70) in tank coupling.

d. Procedure. To fill fuel tanks:

(1) Remove both the filling and safety-head plugs.

(2) Inspect interior of tanks to see if clean and free from foreign matter. If not clean, flush with gasoline.

(3) Place end of fuel-filling hose in either one of the two fuel-tank plug holes, using a nipple as a spout.

(4) Start air compressor or pump, or open the valve on the cylinder of compressed air or nitrogen. Open regulator valve on filling line by turning handle slowly until gage shows 15 to 20 pounds pressure, but no more. Caution: “Cracking,” or opening a cylinder valve without using the proper regulator valve (Par 39 a), may result in explosive pressure in the drums.

(5) Both tanks must be filled to within 2 inches of their tops. Close valve on fuel-filling hose to halt flow at this level.

(6) If no additional flame throwers are to be filled, close pressure-cylinder valve, or stop compressor or pump. Then, using wrench, slightly loosen the air line at the drum, allowing pressure to bleed. When the pressure in the drum has fallen to that of the atmosphere, close regulator valve.

(7) Roll drum slightly and gently until fuel-filling hose is at top of drum.

(8) If there are valves on each end of the fuel-filling hose, use wrench to slightly loosen hose, allowing gradual escape of pressure. Stand away from, and at the side of, the connection. Keep hose pointed away from other personnel. When all pressure has been released, complete unscrewing of hose.

(9) Wipe fuel-tank plug seats and the plug threads with a clean, dry cloth. Then screw in filling plug and safety-head plug assemblies, applying grease (Par 49 b) if plug tends to freeze to seat. Tighten with wrench. Wipe any spilled fuel from weapon.

40. PRECAUTIONS WITH FUELS.

a. Flammability. All fuels used in flame throwers obviously are highly flammable and must be handled, stored, and used with extreme care. Diesel oil, fuel oil, and kerosene require the same care as does gasoline.

b. Indoor storage. When it becomes necessary to handle gasoline in a room or building, the windows and doors should be open and care taken that no unprotected flame which might ignite the fumes is in the vicinity. The doors and windows should remain open for a sufficient length of time afterward to allow any vaporized gasoline to escape.

c. Flames and sparks. The presence of open flames, heated stoves, electrical tools and apparatus, and other equipment likely to cause sparks must not be permitted. Even nails and metal cleats in shoes are a potential hazard in the presence of combustible fumes.

d. Smoking. “No Smoking” signs must be posted in prominent places about the premises and the rule against smoking must be strictly enforced.

e. Ventilation and cleaning. The buildings in which fuel is stored or used must be well ventilated and thoroughly cleaned every day. No rubbish or other flammable material should be permitted to remain in or near such buildings.

f. Spillage. Care should be taken that fuel is not spilled. Any spillage should be removed promptly.

g. Safety cans. Safety cans should be used, if possible, for storing small quantities of gasoline, as they have covers that must be forcibly held open to remove or add gasoline.

h. Rags. Metal receptacles with metal lids should be provided for discarded, oily, or gasoline-soaked rags. These rags must be disposed of daily.

i. Electrical apparatus. Vaporproof incandescent electric lamps, switches, and other appliances of approved type should be used. Open switches, relays, and similar apparatus, or motors with commutators, must not be used where gasoline fumes may be encountered.

j. Hose. Flexible metal, rubber, and rubber-metal hose should be inspected regularly (at least four times a year) and discarded when noticeably deteriorated.

k. Toxic fumes. Gasoline fumes are somewhat toxic and should not be inhaled.

l. Leaks. Leaks must never be neglected, and the fact that gasoline is a dangerous liquid must always be kept in mind. Inspections for leaks should be made frequently, particularly at pipe and hose joints.

m. Fire extinguishers. Carbon tetrachloride, carbon dioxide, or foam-type fire extinguishers should be provided and located where they will be accessible in the event of fire. Sand, not water, should be thrown on burning fuel if suitable extinguishers are not available.

n. Leaded gasoline. Gasoline often contains a poisonous lead compound. Such gasoline, or fuel containing leaded gasoline, should not be allowed to touch the body, especially the lips, eyes, open cuts, and sores.

Section IX OPERATION UNDER UNUSUAL CONDITIONS

41. WET CONDITIONS.

The M2-2 flame thrower may be carried and fired successfully in the rain or even after short immersion in water. After use when wet, it should be dried to prevent rusting, cleaned, and lubricated. (Pars 49 and 55) Areas where paint has worn off should be touched up with fresh paint. The weapon should be stored in a dry place. Moisture must not be allowed to enter fuel, ingredients of fuel, or containers of ignition cylinders.

42. DUST AND MUD.

Keep all possible dust, earth, and mud out of the flame thrower; particles may interfere with the operation of spring case, valves, bearings, and pressure regulator. Store weapons and auxiliary equipment in closed chests and boxes when not in use. (Par 77) Clean before use. (Pars 51 and 52)

43. HEAT.

A hot climate or exposure to the sun makes the fuel thinner when in containers. Thin fuel has shorter range; it is largely consumed in the air before it reaches usual effective ranges. Where the climate is torrid, less gasoline or other thinning agents should be used in a fuel blend than normally. (Pars 34 through 36)

44. COLD.

Cold weather reduces total heat produced at target but seldom enough to seriously lower value of a firing mission. Incendiary effects may be decreased because materiel is less flammable when cold. The weapon may be used at temperatures as low as minus 20 degrees Fahrenheit. To improve ignition, use more gasoline in fuel than normally. (Pars 34 through 36)

45. WIND.

Flame throwers should not be fired into strong head winds or across strong side winds. (Par 23)

Section X DEMOLITION

TO PREVENT ENEMY USE

46. DESTRUCTION PROCEDURE.

If circumstances should force abandonment of chemical warfare materiel in the field, it is destroyed or rendered useless to prevent its use or study by the enemy. The following methods are recommended:

a. Flame thrower. One or more small-arms bullets through the fuel tanks will prevent any immediate use of the flame thrower. Additional rounds may be put through the pressure tank. If the pressure tank is charged, the pressure-tank valve should be opened for a few seconds, thus permitting the contents to dissipate. This is necessary if rounds are to be fired point-blank. The gun may be rendered useless by bending it over a hard object. A sledge or ax will demolish valves and tubes. A fragmentation grenade will also achieve demolition.

b. Filling and charging apparatus. The flexible tubing, gages, and valves may be destroyed by blows with an ax, sledge, or other heavy instrument. The large pressure cylinders are rendered useless by releasing the contents and then destroying the valves by blows with an ax or sledge. Cylinders can be stacked like cordwood in groups of five and demolished by the detonation of four 1/2-pound blocks (2 pounds) of TNT in their midst. The air compressor may be destroyed by a similar procedure.

c. Fuel. Burn.

d. Mixing apparatus. Containers and filling lines may be rendered useless by ax or sledge blows, or by small-arms fire.

e. Thickener. Cans of thickener should be broken open. Contents should be thrown into a fire or into a body of water.

f. Ignition cylinders. Burn to destroy. Personnel should stay several yards from the fire because the cylinders ignite with a slight detonation.

PART THREE

MAINTENANCE INSTRUCTIONS

Section XI GENERAL

47. SCOPE.

Part Three contains information for the guidance of the personnel of the using organizations responsible for the maintenance (1st and 2nd echelon) of this equipment. It contains information needed for the performance of the scheduled lubrication and preventive maintenance services as well as descriptions of the major systems and units and their functions in relation to other components of the equipment.

Section XII SPECIAL ORGANIZATIONAL TOOLS AND EQUIPMENT

48. SERVICE KIT.

One service kit for portable flame thrower M2-2 will be furnished for each six M2-2 portable flame throwers. The kit includes tools, equipment, and spare parts for second echelon maintenance and for pressure-tank charging. Adjustable wrenches may be included in place of the plain-end wrenches listed. Numbers listed with items are Chemical Warfare Service stock numbers. Approximate contents are as follows:

a. Tools.

1 Screwdriver, cabinet, 4-1/2-inch blade length, 3/16-inch blade diameter, H22-50-13. (Fig 8)

1 Screw driver, common, 6-inch blade length, 5/16-inch blade diameter, H22-50-6. (Fig 8)

2 Wrenches, hex, 3/16 inch across flats (for 3/8-inch socket-head set screws), H22-49-91.

2 Wrenches, hex, 1/8 inch across flats (for 1/4-inch socket-head set screws), H22-49-12. (Fig 8)

1 Wrench, valve-adjusting, assembly A81-6-48. (Fig 8)

1 Wrench, heavy “S”, 1-3/8-inch and 1-1/2-inch openings, 12 inches approx length, H22-49-113. (Fig 8)

1 Wrench, engineers’, double head, 3/4-inch and 7/8-inch openings, 9 inches approx length, H22-49-115. (Fig 8)

1 Wrench, heavy “S”, 1-3/8-inch and 1-3/4-inch openings, 12 inches approx length, A81-6-49. (Fig 8)

1 Wrench, engineers’, single head, 1-1/8-inch opening, 10-1/2 inches approx length, H22-49-31. (Fig 8)

1 Wrench, adjustable, single end, 6 inches approx length (crescent-type), H22-49-67. (Fig 8)

b. Accessories and spare parts.

1 Line, filling, pressure cylinder, assembly C81-3-4. (Fig 23)

1 Hose, flexible, assembly E81-3-6. (Fig 24)

2 Lines, charging, pressure cylinder, assembly B81-3-29. (Fig 23)

1 Tank and valve, pressure, assembly (less shaft and handle) B81-1-374. (Fig 33)

1 Shaft, flexible, valve, assembly E81-1-470. (Fig 33)

1 Handle, valve, A81-1-473. (Fig 33)

1 Nut, machine-screw, hex, 5/16-inch, 24NF-2, H22-93-55. (Fig 33)

2 Case, spring, assemblies B81-1-444. (Fig 9)

2 Diaphragm, valve, assemblies A81-1-416. (Fig 9)

1 Hose, fuel, flame thrower, M1, assembly B81-1-498. (Fig 48)

2 Plugs, coupling, E81-1-514. (Fig 7)

6 Heads, safety, R81-1-561. (Fig 39)

1 Gage, fuel tank testing, assembly E81-6-57. (This assembly includes a plug drilled, tapped, and fitted with a 0-500-pound pressure gage.)

3 Washers, coupling, A81-1-513. (Fig 9)

2 Cord, cotton, seine, No. 4 hard braided, mildewproof, O.D., (1/8-inch diameter by 25-feet skeins), H100-4-5.

6 Bushings, pipe, head, 3/4 inch by 1/2 inch, (galvanized iron), H98-5-93. (Fig 9)

1 Regulator, pressure, assembly B81-1-438. (Figs 33 and 37)

1 Compound, anti-seize, white lead base, (for threaded fittings) 1/4-pound can, H99-3-12.

2 Gages, pressure cylinder testing, assembly B81-6-90. (Fig 32)

1 Catalog CW7-440114, Army Service Forces, “Portable Flame Thrower M2-2.”

1 Technical Manual 3-376A, “Portable Flame Thrower M2-2.”

Fig 31. Lubrication order.

To requisition a replacement Lubrication Order address Office of the Chief, Chemical Warfare Service, Washington 25, D. C.

NOT TO BE REPRODUCED in whole or in part without permission of the Office of the Chief, Chemical Warfare Service.

NO. 4001

———— KEY ————

LUBRICANTS

INTERVALS

CG-

GREASE,

1-

AFTER EACH MISSION

GENERAL PURPOSE

6-

AFTER SIX MISSIONS

NO. 1 (ABOVE + 32°F)

OR MORE OFTEN

NO. O (BELOW + 32°F)

THIS ORDER IS TO BE FASTENED TO INSIDE LID OF FLAME THROWER

PACKING CHEST.

Copy of this Lubrication Order will remain with the equipment at all times; instructions contained therein are mandatory and supersede all conflicting lubrication Instructions dated prior to 5 MAY 1944

By order of the Secretary of War:

G. C. Marshall, Chief of Staff.

Official:

J. A. Ulio,

Major General,

The Adjutant General.

Section XIII LUBRICATION

49. LUBRICATION.

a. Gun group. War Department Lubrication Order No. 4001 (Fig 31) shows the parts which require lubrication, the lubricants, and the intervals.

(1) Lubricants. Grease, general purpose, No. 1 is used, except for temperatures below freezing, when grease, general purpose. No. 0 is used. The bearing surfaces should be lightly coated with the grease.

(2) Frequency of lubrication. The surfaces of the ignition-head body which touch the spring case should be lubricated after each use of the weapon. Other parts are lubricated after six firing missions, six training sessions, or oftener. All should be thoroughly cleaned (Pars 52, 55, and 56) with gasoline, dry cleaning solvent, or other solvent, then dried before lubrication. If the gun is disassembled for any other reason, it should be lubricated before reassembly.

(3) Records. To ascertain when six missions have been fired, a record of firing (Par 2) should be kept with each flame thrower.

b. Tank group. The tank group ordinarily requires no lubrication. However, it may under the following exceptional circumstances:

(1) If the tank group has been immersed in water for several hours, the flexible shaft of the pressure valve may have lost its lubricant. If so, remove the shaft (Par 66 b) and inspect. If lubricant is not present, as indicated by difficulty of movement after removal, dip the shaft in solvent to clean and then dip in warmed grease, general purpose, No. 1. Replace shaft in valve.

(2) If filling or safety-head plugs (Figs 39 and 40) tend to stick to fuel tanks, apply grease, general purpose, No. 1 (No. 0 if below freezing temperatures) before replacing plugs.

Section XIV PREVENTIVE MAINTENANCE SERVICES

50. GENERAL

Preventive maintenance services, as prescribed by Army Regulations, are a function of using organization echelons of maintenance. These services consist of:

a. Before, during, and after operation services performed by the firers and assistants.

b. Scheduled services performed by organizational maintenance personnel (service when filling and charging, and service after six firing missions).

51. BEFORE-OPERATION SERVICE OF TANK GROUP.

The following services are to be performed before filling, charging, and loading the flame thrower with pressure, fuel, and ignition cylinder:

a. Pressure-tank valve. Open and close pressure-tank valve to test for ease of operation.

b. Threaded connections. Check all threaded connections for tightness, using appropriate wrenches.

c. Tank coupling. Examine coupling for cleanliness and ease of movement of lock and cams. (Par 70) Clean if necessary. If washer is broken, replace, using screw driver to pry out.

d. Plugs. Check filling plug and safety-head plug for completeness of parts (Par 69 a) and cleanliness of threads and seats. Clean, if necessary, with cloth. If rod or rod and chain have broken off and fallen in tank, turn tank upside down and remove. Remove deflector tube from head (using hand, not wrench). Inspect to see if diaphragm is intact. If diaphragm is ruptured, replace the safety head with an unbroken head. (Par 69 b, c) Reassemble plug, head, and deflector tube in left fuel tank. (Fig 11) Tube should face to rear and at a 45-degree angle to operator’s left shoulder. (Fig 18) Screw in deflector tube by hand; do not use wrench on deflector tube. Tighten lock nut with wrench.

e. Pressure-tank clamp. The clamp should hold the pressure tank tightly in place. If tank is loose, a wooden splint or wedge under the clamp may be used as a temporary expedient.

f. Carrier-frame bolts. Check tightness. Use wrench.

g. Carrier. (Par 71) Examine all canvas, webbing, and cord for signs of mildew, rot, or wear. Replace defective parts. Move flame thrower to dryer storage if mildew occurs.

h. Cord (lashing). Check for tightness. If necessary, make tighter and use secure, slip-proof knots. When the tank group is filled with fuel and adjusted on the firer, its weight should be carried chiefly by the canvas and webbing, not by the metal frame.

i. Shoulder and body straps. Adjust straps to fit firer. (Pars 19 and 71) A loose tank group can cause discomfort or injury when the wearer changes positions while on a mission. Check presence and condition of the two pins and two cotter pins which hold shoulder straps to steel support. Check fasteners.

52. BEFORE-OPERATION SERVICE OF GUN GROUP.

The following services are to be performed before filling, charging, and loading with pressure, fuel, and ignition cylinder:

a. Hose nipple, tank end. Examine to be sure nipple is clean and not badly nicked. If badly nicked, the nipple may not make a tight seal at the tank coupling. A leak and loss of pressure may result. See Paragraph 73 d for repair of the nipple.

b. Fuel hose. Examine surface of hose for cracks or other signs of deterioration. Special attention should be paid to portions adjacent to the gun and tank coupling, which are subjected to severe flexing. If hose is defective, replace. (Par 73 b, c) Do not patch.

c. Hose nipple, gun end. Check tightness of threaded connection between hose and fuel-valve body, using hand or very light wrench pressure.

d. Shield. Remove ignition shield. Check cleanliness of threads on shield and on ignition-head body. If not clean, use cloth. When reassembling (Par 18 c), shield should turn freely until it locks in correct position.

e. Valve lever and needle.

(1) There should be some play in the valve lever. To test, remove ignition shield. Compress grip safety and valve lever slowly, observing the motion of the valve needle. The valve lever should move approximately 1/16 inch before the needle begins to move.

(2) Valve needle should be seated firmly in the barrel nozzle. After the valve lever is pulled back and released, no play should occur in the needle. For adjustment of needle, see Paragraph 75 d.

f. Screws. Use screw driver to test tightness of all screws.

g. Spring retainer and plug. Check tightness of spring retainer and plug (Fig 47) by using hand or very light wrench pressure.

h. Ignition head. All exposed surfaces of the shield, nozzle, needle, and other parts of the ignition head, or adjacent to it, should be clean. If not, use cloth.

i. Atomizer hole. With the fuel valve held fully open, insert a fine wire in the atomizer hole of the nozzle to clean the hole. Then use cloth-wrapped splint to remove from the inside of the nozzle any foreign matter pushed through the atomizer hole. If such matter is not removed, it may interfere with the closing of the fuel valve needle at the nozzle. Repeat procedure in e (2) above.

j. Spring case. Spring case should turn freely on ignition head. If it does not, clean any grease or dirt from, surfaces with cloth and relubricate. (Par 49)

k. Trigger. Pull trigger once or twice to find whether it operates easily and whether it returns to position. If not, clean and lubricate trigger. (Par 49) Check condition of trigger spring.

l. Trigger rod. Check position of the trigger rod when trigger is pulled back all the way as when firing. The rod should extend approximately 1/16 inch beyond the end of the lug in the ignition head. If it does not, bend the rod slightly, reverse position of bearing, or replace worn parts.

53. SERVICE WHEN FILLING AND CHARGING.

a. Inspection of fuel tanks. Just before filling and charging, remove plugs (Par 69 b) and examine interior of fuel tanks to see whether they are clean and free from foreign matter. If not clean, flush with gasoline until clean.

b. Fuel level. When filling (Pars 37 through 40), see that fuel reaches the same level in both tanks. If leveling does not occur, the tank connector may be clogged with foreign matter. If so, clean, as in a, above. After filling, wipe plug seats with a cloth before replacing plugs. Wipe any spilled fuel from weapon.

c. Pressure-tank valve. Before charging the tank group with air or nitrogen, open and close the pressure-tank valve several times by hand to be sure it operates freely. If it does not, adjust as described in Paragraph 66 d.

Fig 32. Testing pressure tank and valve, using 0-3,000-pound testing gage from service kit.

d. Testing for leaks in pressure system. After charging, and as few hours as possible before a mission, use an 0-3,000-pound gage furnished in service kit to test pressure. (Fig 32) To install gage, unscrew check-valve cap and screw gage in check-valve body. If pressure has fallen below that to which the tank was charged (Par 32), a leak is indicated. Remove gage, replace check-valve cap, and check for leaks at joints between pressure tank and valve and between tank valve and check valve. (A wrench should be used to tighten cap on check-valve body so as to avoid producing an additional leak.) Large leaks can be felt or heard. Small leaks can be detected by coating joints with soap-and-water solution. Bubbles indicate leaks. If a leak is revealed between pressure tank and pressure-tank valve, or between check valve and pressure-tank valve, replace all three as a unit. If tests do not show up the leak the tank may have been improperly charged. It should be recharged and then retested.

54. SERVICE WHEN FIRING.

a. Failure to ignite. Pull trigger repeatedly. If ignition cylinder still fails to ignite, dirt may be wedged in ignition head. Unscrew shield one-half turn. Screw it back, rapping shield with the hand while turning. This should dislodge foreign matter. Pull trigger again. Repeat procedure, if necessary.

b. Safety head “blows” (breaks). If safety head breaks, firing mission cannot be carried out. On return, have head replaced. (Par 69) Follow test procedure. (Par 56 b)

55. SERVICE AFTER FIRING.

a. Unloading. Remove ignition cylinder (Par 30), close pressure-tank valve, and blow out remaining fuel and pressure. (Par 30)

b. Removal of equipment. Release the body straps, then the shoulder straps. If prone, lie on side and allow tank group to roll off onto ground. If standing or kneeling, take care that tank group does not drop on feet or legs.

c. Correcting or reporting. Correct any failures or difficulties or report them as soon as possible to service or maintenance personnel.

d. Gun. Remove shield (Par 18) and clean interior of shield with cloth. Clean holes in shield with wire or wooden splint. Clean external surfaces of barrel, nozzle, needle, and other parts. Check cleanliness and adjustment of needle. (Par 75 d) Check trigger for operation. Lubricate. (Par 49)

e. Fuel tanks and passages. Remove plugs (Par 69 b). Drain any remaining fuel. Use gasoline to remove residues of thickened fuels before they have a chance to harden and obstruct passages. If necessary, fill tanks with gasoline and allow to stand for several hours, shaking occasionally. Drain and repeat if necessary.

f. Safety head. Check head to see if it is ruptured; if it is, replace. (Par 69) Follow test procedure. (Par 56 b)

g. Pressure-tank valve. If weapon is to be stored, open pressure-tank valve and leave it open until next charging.

h. Carrier. Scrub, if necessary, with soap and water, or gasoline.

i. Exterior metal surfaces. Scrub exterior metal surfaces clean of fuel to prevent fire hazard. Allow to dry before using again.

j. General inspection. Carefully examine all other parts, adjust as necessary, and replace any which are damaged.

56. SERVICE AFTER SIX FIRING MISSIONS.

After the flame thrower has been used on six firing missions or the equivalent in training work, experienced personnel should follow these directions:

a. Before-operation and after-operation service. Follow the same procedures as in Paragraphs 52, 53, and 55.

b. Test firing (or simulated firing).

(1) If tactical conditions permit test firing at a suitable test range (Par 15), fill the fuel tanks with fuel. (Pars 37 through 40)

(2) If test firing with fuel is impracticable, fill fuel tanks with clean water. (Be sure to dry all parts after test.)

(3) Remove filling-plug assembly. (Par 69) Fish out the retainer rod and chain by means of a bent wire.

(4) Do not unscrew the safety-head plug.

(5) Insert the testing plug with 0-to 500-pound pressure gage (plug and gage are from service kit) in the filling-plug opening. Tighten testing plug in seat with wrench.

(6) Fully charge pressure tank. (Par 32)

(7) If test firing with fuel, load ignition cylinder. (Par 18)

(8) Open pressure-tank valve and simultaneously observe pressure in fuel tanks by reading gage. The gage indicates the pressure in both tanks. It should be between 350 and 390 pounds per square inch.

(9) Read the gage at the expiration of not less than 5 minutes. The tanks should have a pressure reading of not more than 390 pounds. If the pressure continues to increase beyond 390 pounds and the safety head blows, replace the safety head and the pressure regulator.

(10) Fire by operating controls (or simulate firing if tanks are filled with water). The burst should last 3 seconds, during which time the pressure should not drop below 260 pounds.

(11) If the pressure does not conform to the requirements stated in (8), (9), and (10), adjust the pressure regulator upward or downward. (Par 67 d)

(12) While the above test firing is proceeding, check for leaks at all joints and connections on the tank group. The pressure system should be checked by painting the joints with soap-and-water solution and by looking for bubbles which indicate leaks. For replacement of parts where pressure leaks, see Paragraph 66. Fuel leaks may be seen without soap and water. For repair of fuel leaks, see Paragraph 75 e. The nozzle should be observed by removing the ignition shield. Nozzle leaks are corrected by cleaning, adjusting needle (Par 75 d), or by regrinding. (Par 75 e) If this is not successful, replace both needle and barrel as a unit.

c. Fuel valve. Discharge all pressure from the gun by operating the fuel valve. Carefully remove the valve grip and grip support. (Par 74) Look for signs of leakage at the valve diaphragm. If a leak is present, replace valve-diaphragm assembly. (Pars 75 b and 75 c)

d. Valve grip. Disassemble the valve grip (Par 74) and lubricate. (Par 49)

e. Carrier. Tighten the carrier cord.

f. Gun interior. If thickened fuel has been fired, disassemble the gun. All parts should be cleaned of accumulations of dried fuel. Lubricate (Par 49) and reassemble. If liquid fuel has been fired, flush gun with clean gasoline. Disassemble only enough to lubricate. Reassemble.

Section XV

TROUBLE SHOOTING

57. PRECAUTIONS.

First, remove the ignition cylinder. Then, before disassembling, servicing, or repairing parts which may be under pressure, be sure to release the pressure. Remove fuel, when necessary.

58. FUEL LEAKS.

Trouble

Remedy

a. Defective or damaged valve-diaphragm assembly.

If leak is observed in valve grip, disassemble. (Par 74) If diaphragm is torn, or damaged in any other way, remove and replace. (Par 75)

b. Defective threaded connections on fuel lines.

Disconnect, using wrenches. If thread is stripped or badly damaged, replace the threaded part. If threads appear to be sound, clean them and reconnect. If leak is between tank coupling and tank connector or between hose and fuel-valve body, apply anti-seize compound before rescrewing. Tighten joint with wrenches.

c. Dirt or foreign matter on seats or threads.

Clean parts carefully with cloth before reassembling.

d. Leak at nozzle.

Adjust needle. (Par 75 d) If leak persists, either replace needle and barrel as a unit or use lapping compound on parts. Turn needle in seat until parts make a tight connection when seated. Remove lapping compound and reassemble.

e. Worn body of hose.

Replace fuel-hose assembly. (Par 73)

f. Leak at tank coupling.

Remove and replace coupling washer if damaged. (Par 70) If hose nipple, tank end, is damaged, repair nipple (Par 73 d) or replace fuel-hose assembly.

59. SAFETY HEAD “BLOWS” (BREAKS).

Trouble

Remedy

a. Defective safety head.

Replace with new safety head. (Par 69 b)

b. Defective pressure regulator.

If replacement safety head also breaks, follow test procedure in Paragraph 56 b to determine whether pressure regulator needs adjustment or is defective.

60. CARRIER UNCOMFORTABLE.

Trouble

Remedy

a. Cord becomes loose or breaks.

Use only hard-braided seine cord furnished in service kit for replacements. Lace tightly as shown in Figure 46, using slip-proof knots at ends.

b. Straps not adjusted to fit wearer.

Adjust straps to fit each new wearer. Tank group must be high on back and snug on body. (Pars 19 and 71)

c. Carrier frame presses on wearer’s back.

Cord is too loose. Tighten cord. Use slip-proof knots at ends.

61. SHORT RANGE.

Trouble

Remedy

a. Stream of burning fuel issues at an angle or in a very broad spray.

Fuel valve is not fully open because of:

(1) Faulty operation. Be sure to compress controls all the way when firing. (Par 26)

(2) Improper adjustment or assembly of valve. To correct, see Paragraphs 74 and 75.

b. Rapid drop of range during a burst.

Pressure-tank valve is not fully open. Open all the way. If this is not effective, test pressure regulator. (Par 67 d)

c. Shorter range in each successive burst.

Pressure tank is not fully charged.

(1) Before firing be sure tank is charged to at least 1,700 pounds per square inch. (Par 32)

(2) Check for leaks to make sure pressure has not decreased since charging. (Par 53 d)

d. Short range with longer time of discharge than 8 to 9 seconds.

Dried fuel or other foreign matter is in fuel lines. Disassemble and clean.

62. FUEL-VALVE FAILURE.

Trouble

Remedy

Valve fails to close when controls are released.

(1) Work the grip safety to trip the valve lever.

(2) Foreign matter may be in barrel, or barrel may be dented. If dented, replace barrel and needle as a unit. If not dented, disassemble and clean. (Pars 74 and 75)

63. FAILURE OF IGNITION CYLINDER TO IGNITE.

Trouble

Remedy

a. Match in cylinder moves but incendiary charge does not ignite.

Pull trigger repeatedly. If cylinder does not ignite, remove cylinder (Par 30) and examine.

(1) If matches have been pushed flush with inner surface of cylinder body, the cylinder is defective. Destroy. (Par 30) Replace.

(2) If matches project 1/16 inch or more from cylinder, ignition head is defective. Disassemble ignition head (Par 76 b) and examine. Replace parts as necessary. (Par 76 c)

b. Cylinder does not rotate to bring new charge into position.

(1) Spring case is not free to rotate because of dirt. Clean and lubricate. (Par 49)

(2) Cylinder is improperly loaded. (Par 18)

(3) Ignition cylinder binds on barrel because of dirt or excessive warping of ignition cylinders from heat of firing. Remove and destroy (Par 30) ignition cylinder. Reload.

(4) Spring case is defective. Replace as a unit. (Par 76 b, c)

c. Trigger does not return to normal position (with ignition cylinder in place).

1) When on a mission, use fingers on trigger to pull back to normal position.

(2) If time permits, remove trigger rod. (Par 76 b) Clean rod and hole in which rod slides. Lubricate. (Par 49) Reassemble. (Par 76 c)

d. Lack of spring tension at trigger.

Trigger spring is off hook of trigger, off spring screw, or broken. Replace where necessary.

64. FAILURE OF FUEL TO IGNITE.

Trouble

Remedy

a. Atomizer hole clogged.

Clean with fine wire. (Par 52 i)

b. Fuel troubles at low temperature.

(1) At temperatures below minus 20 degrees Fahrenheit, ignition of any standard fuel is uncertain. Operation at these temperatures should be avoided unless tests of fuels by firing with flame throwers are first made.

(2) At temperatures above minus 20 degrees Fahrenheit, no difficulty should be experienced with thickened gasoline. When blended fuels are used, the ratio of gasoline content should be increased as temperature decreases.

c. Failure of ignition cylinder.

See Paragraph 63.

Section XVI

TANK GROUP

65. GENERAL.

The tank group stores fuel and pressure. The fuel is placed under pressure when the pressure-tank valve is opened. The tank group is supported upon the firer’s back and shoulders by the carrier.

66. PRESSURE TANK AND VALVE ASSEMBLY.

a. Description and functioning. The pressure tank and valve assembly (Fig 33) includes:

(1) Pressure tank. The pressure tank is a lightweight, airplane-type cylinder, able to withstand the great pressure which it contains. The tank is charged with air or nitrogen at 1,700 to 2,100 pounds per square inch pressure by use of auxiliary equipment as described in Paragraphs 31 and 32. This pressure stays in the pressure tank until the weapon is ready to be fired. Opening of the pressure-tank valve releases air or nitrogen through the pressure regulator to the fuel tanks. Oxygen or combustible gases are never used in the tank because a violent explosion may result. The tank is large in capacity to assure ample pressure, and hence full range, for the entire load of fuel. The pressure-tank clamp (Fig 39), a steel-strap device with hinge and toggle-type latch, holds the pressure tank in place on the fuel tanks.

(2) Pressure-tank valve. (Figs 33 and 34) This valve is screwed into the bottom of the pressure tank. The valve stem slides into the valve end of the valve flexible shaft. When opened by means of the valve handle and valve flexible shaft, the valve permits passage of compressed air or nitrogen through tubes and the pressure regulator to the fuel tanks. The valve is of the quick-opening, packless, diaphragm type.

(3) Pressure-valve handle and valve flexible shaft. (Figs 33 and 34) The pressure-valve handle is held by a small nut on the end of the valve flexible shaft, which in turn is connected to the pressure-tank valve by means of the valve stem and a large hex nut. The handle and shaft extend to the right of the tank group, enabling the firer to open and close the valve without assistance when carrying the weapon. The handle slips over the end of the shaft and is held to it by a nut. The shaft is held to one of the fuel tanks by a clamp, nut, and bolt welded to the tank.

(4) Check valve. (Figs 33 through 35) The check valve has the same function as the valve on a vehicular tire tube, but it is much heavier in construction and different in design because the pressure in the flame thrower is 50 times greater than that in an automobile tire tube. Connected by threads to the pressure valve, the check valve permits compressed air or nitrogen to enter the pressure tank during charging (Pars 31 and 32) but prevents its escape when the outside source of pressure is removed. The cap is removed from the check valve only for charging or testing.

b. Removal. (Fig 33) To prevent damage to threads, leaks, and loss of pressure and range, remove pressure tank and valve assembly only when necessary.

Fig 33. Pressure system disassembled, showing nomenclature and Chemical Warfare Service stock numbers for requisitioning spare parts.

(1) Release of pressure. Be sure all pressure has been released from the pressure system before disassembling or removing any part or assembly of the pressure system. To release pressure, operate fuel valve (Par 26) and hold open until pressure is exhausted. As an added precaution, personnel should avoid facing the connections when disconnecting parts or assemblies.

(2) Removal procedure. After release of all pressure:

(a) Loosen the clamp from the valve flexible shaft.

(b) Using wrench, unscrew the large hex nut which holds the flexible shaft on the pressure-tank valve.

(c) Pull the valve flexible shaft and handle free of the valve.

(d) Using wrench, unscrew the flared tube nut on the regulator tube adjacent to the pressure-tank valve.

(e) Open pressure-tank clamp (Fig 39) and swing clamp strap outward.

(f) Remove the pressure tank together with the pressure-tank valve and check valve.

(g) To remove valve handle, use the adjustable-end wrench to loosen and remove nut from threaded outer end of valve flexible shaft. Slide out the valve handle.

Fig 34. Lower portion of pressure system, assembled.

Fig 35. Check valve (cross section).

c. Installation. (Figs 33 and 39) To install:

(1) Insert pressure tank (with pressure-tank valve and check valve mounted on the tank) through the pressure-tank clamp. Be sure to aline the regulator tube, elbow, and pressure-tank valve threads carefully so that they cannot be damaged when connecting.

(2) Close the pressure-tank clamp.

(3) Start the threaded connections by hand to be sure they are well alined. Do not force. Use wrench for final tightening, but do not apply great torque to the wrench.

(4) Insert the valve flexible shaft through small clamp into the pressure-tank valve. Using wrench, tighten the large hex nut located between shaft and valve.

(5) Tighten the clamp on the valve flexible shaft.

(6) Place pressure-valve handle on threaded end of the shaft. Place nut on threaded end and tighten with adjustable-end wrench.

d. Adjustment. If valve handle cannot be turned by hand:

(1) Remove flexible shaft and handle. Never apply a wrench to these parts.

(2) Turn end of pressure-valve stem with wrench to open valve.

(3) If stem will not turn, replace the tank and valve.

(4) If stem turns, work it back and forth with wrench.

(5) Reconnect flexible shaft and handle.

(6) If handle does not turn easily, repeat the process until handle turns, or replace tank and valve.

(7) Close valve before charging tank.

e. Maintenance.

(1) If either pressure tank, pressure-tank valve, or check valve are damaged or defective, all three must be replaced as a unit. No attempt may be made to repair any of these parts or their connections. If makeshift repairs or improvised parts are devised, serious accidents can result because of the extremely high pressures to which the equipment is subjected.

(2) Keep all threaded connections tightened. If a leak is suspected at any threaded connection, follow procedure in Paragraph 53 d.

67. PRESSURE REGULATOR.

a. Description and functioning. The regulator automatically reduces the variable pressure of air or nitrogen in the pressure tank to a constant operating pressure of approximately 350 pounds per square inch in the fuel tanks. The regulator is located at a protected position in the tank group of the M2-2 portable flame thrower, where it is not readily subject to tampering or damage from the outside. The regulator tube with fittings connects the pressure-tank valve and pressure regulator. (Fig 33) Its outlet is connected to the fuel tanks by the diffusion-pipe assembly. (Par 68 a) Either of two interchangeable types of regulators is furnished: the spring type (Figs 33, 36, and 37), and the dome type (Fig 38).

Fig 36. Rear of tank group, with carrier removed to show pressure regulator (spring-type) and connections.

b. Removal of pressure regulator. After release of all pressure:

(1) Remove carrier (Par 71 b), if necessary.

(2) Using wrench, unscrew the flared tube nuts and other fittings.

(3) Lift out the pressure regulator.

c. Installation of pressure regulator. Line up pressure regulator, regulator tube, diffusion-pipe assembly, and fittings carefully so they will not be damaged when threads are tightened. Start threads with the hands. Apply only moderate wrench pressure to complete tightening. Replace carrier or carrier pack if either has been removed.

d. Adjustment of pressure regulator. The pressure regulator ordinarily requires no attention other than checking and tightening connections with the regulator tube and the diffusion-pipe assembly. If a defect in the regulator is indicated by falling off of the range of the weapon or by frequent breakage of the safety-head diaphragm (Par 56 b), the following procedure should be carried out. (When using wrenches, do not apply excessive force.)

(1) Remove the filling plug (Par 69 b) and ignition cylinder. (Par 30 a)

(2) Fill the fuel tanks with 4 gallons of water (or fuel).

(3) Connect the 0-to 500-pound fuel-tank testing gage, found in the service kit, to the filling-plug hole. Tighten plug of gage with wrench.

(4) Charge the pressure tank to a pressure of 1,800 pounds per square inch. (Pars 32 and 33)

(5) Open the pressure-tank valve.

(6) Read the pressure on the gage. If 350 to 390 pounds is indicated, omit steps (7) through (10).

(7) To increase the pressure of a spring-type regulator:

(a) Pry off the protective cap.

(b) Turn a set-screw wrench clockwise in the adjusting screw and read pressure on gage.

(8) To decrease the pressure of a spring-type regulator:

(a) Turn the set-screw wrench counterclockwise more than is considered sufficient to effect the desired reduction.

(b) Turn the pressure-tank valve off.

(c) Relieve pressure in the fuel tanks by compressing the fuel valve until the pressure is below that desired.

(d) Release the fuel valve.

(e) Open the pressure-tank valve and allow the system to reach a state of equilibrium, which occurs when the hissing sound ceases.

(f) Repeat the steps described above in (6) and (7).

(9) To increase the pressure of a dome-type regulator:

(a) Open needle valve No. 1 one full turn. (Fig 38)

(b) Open needle valve No. 2 one full turn. (There will be slight leakage around the needle-valve thread.)

(c) Open needle valve No. 3 very slowly, watching pressure gage closely. (As pressure builds up in fuel tanks there will be slight leakage through needle valve No. 1.)

(d) When the pressure gage indicates 350 pounds, close needle valve No. 3 tight.

(e) Close needle valve No. 2 tight.

(f) Close pressure-tank valve.

(g) When gage indicates zero, close needle valve No. 1 tight.

(10) To decrease the pressure of a dome-type regulator:

(a) Open needle valve No. 1 one full turn. (Fig 38)

(b) Open needle valve No. 3 very slightly, which will lower the pressure.

(c) When 350 pounds is reached, close valve No. 3 tight.

Fig 37. Pressure regulator, spring-type.

Fig 38. Pressure regulator, dome-type, showing needle valves and wrenches.

(d) Close pressure-tank valve.

(e) When gage indicates zero, close needle valve No. 1 tight.

(11) Open pressure-tank valve and press the fuel valve to observe the pressure with the weapon operating.

(12) After final adjustment:

(a) Close the pressure-tank valve.

(b) Open the fuel valve and release the pressure from the fuel tanks.

(c) Remove the pressure gage and plug from the fuel tank.

(d) Install filling plug.

(e) Tighten filling plug with wrench.

(f) If regulator is spring-type, replace its protective cap.

68. FUEL-TANK ASSEMBLY.

a. Description and functioning. (Figs 4, 5, and 39) The fuel-tank assembly includes:

(1) Fuel tanks. Two alloy steel fuel tanks hold the fuel before it is propelled to the target. They have a combined capacity, including void, of 4-1/2 gallons. A void of approximately 1/2 gallon is left in tanks when filling to allow for expansion and to permit entry of the compressed nitrogen or air. To speed filling and cleaning of the tanks, two openings are provided on top of the fuel tanks. The openings are threaded to receive the filling-plug assembly and the safety-head plug assembly, which are interchangeable in the openings. Filling operations involve the use of auxiliary equipment and are described in Paragraphs 34 through 40. The carrier and the pressure system are supported on the fuel tanks.

Fig 39. Fuel system of tank group and related parts disassembled, showing nomenclature and Chemical Warfare Service stock numbers for requisitioning spare parts.

(2) Tank connector. This open passageway between the fuel tanks makes them, in effect, a single container. The location of the tank connector and its large diameter permit easy flow of fuel and pressure between the two tanks.

(3) Hose connector. The hose connector is the outlet for fuel from the fuel tanks. It is located so that nearly all the fuel is propelled from the weapon if firing positions are correct. (Par 24) One end is welded to an opening in the tank connector. The other end is threaded into the tank coupling.

(4) Frame clamp. This small metal clamp, with bolt, nut, and washer, holds the hose connector to the carrier frame.

(5) Diffusion-pipe assembly. This T-shaped tubing carries compressed air or nitrogen from the pressure regulator to each of the fuel tanks. A flared tube connection and elbow connect the stem of the T to the pressure regulator. The horizontal tubes of the T extend into the fuel tanks and are welded to the fuel tank walls. Within the fuel tanks these tubes are perforated with holes which permit ready escape of the compressed nitrogen or air into the fuel tanks when the pressure-tank valve is open.

b. Removal and installation. The tank connector, hose connector, diffusion-pipe assembly, and the two fuel tanks are welded together and cannot be disassembled from each other. No attempt should be made to remove any of these parts or assemblies.

c. Maintenance. Other than cleaning (Pars 51 d and 55 e), repainting, and tightening of threaded joints, no repairs will be attempted by the first or second echelon on the fuel tanks, tank and hose connectors, or diffusion-pipe assembly. Emergency repairs may be made only by the third or fourth echelon. No attempt should be made to weld or patch any part of the fuel tanks.

69. FILLING AND SAFETY-HEAD PLUG ASSEMBLIES.

a. Description and functioning.

(1) Filling-plug assembly. (Fig 39) This assembly fits into the 1-3/8-inch threaded opening at the top of either one of the fuel tanks. It permits filling and cleaning of the tanks, and seals the opening when the tank is not being filled or cleaned. The assembly includes the filling plug proper and a plug-retainer assembly. The latter is a metal rod which hangs from the plug on a metal chain. The rod and chain prevent accidental loss of the plug.

(2) Safety-head plug assembly. (Figs 39 and 40) This assembly is screwed into the threaded opening on top of either fuel tank. It serves the same functions as the filling-plug assembly and moreover protects the firer and other personnel. It includes:

(a) Safety-head plug. This plug is similar to the filling plug except for the threaded hole which receives the safety head.

(b) Safety head. This metal head screws into the safety-head plug. It includes a soft metal diaphragm which bursts when the pressure in the fuel tanks exceeds 500 pounds per square inch. It prevents the building up of dangerous pressures in the fuel tanks.

Fig 40. Safety-head plug assembly (cross section).

Fig 41. Unscrewing safety head from safety-head plug, using wrench.

(c) Deflector tube. This short, curved piece of 1/8-inch pipe deflects fuel and pressure away from the firer if the safety head bursts. A lock nut holds the tube in position. (Par 12 j)

(d) Plug-retainer assembly. This assembly consists of a metal rod and chain which hang from the plug and prevent accidental loss of the plug when filling or inspecting.

b. Removal of plugs.

(1) Before removing the filling plug, the safety-head plug, or an unbroken safety head, operate the fuel valve until any pressure which may have accumulated in the fuel tanks is eliminated. If the coupling plug is in the tank coupling, very slightly loosen the threads of either the filling plug or the safety-head plug, using the 1-3/4-inch wrench, to eliminate pressure in the fuel tanks. Keep face and eyes away from the threads.

(2) The plug-retainer assemblies should not be lifted completely out of the tanks unless required.

(3) If either the rod or the rod and chain breaks from one of the plugs and falls into the tank, upend the tank group to permit removal of the parts.

(4) To replace burst safety head, unscrew lock nut and deflector tube. (Fig 11) Using wrench (Fig 41), unscrew safety head. Never disassemble the safety head.

c. Installation of plugs. The filling plug, safety-head plug, and safety head are screwed in by hand and then tightened with wrenches. No substitution will be made for the safety head, which is manufactured to burst at the safe limit of pressure. The plug threads and seats should be cleaned with a cloth (Fig 29) before installing plugs. Screw in deflector tube, using hand pressure. The tube outlet should face to the rear and at a 45-degree angle to operator’s left shoulder. (Fig 18) Replace lock nut and tighten with wrench. (Use wrench on lock nut, not on deflector tube.)

d. Maintenance of plugs. Replace safety head if damaged or blown. Never repair safety head or use an improvised head.

70. TANK COUPLING.

a. Description and functioning. This quick-connecting coupling (Fig 42) connects and locks the fuel hose or the coupling plug to the tank group. The coupling cams, lock, and washer provide a secure and tight joint. The tank coupling makes possible rapid replacement of emptied tank groups with filled and charged tank groups in the field. No tools are needed for this operation.

Fig 42. Tank coupling and end of fuel-hose assembly.

b. Removal.

(1) To remove the tank coupling from the hose connector, apply a wrench and unscrew.

Fig 43. Closing cams of tank coupling to connect gun and tank group. This is done before locking. (See below.)

Fig 44. Closing lock of tank coupling to secure gun to tank group. This also provides a fuel-tight seal.

(2) To disconnect the tank coupling from the fuel hose or the coupling plug:

(a) Release pressure from fuel tanks by operating the fuel valve or by opening very slightly the filling plug.

(b) Using hands, pivot the coupling lock back on the coupling body.

(c) Using hands, pivot the two coupling cams back on the coupling.

(d) Slide out the fuel hose or the tank coupling.

(e) If coupling washer is to be removed, pry out with a screw driver.

c. Installation of tank coupling. Proceed as follows:

(1) If coupling washer has been removed, replace.

(2) Insert coupling plug or hose nipple, tank end, in the coupling as far as it will reach. Close the two cams. (Fig 43)

Fig 45. Coupling plug in place in tank coupling. This arrangement is used when fuel tanks are brought back for filling with gun detached.

(3) Close the coupling lock (Fig 44), being sure to push it all the way, until it covers the ends of both cams. (Figure 45 shows coupling lock correctly locked on coupling plug.)

(4) If the tank coupling has been removed from the hose connector, screw it on hand tight. Anti-seize compound should be applied lightly to the threads to assure a tight joint. Use wrench to tighten the coupling until it is in the position shown in Figure 34.

d. Maintenance of tank coupling. The coupling washer, made of synthetic rubber, should be inspected frequently. If it is damaged or swollen, remove it and replace. If the coupling leaks, inspect, and if necessary, remove and replace the washer.

71. CARRIER.

a. Description and functioning. (Fig 46) The tank group is securely carried on the firer’s back and chest by the carrier, which includes the metal carrier frame, the canvas carrier pack, webbing straps, and cord, all of which are parts of the tank group.

(1) Carrier frame. This lightweight, tubular-metal frame is bolted to two pairs of brackets (upper and lower) on the fuel tanks. It is also bolted to the hose connector by the frame clamp, which helps support the connector. The frame is pierced by two parallel series of holes, through which the cord (lashing) of the carrier is laced.

(2) Carrier pack. This is a sheet of heavy canvas, reinforced on the tank side with strips of webbing. The smooth side of the carrier pack rests against the firer’s back and cushions the back from contact with the metal tanks. A series of eyelets is located on each side of the pack.

(3) Seine cord (lashing). The carrier pack is fastened to the carrier frame by means of hard-braided cord which is laced through the eyelets in the pack and the holes in the frame. The cord that comes on the flame thrower stretches very little under load.

(4) Straps. The straps, made of wide cotton webbing, are adjustable to fit the wearer. (Fig 18) They are provided with snap release, hook-and-eye, and snap fasteners. The shoulder straps have quick-release fasteners for rapid removal, if necessary, of the tank group from the firer. The upper ends (steel loops) of the shoulder straps are secured by pins to the steel support which connects the two fuel tanks. Each of the pins is held in position by a split cotter pin, which is inserted through a hole in the pin and is then spread. The lower ends of the shoulder straps snap onto metal loops at the bottom of the carrier frame. The upper body straps are attached to metal loops on each side of the carrier frame. The lower body straps are fastened to one of the lower two pairs of eyelets of the carrier pack.

b. Removal of carrier.

(1) To remove carrier or carrier frame, use screw driver and adjustable-end wrench to take off frame clamp, bolt, nut, and lock washer. (Fig 34) Then remove two pairs of bolts, nuts, and lock washers which hold the carrier frame to bottom and top of the fuel tanks. Lift off the carrier.

(2) To remove body straps, unsnap ends and lift out of holes. To remove shoulder straps, unsnap lower ends and remove from holes. Pull out cotter pins, then pins, from upper ends of shoulder straps, and lift out straps.

(3) To remove carrier pack, unknot and unlace cord.

c. Installation of carrier.

(1) To install carrier frame (or a complete carrier) place frame in position adjacent to fuel tanks (Fig 46), insert bolts in holes, place lock washers and nuts on bolts, and tighten with screw driver and wrench. Replace frame clamp on fuel connector and frame. Insert bolt in holes, place lock washer and nut on bolt. Tighten with screw driver and wrench.

(2) If carrier pack has been removed, use cord to relash. Lace tight and use slip-proof knots. (Fig 46)

(3) To install straps, snap ends of body straps and lower ends of shoulder straps into positions shown in Figure 46. Place upper ends (steel loops) of shoulder straps in steel support between fuel tanks. Insert two pins through any two of the holes in the support and through the shoulder strap loops. Insert cotter pins in holes in pins and spread cotter pins to lock pins in place.

d. Adjustment of carrier. Carrier must be carefully adjusted to fit the individual firer so the load will not shift during sudden, rapid changes of firer’s position. Adjustments are as follows:

(1) Cord and carrier pack. Cord must be tight at all times. The cord furnished with the equipment has very little tendency to stretch. However, pull cord tight when lacing and use slip-proof knots at ends. Tighten cord periodically.

Fig 46. Carrier assembled on tank group.

(2) Straps. Adjust straps to fit each firer, moving slides on straps as necessary. Straps must fit snugly to prevent shifting of load and to keep tank group high on firer’s back. Lower body straps may be fastened in second pair from the bottom of carrier eyelets to conform to firer’s physique. Pins, which hold top ends of shoulder straps to steel support between the fuel tanks, may be moved to any two of the three holes so as to provide the best balance in the load.

e. Maintenance of carrier. Keep carrier dry and clean. If flame thrower becomes wet or muddy, clean and dry carrier thoroughly. Store in a dry place. If rotted, mildewed, or damaged, replace affected parts. If cord frays or breaks, use special seine cord from service kit as replacement.

Section XVII GUN GROUP

72. GENERAL

The gun group consists of the fuel-hose assembly and the gun. The gun includes the fuel valve, which controls the ejection of fuel, and the ignition head, which ignites the fuel.

73. FUEL-HOSE ASSEMBLY.

a. Description and functioning. (Fig 47) Hose, fuel, flame thrower, M1, assembly, provides a flexible connection between the fuel tanks and the gun.

(1) Hose. Made of synthetic rubber and reinforced with a cover of metal wire and cotton braid, the hose resists the action of gasoline and oil, and withstands a pressure of approximately 1,000 pounds per square inch. Its inside diameter is 7/8 inch; its outside diameter is approximately 1-1/4 inches.

(2) Nipples. The hose nipple, tank end, connects the hose to the tank coupling on the tank group. The hose nipple, gun end, is a threaded connector between the other end of the hose and the fuel-valve body.

b. Removal of fuel-hose assembly. Remove the hose from the gun only when necessary for maintenance. The threads in the fuel-valve body will be damaged by frequent screwing and unscrewing of the hose because the body is a lightweight aluminum casting. Fuel hose is replaced as a unit and is not disassembled in the second echelon. To disconnect from tank group, see Paragraph 70 b.

c. Installation of fuel-hose assembly.

(1) To install in tank group, see Paragraph 70 c.

(2) To install in gun, apply anti-seize compound (from service kit) lightly to threads and screw hose in fuel-valve body by hand. Use wrench only enough to make a secure connection.

d. Maintenance of fuel-hose assembly. If the hose nipple, tank end, is badly nicked and does not provide a tight connection with a new coupling washer (Par 70):

(1) File the end surface, being careful to keep the surface at a right angle to the sides of the nipple.

(2) Couple hose nipple, tank end, to tank coupling. If coupling closes very easily, indicating washer is not being compressed, replace the washer and recouple. If coupling still closes too freely, the nipple has been filed too short, and the fuel-hose assembly should be replaced as a unit.

74. VALVE GRIP.

a. Description and functioning. (Fig 47) The valve grip is part of the fuel valve. It includes the controls and is held by the firer in his right hand to support the gun group. Parts of the valve grip are:

(1) Left and right valve grips. A pistol-type grip is formed by two aluminum housings designated as the left valve grip and the right valve grip. The two parts are held together by four screws and four lock washers.

(2) Grip support. This aluminum housing is mounted above the left and right valve grips and connected to them by two screws and lock washers.

(3) Valve lever. This control is made to fit the fingers and is mounted in front of and between the two parts of the valve grip. A pin at the top of the lever fits into holes in left and right valve grips and serves as a pivot, governing the movement of the lever. When the lever and the grip safety are compressed simultaneously by the operator, the valve is thereby opened and fuel is ejected from the gun.

(4) Grip safety. This control is grasped by the hand simultaneously with the valve lever. It is mounted back of and between left and right valve grips. A pin at the base of the safety fits into holes in the left and right valve grips and serves as a pivot in a manner similar to the pin on the valve lever. The fuel cannot be discharged unless both the valve lever and the grip safety are compressed simultaneously.

(5) Rocker arm. The rocker arm, a boat-shaped metal part, is mounted near its center on a pin. It is held in contact with the valve lever by means of a valve-grip spring and spring pin. At its top end, the rocker arm touches the yoke shaft of the valve-diaphragm assembly. When the valve lever and the grip safety are compressed, the rocker arm pushes the valve diaphragm assembly forward.

(6) Valve-grip spring. When the firer’s hand releases the valve grip, the valve-grip spring forces the valve lever, the grip safety, and the rocker arm back to their normal, nonoperating positions.

b. Removal of valve grip.

(1) Unscrew the four screws and lock washers that hold the grip support to the valve body. Remove the valve grip as a unit.

Fig 47. Fuel valve (disassembled) and fuel hose, showing nomenclature and Chemical Warfare Service stock numbers for requisitioning spare parts.

Fig 48. Location of parts in right valve grip before covering them with left valve grip.

Fig 49. Using screw driver to push long end of valve-grip spring into groove in grip safety.

(2) To disassemble valve grip, remove screws and lock washers from the grip. Lift off the left valve grip, exposing contents of grip. Lift out the following parts: valve-grip spring, rocker arm, grip safety, and valve lever.

c. Installing valve grip.

(1) Place grip safety, valve lever, and rocker arm in position in right valve grip. (Fig 48) Be sure the shorter end of rocker arm is at the top. Place grip spring over spring pin. Slip short end of grip spring in groove of rocker arm. Place long end of grip spring on outside of grip safety.

(2) Put left valve grip in place and insert the two lower lock washers and screws. Tighten the two screws enough to hold parts in place and still leave space for moving long end of spring into the groove in grip safety. Push spring into groove with a screw driver. (Fig 49)

(3) With spring in place, fully tighten the two screws with screw driver.

(4) Place grip support in position, and insert the two upper lock washers and screws. Tighten screws, using screw driver.

(5) Attach valve grip to valve body, using the four lock washers and inserting the four screws through the grip support. Make sure that the yoke shaft of the valve-diaphragm assembly is in front of rocker arm.

d. Maintenance of valve grip. No maintenance is required for the valve grip other than replacement of worn or damaged parts, tightening of screws, cleaning, and lubrication. (Par 49)

75. BARREL AND VALVE-BODY ASSEMBLY.

a. Description and functioning. (Fig 47) This assembly is part of the fuel valve. It includes the barrel, valve body, and operating parts contained in the barrel and valve body. The assembly consists of:

(1) Valve body, an aluminum housing, located at the rear of the gun and mounted on the grip support by means of four screws and lock washers. The valve body has four large threaded openings. The lower opening leads into the valve grip. The side opening, which forms a Y with the main portion of the body, is connected to the fuel-hose assembly. The front opening is screwed on the barrel. The rear opening is closed by the spring retainer and plug.

(2) Valve-diaphragm assembly, which transmits and reverses the movement imparted to it by the rocker arm of the valve grip. (Par 74 a) It also serves as a seal, keeping fuel from entering the valve grip. The valve-diaphragm assembly includes:

(a) Yoke shaft, on which the rocker arm bears at the lower end of the shaft.

(b) Yoke, a Y-shaped metal part which fits on the upper end of the yoke shaft and is held to it by a steel pin. The yoke transmits motion from the shaft to the yoke block, and is located within the valve body when the valve is assembled.

(c) Diaphragm, a synthetic-rubber diaphragm held in a steel sleeve, which fits snugly in the lower opening of the valve body. The yoke shaft passes through the diaphragm.

(3) Diaphragm support, washer, and cap, which hold the valve-diaphragm assembly in place in the valve body.

(4) Spring retainer, a brass, hollow bushing which screws into the rear opening of the valve body, and which is threaded internally to receive the plug. The retainer has a hexagonal head to take a 1-3/8-inch wrench. As its name implies, the retainer holds the valve spring in position.

(5) Plug, a brass part, resembling a cap screw, which fits into the spring retainer, closing off the rear end of the gun. It permits adjustment of the needle (see d below) without removing the valve spring and spring retainer.

(6) Valve spring, a coil spring located in the valve body between the spring retainer and the yoke block. The spring keeps the needle seated in the nozzle until compression of the grip safety and valve lever forces back the yoke block, spring, and needle.

(7) Yoke block, a steel piece, 1 inch long, which fits into the arms of the yoke Y. It is secured by an internal thread to the valve needle. Movement of the yoke in turn moves the yoke block and the valve needle.

(8) Lock nut, on the valve-needle thread at the rear of the yoke block, which locks the block on the needle.

(9) Valve-needle, a pointed rod, which extends through the inside of the barrel from the yoke block to the nozzle. The valve needle is seated in the nozzle except when firing. It controls the ejection of fuel from the nozzle. Two sets of three fins each, known as needle guides, are mounted on the front and rear of the needle, respectively. These guides keep the needle centered in the barrel. The rear end of the valve needle is threaded to hold the yoke block and permit adjustment of the needle by means of the lock nut which screws on the threads. (See d below.)

(10) Barrel (Figs 47 and 54), which carries the fuel to the ignition head. It also supports or contains other components of the gun. The barrel assembly is replaced as a unit with the needle. It consists of a tube, made of thin metal, with a threaded fitting at the back end, and a nozzle brazed into the front end of the tube. The nozzle ejects the fuel from the barrel through the ignition head. The fuel emerges from two holes in the nozzle:

(a) Atomizer hole, a small opening which sprays a fine, readily ignited mist of fuel. This helps ignite the main stream of fuel.

(b) Main hole, which is tapered inside, and which conveys the main stream of fuel from the barrel. When the gun is not being fired, the valve needle is seated in the main hole of the nozzle. When the gun is being fired, the needle is withdrawn from the nozzle seat, permitting the fuel to be forced from the gun.

b. Removal of barrel and valve-body assembly. If gun group and tank group are connected, release any pressure in the fuel tanks by compressing the valve lever and the grip safety. Then disassemble as follows:

(1) Unscrew the fuel-hose assembly from the fuel-valve body only if this is necessary for maintenance.

(2) Remove spring retainer and plug from end of fuel-valve body and remove valve spring.

Fig 50. Valve needle, yoke block, and lock nut ready for installation in fuel-valve body.

(3) Unscrew diaphragm cap and pull out washer, support, and valve-diaphragm assembly. To prevent loss of valve-needle adjustment (Fig 54), do not disturb position of yoke block by turning the needle.

Fig 51. Placing diaphragm assembly in position in fuel-valve body.

Fig 52. Installing parts in fuel-valve body.

(4) Slide the valve needle out of barrel; the yoke block and the lock nut may then be unscrewed from the valve needle, but adjustment (see d below) will be necessary when reinstalling.

c. Installation of barrel and valve-body assembly.

(1) To install valve needle, screw the yoke block and lock nut on the needle (Fig 50). Insert needle in valve body and barrel.

(2) Insert valve-diaphragm assembly into valve body (Fig 51), making sure that the yoke slips into the flat notches of yoke block.

Fig 53. Installing spring retainer in fuel-valve body.

(3) Slip the diaphragm support, washer, and cap over the yoke shaft. (Fig 52) Screw on the diaphragm cap by hand. Do not use a wrench. Install valve grip. (Par 74 c)

(4) Place valve spring over end of needle and install spring retainer. (Fig 53) Apply wrench very lightly to tighten spring retainer.

(5) Adjust needle (see d below), and screw plug into the spring retainer.

(6) If hose has been removed, apply anti-seize compound lightly to the threads. Screw hose into fuel-valve body. Wrench should be applied very lightly to tighten.

d. Adjustment of valve needle. Needle is adjusted after installation of parts in barrel and valve assembly. Use care when resetting needle, as smooth operation of the weapon depends on accurate adjustment.

(1) Remove ignition shield (Par 18) and plug from gun.

(2) Use the valve-adjusting wrench (Fig 8) to hold the lock nut and apply a cabinet (narrow-bladed) screw driver (Fig 8) in the end of the needle. Turn needle until it makes a snug fit in the nozzle opening.

(3) Compress the valve lever and grip safety. The needle should draw back into the nozzle with the tip of the needle at the smallest diameter opening in the nozzle. (Fig 54)

(4) When the needle has been correctly adjusted, as in (3) above, tighten the lock nut with the valve-adjusting wrench, keeping the needle from turning with the screw driver. This will lock the adjustment. Screw plug into the spring retainer.

(5) Replace ignition shield. (Par 18)

e. Maintenance of barrel and valve body.

Fig 54. Valve-needle adjustment. Solid lines show needle in correct open position with point at smallest diameter of nozzle. Broken lines show needle in closed position.

(1) Damaged parts. Replace worn or damaged parts. If the diaphragm shows evidence of tears or separation, or if leaks occur at the diaphragm, replace the valve-diaphragm assembly.

(2) Valve spring. If valve spring has lost resiliency, grasp it by the ends and stretch slightly, or replace.

(3) Nozzle leaks. If valve leaks at nozzle, and cleaning (Par 55 d) does not remedy the leak, adjust needle (see d above). If leak persists, either replace barrel and needle, or lap seat. To lap, place lapping compound on seat (in nozzle) and on needle point. Turn needle in seat until parts make a tight connection when seated. Remove lapping compound, reassemble, adjust needle, and test fire.

(4) Atomizer hole. If atomizer hole is clogged, clean with fine wire. (Par 52 i)

76. IGNITION HEAD.

a. Description and functioning. (Fig 55) The ignition head ignites the fuel when the flame thrower is fired. It is mounted on the fore part of the barrel. It consists of:

(1) Ignition-head body, which includes half of the front grip. Three set screws serve to tighten the ignition-head body to the barrel. The ignition-head body is made of aluminum.

(2) Trigger and trigger bearing, held between the ignition-head body and the coverplate by the trigger screw.

(3) Trigger rod, one end of which is held in the trigger bearing, the other extending through the ignition-head body. Pulling the trigger shoves the trigger rod forward, causing it to push a match in the ignition cylinder. The match ignites an incendiary charge in the ignition cylinder.

(4) Trigger spring, which hooks over a projection of the trigger and is held at its lower end by a screw, which is held in the ignition-head body. This spring pulls the trigger rod back from the firing position after the firer releases the trigger.

(5) Latch, located in the ignition-head body, in front of and above the trigger guard. The latch, set on a pin, engages the notch of the ignition shield, locking it in place. A latch spring holds latch in position.

(6) Coverplate, an aluminum casting which constitutes the left section of the front grip and covers the working parts seated in the ignition head body. The coverplate and body are held together by four screws and four lock washers.

(7) Spring case, which turns the ignition cylinder when the trigger is pulled.

(a) Four projections on the inner spring case are bent over the outer spring case to hold the two parts together.

(b) The inner-case pin (Fig 56) engages a stop on the inside of the ignition cylinder. The five projecting metal matches on the inside of the ignition cylinder are each in turn stopped by the lug on the forward-facing surface of the ignition-head body.

Fig 55. Ignition head disassembled, showing nomenclature and Chemical Warfare Service stock numbers for requisitioning spare parts.

When the trigger is pulled, the trigger rod pushes a match forward, causing an incendiary charge in the ignition cylinder to ignite. The spring in the case rotates the ignition cylinder until another match is stopped by the lug.

Fig 56. Parts of ignition head and ignition cylinder.

(c) The outer-case pin (on the outside surface of the outer spring case) fits into the notch in the ignition shield and holds the spring case as the shield is screwed into position. This action winds the spring in the case.

(d) A snap ring holds the spring case on the ignition-head body.

(8) Ignition shield, a cylindrical, thin-metal tube with a conical front end. The shield guides the flame and protects the firer. Eight holes around the base of the cone provide an air intake for burning the fuel. The base of the shield is threaded, and it screws onto the ignition-head body. A notch (Fig 56) in the base of the shield receives the latch and the outer-case pin of the spring case.

b. Removal of ignition head. To remove the ignition head, proceed as follows:

(1) Remove shield by lifting latch and unscrewing shield counterclockwise. (Fig 14) Keep hands and face away from front of barrel.

(2) If ignition cylinder has not been removed, remove it or allow it to fall off barrel.

(3) Pry off snap ring which holds spring case in position, using screw driver. (Fig 57) Be careful not to damage or break the ignition-head body by applying too much leverage.

(4) Remove the four screws and lock washers which hold ignition-head body and coverplate together. Lift off coverplate.

(5) Trigger, trigger spring, trigger rod, latch, and latch spring may be removed.

(6) Using a hex wrench, loosen set screws (Fig 58) and withdraw barrel from ignition head.

c. Installation of ignition head. To install ignition head, proceed as follows:

(1) Insert barrel in ignition-head body, pushing it as far forward as the shoulder on the barrel permits.

(2) Aline front grip and valve grip.

(3) Using hex wrench, tighten set screws on barrel enough to hold but not so tight that barrel is dented.

(4) Place latch, latch spring, trigger and bearing, trigger rod, and trigger spring in position.

(5) Put coverplate on ignition-head body and replace the four lock washers and screws.

(6) Slip spring case over barrel, and lock by forcing snap ring into the groove.

(7) When weapon is to be used on a mission, fit ignition cylinder and ignition shield in place on nozzle end of barrel as described in Paragraph 18.

d. Maintenance of ignition head.

(1) Servicing. The ignition head should be cleaned and lubricated each time it is disassembled. (Par 49)

(2) Spring-case assembly. If outer case rotates and inner case does not, and no spring action occurs, spring is broken and spring case should be replaced as a unit. Do not disassemble or repair this part.

(3) Trigger rod and lug. When trigger is pulled all the way, end of trigger rod should extend 1/16 inch beyond lug on forward-facing surface of ignition-head body. If end of trigger rod is worn, replace rod. Lug on the ignition-head body should be approximately 7/32 inch high. If lug is worn or broken, replace ignition head body.

Fig 57. Prying snap ring from ignition head to remove spring case.

Fig 58. Loosening set screws with wrench so ignition head may be lifted off barrel.

APPENDIX

Section XVIII SHIPMENT AND STORAGE

77. SHIPMENT AND STORAGE.

The flame thrower is shipped and stored in a wooden packing case (Fig 59), which measures approximately 34 inches by 23 inches by 19 inches. Cubage of the case is approximately 8-1/2 cubic feet.

Fig 59. Opened packing chest showing flame thrower and other contents as received.

a. Storage procedure. After use and servicing (Pars 55 and 56), if the weapon is not to be promptly reused on another mission, it should be returned to the packing case. Before disconnecting the gun group from the tank group and storing the weapon, the ignition cylinder should be removed, the fuel discharged, and the pressure released. Operate fuel valve to release any residual pressure in the fuel tanks. The deflector tube must be removed from the safety head (Fig 11) to permit the tank group to fit into the chest. The deflector tube should be kept in the spare parts kit or tool kit until the next use of the weapon. The spare parts kit, the tool kit, the extra cans of cylinders, TM 3-376A, and the coupling plug (Fig 7) should remain in the chest except when they are being used. Wooden fittings hold the tank group in place, with the pressure tank up. The gun group is disconnected from the tank group and is kept with fuel hose connected to the gun on the gun mounting board in the chest. (Fig 10)

b. Rust prevention. If the flame thrower, parts, and tools are to be stored for a considerable length of time, especially in a damp climate, all exposed metal surfaces should be covered with a rust-preventive compound. Store in a dry place.

Section XIX LIST OF REFERENCES

78. REFERENCES.

References pertaining to the care and use of flame throwers include:

AR 850-20

Precautions in Handling Gasoline

AR 850-60

Compressed Gas Cylinders; Safe Handling, Storing, Shipping, Using

FM 31-50

Attack on a Fortified Position and Combat in Towns

FM 100-5

Operations

TM 3-220

Decontamination

TM 9-850

Cleaning, Preserving, Lubricating, and Welding Materials and Similar Items Issued by the Ordnance Department

INDEX

Paragraphs

- A -

Adjustable-end wrench,

10a, 48a

Adjustment of fire,

25, 26c

After firing,

30, 55, 56

After six missions,

56

Aging of fuel,

35j

Aiming,

25, 26c, 34

Air compressor,

32a, 32b, 39a

Alcohol,

35a

Angles of tanks when firing,

24b

Anti-seize compound

source of,

48b

use of,

58b, 70c, 73c

Assistants,

4f, 15

Atomizer hole

cleaning,

52i

description,

75a

- B -

Barrel

adjustment,

52e, 75d

cleaning,

55d, 55i

damage to,

62, 75e

description,

75a

maintenance,

62, 75e

Barrel and valve-body assembly,

75

Bleeders,

32c

Burning time of fuels,

34

Bursts,

4b, 9b, 25c, 28, 29

Bushing, pipe, 3/4 inch by 1/2 inch,

8, 10b, 48b

- C -

Cap, diaphragm,

75

Capacity, fuel,

9e, 68a

Carrier

adjustment,

19, 56e, 60, 71

description,

5a, 71a

installation,

71c

maintenance,

71e

preventive maintenance,

51, 55h

removal,

71b

Carrier frame,

71

Carrier pack,

71

Carrying the flame thrower,

19, 20, 55b, 56e, 60, 71

Catalog,

48b

Charging of pressure tank,

4g, 32, 33, 61c, 66a

Check valve

description,

66a

installation,

66b

operation,

31, 32, 53d

removal,

66b

replacement,

66e

Cleaning

gun,

49a, 55, 56f, 58c, 74d, 75e, 76d

tank group,

55, 58c, 68c, 71e

Cold weather,

34-36, 44, 49, 64

Compound, anti-seize

source of,

48b

use of,

58b, 70c, 73c

Compound, pipe thread (anti-seize),

48b, 58b, 70c, 73c

Compressed air

charging apparatus,

32, 33, 46, 48b

leaks,

56b, 61c

release of,

66b

volume required,

9g, 32c

Compressor, air,

32a, 32b

Controls,

14, 21, 26, 61, 74, 76

Cord

description,

71a

installation,

71c

replacement,

48b, 60, 71e

tightening,

51h, 60, 71d

Cotter pins,

71

Coupling plug,

10f, 17, 39c, 48b, 70

Coupling washer,

10b, 48b, 58f, 70, 73d

Coverplate,

76

Cubage,

9d

Crankcase drainings,

36

Cylinders

destruction,

46

number required,

9g, 32b

use of, in charging,

32, 33

use of, in filling,

39

- D -

Dampness

effect on fuel,

35e

effect on ignition cylinder,

31, 41

effect on thickener,

35e

effect on weapon,

41, 51g, 71e, 77b

Deflector tube,

12j, 69, 77a

Description of flame thrower,

5, 65-76

Destruction

accessories,

46b, d

flame thrower,

46a

fuel,

46c

ignition cylinders,

30a, 46f

thickener,

46e

Diaphragm,

75

Diaphragm cap,

75

Diaphragm support,

75

Diaphragm, valve, assembly,

10b, 48b, 56e, 58a, 74, 75

Diaphragm washer,

75

Diesel oil,

35, 36, 40

Differences in models,

7

Diffusion-pipe assembly,

67, 68

Dimensions,

9d

Discharge time,

9b

Dome-type regulator,

67d

Drums,

35-40

Duration of fire,

9b, 34

Dust

blowing out,

33j

effect on operation,

42

- E -

E1 ignition cylinders,

18a, 31

E3 portable flame thrower,

7a

Engineers’ wrenches,

10a, 48a

- F -

Filling fuel tanks

by blowing,

39

by force pump,

38

by pouring,

37

service when filling,

53

Filling plug,

37, 39, 49, 51d, 56b, 69

Filling with fuel,

4g, 34-40

Fire precautions,

15c, 40, 55

Firers,

4f, 15

Firing technique,

26-30, 54, 56b

Flexible shaft,

valve

adjustment,

66d

description,

66a

installation,

66c

lubrication,

49

removal,

66b

Frame clamp,

68a, 71

Fuel

capacity,

9e, 68a

characteristics,

34

destruction,

46c

left in tanks,

24b

per 100 fillings,

9g

precautions,

35-40, 41

preparation,

35, 40

ranges,

22

weight,

9c

Fuel-filling hose,

39

Fuel-filling line,

39, 46b

Fuel hose

description,

70a

installation,

70c, 73c, 75

length,

9d

maintenance,

40j, 52, 73d

removal,

40j, 70b, 73b, 75

replacement,

5b, 48b, 58, 70, 73

stiffening of,

21

Fuel oils,

35, 36, 40

Fuel tanks

angle when firing,

24b

cleaning,

53a, 53b

description,

5a, 68a

fuel level,

53b, 68a

inspection,

53a

installation,

68b

maintenance,

68c

removal,

68b

Fuel valve

adjustment,

61a

cleaning,

56f, 61d

description,

5b, 74a, 75a

effects of dirt,

42

failure to close,

62

installation,

61a, 74c, 75c

leaks,

56, 58

lubrication,

49

operation,

14c, 26b, 61a, 74a, 75a

removal,

74b, 75b

testing,

56c

Funnel,

35-37

- G -

Gage, fuel-tank testing,

48b, 56b, 67d

Gage, pressure testing,

48b, 53d, 56b, 67d

Gasoline, in fuels,

34-40, 43, 44

Gloves,

21g

Grease,

49

Grip safety,

14c, 49, 56d, 62, 74

Grip support,

74

Gun

assembling,

74-76

carrying,

25

cleaning,

55d, 55i, 56f, 74d, 75e, 76d

description,

5b, 14, 72, 74-76

disassembling,

74-76

length,

9d

lubrication,

49

mounting board,

10e

preventive maintenance,

50, 52, 54-56

requisitioning,

5b

storage,

12g

Gun group

assembling,

72-76

connecting to tank group,

17, 70, 73

description,

5b, 14, 72-76

disassembly,

72-76

lubrication,

49

maintenance,

72-76

preventive maintenance,

50, 52, 54-56

storage,

12g

weight,

9c

- H -

Heat, effect on fuel,

34-36, 40, 43

Hex wrenches,

10a, 48a, 67d, 76b, 76c

Hose connector,

68a

Hose,

fuel

description,

73a

installation,

70c, 73c, 75

length,

9d

maintenance,

40j, 73d

removal,

40j, 70c, 73b, 75

replacement,

5b, 48b, 58, 70, 73

stiffening of,

21

- I -

Identification,

6

Ignition action,

14b, 44, 76a

Ignition cylinders

action,

14b, 31, 76a

description,

31, 76a

destruction,

30a, 46f

discarding,

30a

duration of fire,

9b

failure,

54a, 63, 64

loading of gun,

18, 76a

packing,

10c, 31

precautions,

18, 20, 31

storing,

31, 41

use in training,

15b, 18a, 30a

Ignition failure,

18, 26, 31, 44, 54a, 63, 64, 76d

Ignition head

assembling,

76c

cleaning,

49, 52, 54a, 76d

description,

5b, 76a

disassembling,

18, 76b

effects of dirt,

42, 52

failure,

54a, 63, 64, 76d

installation,

76c

loading,

18, 76a

lubrication,

49, 76d

maintenance,

76d

removal,

76b

Ignition-head body,

76

Ignition shield,

18, 52d, 54a, 55d, 76

Immersion, effects of,

41

Incendiary effects,

3, 34, 44

Interchanging with E3,

7a

Interchanging with M1 or M1A1,

7b, 8

- J -

Jungle ranges,

22

- K -

Kerosene,

35a, 36a, 40

Kit

tool,

10, 77a

spare parts,

10, 77a

service,

48

- L -

Lapping needle and nozzle,

75e

Latch,

76

Leaded gasoline,

40n

Leaks

fuel,

56, 58, 66b, 68-70, 73-75

pressure,

21, 51b, 53d, 56b, 61c, 66b

Left valve grip,

74

Line, fuel-filling,

39

Lines, charging and filling

destruction,

46

source,

48b

use,

32, 33

Liquid fuels

aiming,

25

characteristics,

34

filling,

37, 38

precautions,

36-40

preparation,

35, 40

ranges,

22, 34

Loading ignition cylinder,

18, 76a

Lubrication,

49

- M -

Marking,

6, 18a

M1 and M1A1 portable flame throwers,

7b, 8

Moisture

effect on fuel,

35e

effect on ignition cylinder,

31, 41

effect on thickener,

35e

effect on weapon,

41, 51g, 71e, 77b

Mounting board,

12g

- N -

Needle

adjustment,

52e, 75d

cleaning,

52, 55d

description,

75a

installation,

75c

leaks,

58

removal,

75b

Nitrogen

charging apparatus,

32, 33, 46, 48b

leaks,

56b, 61c

release of,

66b

volume required,

9g, 32c

Nozzle

adjustment,

52e, 56b, 75d

cleaning,

52, 55d

description,

75a

leaks,

56b, 58, 75e

- O -

Oxygen, hazard from use,

32c

- P -

Packing chest

cubage,

9d

dimensions,

9d

opening,

12

use of,

12, 30

weight,

9c

Paddle,

35, 36

Painting,

13, 41, 68c

Pins,

(carrier) 71

Plug, coupling,

10f, 17, 39c, 48b, 70

Plug, filling,

37, 39, 49, 51d, 56b, 69

Plug-retainer assembly,

69

Plug, safety-head,

37, 39, 49, 51d, 69

Plug, testing,

56b, 67d

Point-blank range,

22

Positions, firing,

24

Precautions

in training,

15

when charging,

33

when filling with fuel,

37-40

when firing,

22a, 24d

when preparing fuel,

35, 36, 40

when servicing,

57

with cylinder,

18, 31, 57

with gun,

20

Pressure

charging,

32, 33

charging apparatus,

32, 33, 46, 48b

lack of,

56b, 61

leaks,

56b, 61c

pounds of,

9f, 32, 56b

release of,

66b

testing for,

53d, 56b

Pressure regulator

adjustment,

56b, 59, 67d

description,

5a, 67a

effects of dirt,

42

installation,

66c, 67c

removal,

67b

replacement,

48b, 56b, 59, 67

testing,

56b, 61b, 67d

Pressure tank

charging,

32, 33

description,

5a, 66a

installation,

66c

removal,

66b

replacement,

4g, 48b

Pressure tank and valve assembly

adjustment,

66d

description,

5a, 66a

installation,

66c

maintenance,

66e

removal,

66b

testing for leaks,

53d

Pressure-tank clamp

description,

66a

installation,

66c

removal,

66b

repair,

51e

Pressure-tank valve

description,

5a, 66a

effects of dirt,

42

installation,

66c

operation,

14a, 21, 55g, 61b

removal,

66b

replacement,

48b, 66e

testing,

51a, 53c

Pressure-tank valve handle,

14a, 21, 48b, 66

Preventive maintenance services,

50-56

Pump

force,

38

air,

39a

- R -

Rain, effect on firing,

41, 77b

Ranges,

4c, 15b, 15c, 22, 61, 67d

Recoil,

24c

Records,

2, 49a

References,

1b, 78

Regulator tube,

66, 67

Removal of tank group,

55b, 66-71

Right valve grip,

74

Rocker arm,

49, 74, 75a

- S -

Safety, grip,

14c, 62, 74

Safety-head plug,

37, 39, 51d, 69

Safety head, replacement,

51d, 54b, 55f, 56b, 59, 69

Screening effect,

3, 34

Screw drivers,

10a, 48a, 52f, 74c, 75d, 76b

Seine cord

description,

71a

installation,

71c

replacement,

48b, 60, 71e

tightening,

51h, 60, 71d

Service kit,

48

Service, on receipt of equipment,

12, 13

Set-screw wrenches,

10a, 48a, 67d, 76b, 76c

Shield, ignition,

18, 52d, 54a, 55d, 76

Shipment,

77

Short range, causes of,

61

Sighting,

25

Skids, use of,

24

Smoke,

3, 34

Smoking,

15, 40d

Snap ring,

76

Soaking the target,

29

Spare parts in service kit,

48, 77a

Spare parts kit,

10b

Spray of fuel,

61a

Spring case

cleaning,

52j, 76d

description,

76

effects of dust,

42, 52j

general,

10b, 18, 31, 76

lubrication at,

49, 52j, 76d

maintenance,

76d

replacement,

48b, 63b, 76d

Spring retainer and plug,

52g, 75

Spring, trigger,

63d, 76

Spring-type regulator,

67d

Spring, valve,

75

Spring, valve-grip,

74

Stem, pressure valve,

66d

Storage

charging lines,

42

cylinders,

33, 77a

filling lines,

42

flame thrower,

12, 30f, 41, 42, 77

fuel,

35j, 36i, 40

ignition cylinders,

31

Straps, adjustment,

19, 51i, 60b, 71d

Sun, exposure of flame thrower to,

40, 43

Support, diaphragm,

75

- T -

Tactics,

3, 4e

Tank connector,

68a

Tank coupling

cleaning,

70d

description,

70a

installation,

70c

leaks,

58, 70d

maintenance,

51c, 70c, 70d, 73d

operation,

17, 70, 73a

removal,

70b

testing,

51c

Tank group

adjustment,

66-71

carrying,

19, 24, 55b, 71

connecting to gun,

4g, 17, 70

description,

5a, 65-71

dimensions,

9d

interchanging,

4g, 17, 70

installation,

66-71

maintenance,

66-71

preventive maintenance,

50, 51, 53-56

removal,

55b, 66-71

requisitioning,

5a

weight,

9c

Targets,

3, 25

Temperature, effects of,

34-36, 40, 43, 44, 49, 64

Test firing,

12k, 35k, 36h, 56b

Thickened fuel

aiming,

25c, 26c

characteristics,

34

filling,

37-39

precautions,

35, 39, 40

preparation,

35, 40

ranges,

22, 34

Thickener

destruction,

46e

quantity,

9g, 35

storage,

35

use,

35

Time of discharge,

9b

Tool kit,

10a, 77a

Training,

15, 30a

Trigger,

14b, 26a, 49, 52, 63, 76

Trigger rod

description,

76a

lubrication,

49

maintenance,

52l, 76d

Trigger screw,

76

Trigger spring,

52k, 63d, 76

- U -

Underbrush,

22b

Uses of flame throwers,

3

- V -

Valve-adjusting wrench

source,

48a

use,

75d

Valve, pressure-tank,

75

Valve-diaphragm assembly,

10, 48b, 56c, 58a, 74, 75

Valve flexible shaft

adjustment,

66d

description,

66a

installation,

66c

lubrication,

49

removal,

66b

Valve grip

action,

14c, 74a

description,

74a

effects of dirt,

42

installation,

74c

leaks,

58a

lubrication,

49, 56d, 74d

maintenance,

74d

removal,

74b

Valve-grip spring,

74

Valve lever

description,

74a

installation,

74c

lubrication,

49

operation,

14c, 62, 74a

play,

52e

removal,

74b

Valve needle

adjustment,

52e, 75d

cleaning,

52, 55d

description,

75a

installation,

75c

leaks,

58

removal,

75b, 75e

Valve, fuel

adjustment,

61a

cleaning,

56f, 61d

description,

5b, 74a, 75a

effects of dirt,

42

failure to close,

62

installation,

61a, 74c, 75c

leaks,

56c, 58

lubrication,

49

operation,

14c, 26b, 61a, 74a, 75a

removal,

74c, 75c

testing,

56c

Valve pressure-tank

description,

5a, 66a

effects of dirt,

42

installation,

66c

operation,

14a, 21, 55g, 61b

removal,

66b

replacement,

48b, 66e

testing,

51a, 53c

Valve spring,

75

Void in fuel tanks,

53b, 68a

- W -

Washer, coupling,

10b, 48b, 70, 73d

Washer, diaphragm,

75

Water

and ignition cylinder,

31, 41

effect on fuel,

35e

effect on thickener,

35e

effect on weapon,

41, 51g, 71e

use in testing,

56b, 67d

use in training,

15

Weights,

4d, 9c

Wind, effects of,

23, 45

Wrenches,

10a, 48a, 67d

- Y -

Yoke,

75

Yoke block,

75

Yoke shaft,

75

NOTES

REPRODUCTION PLANT

CHEMICAL WARFARE SCHOOL

EDGEWOOD ARSENAL MD

1944

Transcriber’s Notes:

The original accentuation, spelling, punctuation and hyphenation has been retained, except for apparent typographical errors.

*** END OF THE PROJECT GUTENBERG EBOOK PORTABLE FLAME THROWER M2-2 ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

War Department Technical Manual TM 3-376A PORTABLE FLAME THROWER M2-2

War Department - 16 May 1944 Washington, D. C.

TECHNICAL MANUAL PORTABLE FLAME THROWER M2-2

TABLE OF CONTENTS

PART ONE INTRODUCTION

Section I GENERAL

1. SCOPE.

2. RECORDS.

Section II DESCRIPTION AND DATA

3. USES OF FLAME THROWERS.

4. CHARACTERISTICS AND EMPLOYMENT.

5. DESCRIPTION AND FUNCTIONING.

6. IDENTIFICATION INFORMATION.

7. DIFFERENCES IN MODELS.

8. INTERCHANGING PARTS WITH M1 OR M1A1 FLAME THROWER.

9. DATA.

Section III TOOLS, PARTS, AND ACCESSORIES

10. ITEMS WITH EACH FLAME THROWER.

PART TWO OPERATING INSTRUCTIONS

Section IV GENERAL

11. SCOPE.

Section V SERVICE UPON RECEIPT OF EQUIPMENT

12. NEW EQUIPMENT.

13. USED EQUIPMENT.

Section VI CONTROLS

14. CONTROLS.

Section VII OPERATION UNDER USUAL CONDITIONS

15. TRAINING.

16. CHARGING, FILLING, AND SERVICING.

17. CONNECTING TANK GROUP AND GUN GROUP.

18. LOADING WITH IGNITION CYLINDER.

19. CARRYING THE TANK GROUP.

20. CARRYING THE GUN.

21. OPENING PRESSURE-TANK VALVE.

22. RANGES.

23. WIND DEFLECTION.

24. FIRING POSITIONS.

25. AIMING.

26. FIRING.

27. CEASING OR INTERRUPTING FIRE.

28. ADDITIONAL BURSTS.

29. SOAKING THE TARGET.

30. AFTER FIRING.

Section VIII AUXILIARY EQUIPMENT

31. IGNITION CYLINDER.

32. CHARGING PRESSURE TANK.

33. PRECAUTIONS WHEN PRESSURE-CHARGING.

34. CHARACTERISTICS OF FUELS.

35. PREPARATION OF THICKENED FUELS.

36. PREPARATION OF LIQUID FUELS.

37. FILLING BY POURING.

38. FILLING BY FORCE PUMP.

39. FILLING BY BLOWING.

40. PRECAUTIONS WITH FUELS.

Section IX OPERATION UNDER UNUSUAL CONDITIONS

41. WET CONDITIONS.

42. DUST AND MUD.

43. HEAT.

44. COLD.

45. WIND.

Section X DEMOLITION TO PREVENT ENEMY USE

46. DESTRUCTION PROCEDURE.

PART THREE MAINTENANCE INSTRUCTIONS

Section XI GENERAL

47. SCOPE.

Section XII SPECIAL ORGANIZATIONAL TOOLS AND EQUIPMENT

48. SERVICE KIT.

Section XIII LUBRICATION

49. LUBRICATION.

Section XIV PREVENTIVE MAINTENANCE SERVICES

50. GENERAL

51. BEFORE-OPERATION SERVICE OF TANK GROUP.

52. BEFORE-OPERATION SERVICE OF GUN GROUP.

53. SERVICE WHEN FILLING AND CHARGING.

54. SERVICE WHEN FIRING.

55. SERVICE AFTER FIRING.

56. SERVICE AFTER SIX FIRING MISSIONS.

Section XV TROUBLE SHOOTING

57. PRECAUTIONS.

58. FUEL LEAKS.

59. SAFETY HEAD “BLOWS” (BREAKS).

60. CARRIER UNCOMFORTABLE.

61. SHORT RANGE.

62. FUEL-VALVE FAILURE.

63. FAILURE OF IGNITION CYLINDER TO IGNITE.

64. FAILURE OF FUEL TO IGNITE.

Section XVI TANK GROUP

65. GENERAL.

66. PRESSURE TANK AND VALVE ASSEMBLY.

67. PRESSURE REGULATOR.

68. FUEL-TANK ASSEMBLY.

69. FILLING AND SAFETY-HEAD PLUG ASSEMBLIES.

70. TANK COUPLING.

71. CARRIER.

Section XVII GUN GROUP

72. GENERAL

73. FUEL-HOSE ASSEMBLY.

74. VALVE GRIP.

75. BARREL AND VALVE-BODY ASSEMBLY.

76. IGNITION HEAD.

APPENDIX

Section XVIII SHIPMENT AND STORAGE

77. SHIPMENT AND STORAGE.

Section XIX LIST OF REFERENCES

78. REFERENCES.

INDEX

NOTES

THE FULL PROJECT GUTENBERG LICENSE