Specimens of British Trench Orders
Date: 2016-09-22T00:00:00+00:00
Keywords: World War; 1914-1918; Great Britain. Army; Intrenchments; Military orders

The Project Gutenberg eBook of Specimens of British Trench Orders

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Specimens of British Trench Orders

Author: Army War College

Release date: September 22, 2016 [eBook #53126]
Most recently updated: October 23, 2024

Language: English

Credits: Produced by Brian Coe, Graeme Mackreth and the Online
Distributed Proofreading Team at http://www.pgdp.net (This
book was produced from images made available by the
HathiTrust Digital Library.)

*** START OF THE PROJECT GUTENBERG EBOOK SPECIMENS OF BRITISH TRENCH ORDERS ***

CONFIDENTIAL!

FOR OFFICIAL USE ONLY

SPECIMENS OF BRITISH
TRENCH ORDERS

ARMY WAR COLLEGE

1917

WASHINGTON
GOVERNMENT PRINTING OFFICE

1917

War Department,
Document No. 590.
Office of The Adjutant General.

WAR DEPARTMENT,
Washington, May 15, 1917.

The following specimens of British trench orders are published for the information of all concerned.

(2598135, A. G. O.)

By order of the Secretary of War:
H. L. SCOTT,
Major General, Chief of Staff.

Official:
H. P. McCAIN,
The Adjutant General.

CANADIAN CORPS TRENCH ORDERS.

CONTENTS.

SUBJECT. |
| Paragraph.
Duties | 1
Sentries | 2
Rifles, equipment, and ammunition | 3
"Stand to" | 4
Bombs and grenades, care of | 5
Machine guns | 6
Firing at aeroplanes | 7
Trench sides, undercutting of | 8
Sanitation | 9
Time-tables and organization of work | 10
Log books and trench store books | 11
Communications | 12
Alertness | 13
Rum | 14
Arrangements in case of attack | 15
Working parties on front trench | 16
Working parties outside the front trench | 17
Precaution when our mines are exploded | 18
Ration parties when found from front trenches | 19
Rations and cooking | 20
Vermorel sprayers | 21
Reliefs: |
General | 22
Points to be noted by company commanders | 23
Guides | 24
Smoking and talking | 25
Rate of march to trenches | 26
Procedure on arrival in trenches | 27
Engineers | 28
Chilled feet and frostbite, prevention of | 29

CANADIAN CORPS TRENCH ORDERS.

1. DUTIES.—(a) One officer per company and one N. C. O. per platoon will always be on duty.

(b) By night the officer and N. C. O. on duty will frequently patrol the trench line to see that the sentries are alert and to inquire whether they have any information to report about the enemy.[1]

(c) The N. C. O. coming on duty will go round and post new sentries with the N. C. O. coming off duty.

(d) The length of each tour of duty will depend on the number of officers and N. C. O.'s available in the company. Normally each tour should be, by night 2 hours, by day 4 hours, day commencing at morning "stand to," and by night commencing at evening "stand to." In inclement weather it may be advisable to reduce the tour to 1 hour.

(e) N. C. O.'s after posting sentries will report "All correct" or otherwise to the officer on duty.

(f) The officer on duty will be responsible for sending in the reports required by battalion headquarters, unless there is anything unusual to report, when this duty will be performed by the company commander.

(g) Men will be warned for duty by the platoon N. C. O. on duty. This will be done at evening "stand to."

(h) On being detailed for duty a man will be informed at which hours he will come on duty.

(i) When possible to do so, notice boards will be placed in each section's trench, on which will be pinned daily all orders regarding working parties, and a list of the men in the section, giving the times at which they will come on sentry and other duty.

(j) Except under special circumstances, such, for instance, as a sentry being killed or wounded, no sentry will be relieved by another man unless the relief is properly carried out in the presence of a N. C. O.

2. SENTRIES—By night.—(a) Sentries will be posted every 2 hours, except under bad weather conditions, when the length of the tour of sentry duty may be reduced.

(b) From evening "stand to" till morning "stand to" one sentry to every four men will be posted. If wiring or digging parties are out in front, or listening posts are numerous, this number may be reduced.

(c) The next relief will remain within reach of the sentry.

(d) Every sentry is to be regularly posted by a N. C. O., who will explain to him his duties and the front to be watched, and ascertain that the sentry and his relief are aware of the position of the section and platoon commanders, the sentries on either side, and whether there are any patrols or working parties out in front. Should there be salients in the line, the sentry will be carefully instructed, so as to avoid any possibility of him firing toward his own trenches.

(e) By night or in places which have the reputation of being dangerous, i.e., where enemy are suspected of mining, advanced posts, etc., no man should ever be posted alone. There should either be a double sentry post or the next relief should rest within kicking distance of the sentry.

By day.—(f) The number of sentries required depends on the proximity of the enemy's trench line and whether a good view to the front can be obtained; normally one to every four days is sufficient.

(g) Every sentry will be provided with a periscope.

(h) Well-protected "look-out" posts for sentries will be built along the front trench line.

(i) Sending out of patrols.—Patrols will never be sent out without definite orders as to what is required of them. Patrols will go out via a listening post (if such exist). All listening posts will be warned of the strength of the patrol and the approximate hour of departure and return. Word will be passed quietly along the line of sentries that a patrol is out in front.

(j) As little challenging as possible will be done by sentries, and then only in a low tone of voice.

3. RIFLES, EQUIPMENT, AND AMMUNITION.—(a) Carrying and wearing of.—Equipment will always be worn by men in front trenches.

(b) Ration and carrying parties, orderlies, etc., will wear bandoliers and carry rifles.

(c) Parties at work between the front-line and reserve trenches may be permitted to "pile" or "ground" arms. Wiring and digging parties out in front of the fire trench will sling the rifle.

(d) Loading of rifles.—Except when it is necessary to shoot, a round will never be kept in the chamber. Cut-offs will always be "in" and the safety catch "back."

(e) The magazine will be kept charged with five rounds.

(f) Bayonets will always be fixed in front-line trenches.

(g) Care of rifles.—Rifles and ammunition will be inspected at morning and evening "stand to," and rapid loading will also be practiced.

(h) Covered rifle racks will be constructed in each bay where rifles will be kept. Breech covers will be kept on the rifles.

(i) In very cold weather sentries will occasionally work the bolt of the rifle to prevent the striker becoming frozen. For the same reason, in cold weather men will sleep with their rifles close to the body.

(j) All loading will be from pouch or bandolier; no ammunition must ever be placed on ground or parapet.

(k) Disposal of rifles, equipment, and ammunition.—Wounded and men going sick will, if able to walk, wear their equipment and carry their rifles. The rifles and equipment of men unable to carry them and also those of dead men will be sent back to the dressing station. All other rifles, however badly damaged, and equipment damaged or not required will be sent back to the quartermaster. Damaged cartridges and empty cases will be collected and returned to the quartermaster under company arrangements.

(l) Ammunition.—Every man will have 170 rounds in his possession.

(m) Platoon commanders will report at evening "stand to" whether their ammunition is correct or otherwise.

4. "STAND TO."—"Stand to" will take place 1 hour before daylight and 1 hour before dusk. At this parade every available man will be present. Rifles, ammunition, equipment, clothing, etc., will be inspected. Rapid loading will be practiced. The firing position of every man will be tested, to see whether he can hit the bottom edge of our wire. Gas helmets and respirators will be inspected in accordance with the orders in force. Orders will be issued and steps taken to see that the men understand them. After "stand to" in the morning and before "stand to" in the evening rifles will be thoroughly cleaned and oiled.

5. CARE OF BOMBS AND GRENADES.—(a) Only a small percentage of bombs will be kept in the front trenches. These will be kept in a well-protected and dry bomb receptacle.

(b) Bomb stores will be built in the end of communication trenches in the support line.

(c) Detonators and fuzes, except in the front lines, will normally be kept in tins and not in the bomb.

(d) The battalion grenadier officer will make frequent inspection of all bombs and grenades.

(e) The alarm posts for grenadiers will be close to where the bomb stores are placed.

(f) No one, other than a grenadier, will interfere with the bombs and grenades.

(g) Ammunition boxes in the trenches will be examined frequently to see if the lids work easily.

6. MACHINE GUNS.—(a) The concealment and protection of machine-gun emplacements is important—for this reason, except in case of emergency, machine guns will not be fired from their regular emplacements.

(b) Unless emplacements are well concealed, guns will not be mounted except between evening and morning "stand to."

(c) Two men per detachment will always be on duty with the gun.

(d) Before dusk, while there is still sufficient light, each gun will be laid on some particular spot either in or behind the enemy's front line.

(e) Range cards will be prepared and kept with each gun.

(f) Machine guns in the front line should be reduced to a minimum sufficient to cover the front.

7. FIRING AT AEROPLANES.—Firing at aeroplanes will not be permitted except by order of an officer.

8. UNDERCUTTING TRENCH SIDES.—(a) The undercutting of trench sides to make shelters is forbidden.

(b) When shelters are made the required space from the ground level downward will be cut out and a roof supported on reliable posts will be made.

9. SANITATION.—(a) The importance of strict attention to sanitation should be impressed on all ranks.

(b) Empty tins or other refuse will be collected in receptacles kept for the purpose in the trenches and buried in a refuse pit.

(c) Latrines will be constructed in trenches leading from communication trenches. Where the bucket system is employed, chloride of lime or creosol will be freely used. The soil will be removed at night and buried in a deep pit well away from the trenches; these pits will be filled in when nearly full and labeled.

(d) The commanding officer is responsible for sanitation in his unit and the medical officer will advise him in sanitary matters, making daily inspections of latrines, refuse pits, and water arrangements. Under the medical officer latrines and refuse pits will be attended to by the regimental sanitary men and water duties by the R. A. M. C. details attached.

10. TIME-TABLES AND ORGANIZATION OF WORK.—(a) A time-table will be drawn up by each company commander. In this time-table he will allot hours of work, rest, and meals.

(b) Working parties will be properly organized. Definite tasks will be allotted. Each commander of a working party should know what work is expected from his party before the hour appointed to commence, so that no time is wasted in getting to work.

(c) Unless it can not be avoided, men should never be taken for sentry duty without having had a reasonable period of rest, and when this becomes necessary a report should be made to the C. O.

11. LOG BOOKS AND TRENCH STORE BOOKS.—(a) Each company commander will keep a log book in which will be entered up daily the work done. This log book will be handed over from one commander to another on relief.

(b) A trench store book will also be kept in which will be entered up all trench stores issued to the company. On relief, the incoming company commander will give a receipt to the outgoing commander for all trench stores taken over.

(c) Commanding officers are personally responsible that no trench stores, bath mats, etc., are used as firewood.

12. COMMUNICATIONS.—(a) Artillery lines will be laid on one side of a trench. Infantry lines on the opposite side.

(b) The Infantry brigade signal officer will exercise general supervision over all lines in the brigade area, and will notify the orderly officer of the Artillery brigade when any Artillery lines require attention or relaying. He will assist the Artillery whenever it may be possible to do so.

(c) Lines will be laid as low as possible, preferably not more than 9 inches from the bottom of the trench. They will be picketed into grooves cut into the side of the trench, the pickets being securely driven in at every reentrant bend and at every 10 yards along the straight.

(d) Lines will be clearly labeled at every 100 yards and at every junction with another line.

(e) All lines will be carefully patrolled at least once daily.

(f) One telephonist will always be on duty.

(g) Telephone communication to battalion headquarters and the company on each flank will be frequently tested.

(h) All "dead" lines will be reeled up at once.

(i) Every man is to know the position of his platoon commander's shelter and the company headquarters.

(j) At least two men per section of the support and reserve companies must be able to act as guides to all the company headquarters of the battalion.

(k) All officers must know the shortest route from their own headquarters to those of the company on their flanks and to their own battalion headquarters.

(l) It is the duty of every officer or man to fasten any loose wire that he may see which has become temporarily detached.

13. ALERTNESS.—Anything seen or heard in connection with the enemy, such as movements of individuals, transport wagons, troops, working parties, etc., is to be reported to the nearest officer.

14. RUM.—(a) Rum will always be kept under the personal charge of the company commander.

(b) The best time for a rum issue is in the early morning.

(c) No issue of rum will be made except in the presence of an officer; any rum left over will be handed back to the charge of the company commander.

(d) Men undergoing punishment for drunkenness will receive no issue of rum for 14 days after the offense, unless it is necessary for medical reasons.

15. ARRANGEMENTS IN CASE OF ATTACK.—(a) Company commanders will insure that all ranks know what to do in case of bombardment, gas, or attack by the enemy. They will occasionally test their arrangements by practicing an alarm.

(b) All officers' servants, grenadiers, orderlies, etc., will have duties allotted to them in case of attack.

16. WORKING PARTIES.—(a) All work on a fire trench will be carried out by the garrison of the trench, assisted, if necessary, by the garrison of the support and reserve trenches.

(b) All work in rear of fire trenches will be carried out by the garrison of the support and reserve trenches.

(c) If possible, working parties will consist of complete units, i.e., section, platoon, or company. Each unit will be commanded by its own commander.

(d) Even when working under engineer supervision, Infantry officers in charge of working parties will be responsible that the work done satisfies tactical requirements.

17. WORKING PARTIES OUTSIDE THE FRONT TRENCH.—(a) A covering party will always be provided for digging and wiring parties outside the front trenches.

18. PRECAUTION WHEN ONE OF OUR MINES IS EXPLODED.—In the event of one of our own mines being exploded, a clear space of 5 yards will be kept on either side of the mouth of the mine shaft.

19. RATION PARTIES WHEN FOUND FROM FRONT TRENCHES.—Usually, rations and stores will be carried up to the trenches by supports and reserves. If this is not possible and it is necessary that men from the front trenches have to be employed, not more than 10 per cent of the men in the firing line are to be away from the trenches at the same time.

20. RATIONS AND COOKING.—(a) Ration parties from the support and reserve trenches will be made up in complete units as in 16 (c).

(b) The company quartermaster sergeant will accompany the ration parties for his company and report his arrival to the company commanders.

(c) Great care is to be taken that ration and carrying parties make as little noise as possible.

(d) Cooking, if possible, will be done behind the front-line trenches and should be concentrated by sections or companies. Steps must be taken to ensure that as little smoke as possible is made by the cooks' fires.

(e) Unused rations will be returned to the quartermaster.

(f) Waste in any form will be discouraged.

(g) Arrangements should be made to ensure that soup or some hot drink should be available for the men between midnight and 4 a. m.

21. VERMOREL SPRAYERS.—(a) Vermorel sprayers form part of trench stores. They are provided for clearing gas out of trenches and shelters after an attack, and for respraying helmets if necessary during a prolonged gas attack.

(b) They will be distributed at easily accessible points in the trenches and protected from shell fire.

(c) They must be kept one-third full of water. Six gallons of the following solution to be used in them must be kept in corked rum jars close to each sprayer. It must not be kept in the sprayers owing to its corrosive nature:

Water, 3 gallons (one large bucket).
Sodium thiosulphate (hypo), 6 lbs. (two piled mess tins).
Sodium carbonate (washing soda), 2 lbs. (one mess tin).

(d) Each company will have a squad of men in charge of an N. C. O. trained in the care and use of sprayers.

(e) On taking over trenches, the N. C. O. in charge of sprayers will take over from the outgoing N. C. O. and will see that each is in order and provided with solution.

(f) A man will be told off to each sprayer; he will be responsible for testing it every day, and in case of a gas attack he will stand by to use it when ordered.

RELIEFS.

22. GENERAL.—(a) Prior to taking over a new line of trenches the commanding officer, adjutant, machine-gun officer, signaling officer, and company commanders will reconnoiter the trenches.

(b) Machine guns will not be relieved at the same time as the infantry.

23. POINTS TO BE NOTED BY COMPANY COMMANDERS.—(a) Number of men holding line to be taken over and distribution.

(b) Shelter accommodation.

(c) Work being done and proposed. To ensure a continuity of work an officer of the incoming battalion should go over line in daylight.

(d) Condition of the wire and defenses generally.

(e) Information as to the enemy, his habits, snipers, the work he is doing, &c.

(f) Water supply.

(g) Artillery support.

(h) Communications.

(i) Dangerous points.

(j) Lines of advance to be used in a counter attack.

(k) Position of "shell trenches" or "feathers," or other cover from enemy artillery fire.

24. GUIDES.—(a) Arrangements will be made between the C. O. of relieving and about to be relieved battalions as to places where guides will be provided by the latter to conduct the incoming troops to the trenches.

(b) One guide per platoon, one for each company headquarters, and one for battalion headquarters will be provided.

These guides must know the exact spot where they will meet the relieving troops and the best and safest way to the trenches.

25. SMOKING AND TALKING.—After leaving the rendezvous there is to be no smoking or talking till arrival in the trenches.

26. RATE OF MARCH TO TRENCHES.—The rate of marching to the trenches from billets will not exceed 2 miles an hour.

27. PROCEDURE ON ARRIVAL IN TRENCHES.—(a) The troops being relieved will not leave the trenches until all trench stores have been handed over and receipts received, all the relieving troops are in position, and new sentries have been posted and orders to move have been received from the company commander.

(b) Platoon commanders will at once personally examine all firing positions and satisfy themselves that each man can fire on the foot of the nearest part of the wire entanglement.

(c) They will examine the ammunition and bomb magazines, vermorel and other sprayers, and antigas solution vessels.

(d) When the relief is completed O. C. companies will report to that effect to battalion headquarters.

(e) Men will not be dismissed till the O. C. company has received reports from all his platoon commanders that everything is in order.

28. ENGINEERS.—(a) To insure continuity of work a few sappers should live permanently in the trenches.

(b) Daily requisitions for engineering material required will be forwarded by company commanders to battalion headquarters.

(c) The battalion commander will apply to the field company for the material required through the brigade headquarters and will arrange for carrying parties to take it in.

29. PREVENTION OF CHILLED FEET AND FROSTBITE.—(a) Before marching to trenches, feet and legs will be washed and rubbed with antifrostbite grease or whale oil under platoon supervision. Boots should be large enough for two pairs of socks, and puttees must be put on loosely.

(b) The march to the trenches will be in ankle boots, every man will carry two pairs of spare socks, spare grease, and towel.

(c) On arrival at the trenches, take off ankle boots and wet socks, dry and grease feet, put on dry socks, gum boots (trench stores) or paper stockings and ankle boots.

(d) During the tour in the trenches, circulation must be kept up by movement; the restriction of the circulation of the lower limbs is the principal cause of chilled feet.

(e) Boots and puttees will be removed at least once in every 24 hours, feet and legs will be dried, rubbed, and greased, and dry socks put on.

(f) Gum boots will be taken off before troops march out on relief and will be handed over as trench stores to the relieving unit.

(g) On arrival in billets, feet will be washed and rubbed; dry socks, hot drinks, and food will be provided under battalion arrangements.

(h) Warming braziers made from 3 and 5 gallon oil drums will be provided, and a daily allowance of 2 lbs. coke and ½ lb. charcoal per man in the trenches. An extra pea-soup, tea, and sugar ration will also be issued.

(i) C. O.'s are responsible that all trench pumps on charge are kept in good repair and made use of to the fullest extent. The drier the trenches are the fewer will be the cases of chilled feet.

C. H. Harrington,
B. G. G. S., Canadian Corps.

October 21, 1915.

FOOTNOTES:

[1] The officer should remember that he is in the same position as is the officer on watch on board a ship.

SPECIMEN OF BATTALION TRENCH STANDING ORDERS.

1. Trenches are usually divided up into a certain number of bays; the number of men to defend these bays depends on the length of trench allotted to each company. Each section is detailed to guard a certain number of bays.

2. N. C. Os. and men must always wear their equipment by day and night; a man found not complying with this order commits a "crime."

3. Every company will stand to arms daily half an hour before dawn, and half an hour before dusk and will remain so till dismissed by O. C. company.

4. The enemy's trenches are so close that it is very important for the men to have their rifle sights always at "normal," so that there will be no necessity to alter the sights in case of alarm.

5. By night all bayonets are to be fixed, and 50 per cent of the men on duty in the trenches are to be sitting on the firing platform with their rifles by their sides.

6. In case of an attack, especially at night, it should be impressed on the men that they should fire low; for one bullet that goes too low, at least 90 go too high. A bullet that goes too high is wasted, whereas a bullet that goes too low is a ricochet and is often more dangerous than any other kind of bullet.

7. Section commanders are responsible that the men under their command have sufficient standing room for the purpose of firing over the parapet. It is very important to insure that the men have a clear field of fire, and are able not only to see the enemy's trenches but also the ground in the immediate vicinity of their own trench. It is of the greatest importance to arrange that the men can fire comfortably from the parapet and that they can get the butt comfortably into the hollow of the shoulder when the rifle is resting on the parapet.

8. When making new trenches it should be impressed on the men that the parapet must be at least 5 feet thick at the top in order to be bullet proof.

9. If any part of the parapet requires repairing or altering, the matter should be reported at once by the section commander to his platoon sergeant, who will in turn report the matter to superior authority.

10. The general work of repairing the trenches, fatigues, etc., will be carried out either by day or by night according to company arrangements. Certain hours will be alloted for these tasks, and no man in the company is to be employed in any kind of work out of these hours, unless permission is obtained from O. C. company.

11. No man should ever leave his post in the trenches either by day or by night, without the permission of the N. C. O. in charge of that post.

12. As a general rule, by night there should be at least one sentry post to each ten yards of parapet.

13. By night double sentries should always be posted, if possible, and no sentry should be kept on duty for a longer period than 1 hour at a time. It should be so arranged that when one of the sentries is doing his last ½ hour on sentry, his comrade will be doing his first ½ on duty.

14. Sentries by night should always have their rifles resting on the parapet ready to fire at moment's notice.

15. As few sentries as possible should be posted by day, so as to give as much rest as possible to the remainder of the men.

16. By day any existing loop holes may be used by a sentry for observation purposes, but this is strictly prohibited at night, when the sentry must look over the parapet.

17. If a sentry is continually fired at, the section commander will take steps to post him in another position, but not far away from the original position.

18. By night arrangements must be made in each platoon for a N. C. O.[2] to be continually on duty for the purpose of visiting the sentries, etc., etc. He will report to his company officer at odd hours and to his platoon officer at even hours.

19. Cases have occurred of men going to sleep on sentry duty. This is the most serious crime a soldier can commit on active service. The G. O. C. has clearly stated that in future, if any man has been convicted by court-martial for this offense and sentenced to be shot, he will confirm the sentence. There is no excuse for a man going to sleep on sentry duty; if he is feeling too ill to perform this duty he should report the fact to the N. C. O. on duty of his platoon, who will in his turn report the matter to superior authority.

20. If an armed party of the enemy approaches the trench under a flag of truce, they should be ordered to halt at a distance and lay down their arms, and the matter should be reported at once to the O. C. company. If the party fails to halt when ordered to do so, or does not convey a flag of truce, they should immediately be fired upon. An unarmed party should be halted the same way at a distance, and the matter be reported to the O. C. company.

21. By night it is not necessary to challenge anyone in advance of the trenches, but fire should be opened at once. If, however, the company is sending out listening, working, or covering parties, these orders should be modified, and special instructions issued to meet the case.

22. Men will be specially picked from the company for listening patrols and as sharpshooters. These men will be given special privileges and their work is such that they will be afforded greater opportunities of being mentioned in dispatches.

23. It is the duty of officers and N. C. Os. to check men talking loudly during the night, as this practice makes it impossible for the sentries to hear any movement in front of the trenches. The Germans take advantage of this talking by the British soldier during the night to send listening patrols quite near to our trenches, and even build trenches on clear moonlight nights close to our lines without our knowledge.

24. All working parties must wear their equipment and carry their rifles, but when actually working they can lay these on the ground close to them.

25. All picks and shovels after use will be returned to the company store.

26. Ration parties and parties carrying material for repairs, etc., need not wear their equipment or carry rifles, but should be accompanied by a fully armed N. C. O. as an escort.

27. Not more than twenty men are to be away from the company at the same time. 1 N. C. O. and 4 men per platoon.

28. Every soldier must remember it is of the utmost importance to keep his rifle clean and in working order whilst in the trenches. His very life may depend upon this, as he is liable to be rushed at any moment, either by day or by night. The dirty rifle means probably a jammed one after the first round.

29. The first duty of a soldier, therefore, is to clean his rifle every morning as soon as there is sufficient light to enable him to do so; an hour will be appointed by O. C. company for this purpose. The platoon sergeant will be responsible that section commanders superintend this work, and inspect the rifles of their section. Any man who is found with a dirty rifle will be made a prisoner.

30. All rifles by day to be in racks, except those used by the sentries, and arrangements should be made by section commanders to improvise racks if they are not provided.

31. Great care is to be exercised to keep the trenches clean and in a sanitary condition. Platoon commanders will be responsible for the latrines in their section of the trenches. Any man fouling the trenches will be severely dealt with. No water is to be taken for drinking or cooking purposes except from the water cart or tanks provided for this purpose. Disregard of this regulation will probably cause an outbreak of typhoid or dysentery amongst the men of the company.

32. Stretcher bearers will be stationed at a place appointed by the C. O. If a man is wounded, information should be sent at once to these stretcher bearers, whose duty it is to carry wounded to the aid post or dressing station.

Men should not be taken from the firing line for this purpose.

33. No soldier is to be buried nearer than 300 yards from the trenches.

34. In each platoon a N. C. O. will be detailed for duty by day. This N. C. O. will do no night duty, but will get a full night's rest. His duties are to post the day sentries and to see that they are alert and carrying out their duties correctly. He will be generally responsible for the cleanliness of his lines and will frequently visit the latrines. It is part of his duties to see that any loose ammunition lying about is collected.

35. The platoon sergeant will always send, if possible, a N. C. O.[2] to draw the rations, and this N. C. O. will be responsible for their safe delivery. This especially applies to the issue of coke. The C. S. M. will, prior to his day of relief from the trenches, always collect the articles of trench equipment supplied for his company and make out a list of the same. These articles will be handed over to the company sergeant major of the relieving company.

36. The system of passing down messages by word of mouth, man to man, must not be used. If an officer or N. C. O. has anything important to report he should do so in writing. If there is no time to do this, a special messenger should be intrusted with a verbal message which should afterwards be confirmed in writing.

37. Special instructions have been issued as to precautions against gas. These are to be strictly followed.

FOOTNOTES:

[2] An acting N. C. O. will not be employed on this duty.

BRIGADE STANDING ORDERS FOR THE TRENCHES.

1. RELIEFS.—(a) When a battalion is taking over a new line of trenches the company commanders will invariably visit the trenches on the day previous to that on which the relief takes place. They will gain as much information as possible from the company commanders they are relieving.

(b) An officer of each company should proceed in advance to the trenches on the day of the relief to take over, during daylight, all trench stores, ammunition, etc. Mutual receipts for these will be signed.

(c) Machine gunners, bombers, snipers, and signalers will not be relieved on the same day as companies. They should proceed to the trenches 24 hours before their battalions, and take over their posts during daylight.

(d) The strictest march discipline will be maintained by all parties proceeding to or from the trenches. An officer will march in rear of each company to ensure that it is properly closed up.

(e) Reliefs will be carried out as quietly as possible. No smoking or lights will be allowed after reaching a point to be decided on by battalion commanders.

(f) Guides at the rate of one per platoon, machine gun, or bombing post will invariably be arranged for by brigade headquarters when battalions proceed to the trenches. Likewise, when battalions are being relieved, a similar number of guides will be detailed by them to meet relieving units.

(g) On taking over a line of trenches a company commander will at once get in touch with the companies on his right and left; he will ascertain the position of the nearest supporting troops, of the reserve ammunition, of any machine guns or bombing posts, and of his battalion headquarters; he will ascertain the best and quickest means of obtaining artillery support, and he will have all wires, including the artillery wire, if there is one, tested. When his platoons have taken over, and he is satisfied that all is correct, he will inform his commanding officer by telephone that the relief of his company is complete.

(h) The actual relief of trenches should be carried out in the following manner:

The platoon being relieved gets on the firing step.

The relieving platoon files in behind and halts. On the word "pass," which will be given quietly, being passed along, the relieved and relieving platoons will change places. The company commander of the relieving company will then supervise the posting of sentries by his platoon commanders. He will satisfy himself that each post is properly relieved and that the orders for the post are correctly handed over. The greatest care and attention to detail are necessary in this.

The exact frontage for which each platoon commander is responsible will be clearly defined.

Before dismissing his company the company commander will ensure that each man has an alarm post from which he can use his rifle freely and fire at the bottom of our own wire entanglements. Each man must also know the position of company headquarters, the reserve ammunition, and latrines. Every company commander in the front line will have control of the grenadiers employed on his front.

(i) Within 24 hours of taking over a new line of trenches a company commander will forward a report on his trenches as follows:

Garrison of trench.

Field of fire.

Distance from enemy's trench.

General condition of trench.

Whether every man has a post from which he can fire at the bottom of our own wire entanglements.

Number of efficient loopholes.

Whether the parapet is bullet proof throughout.

Whether sufficient traverses.

State of our wire.

State of enemy's wire.

Drainage.

Number of boxes of reserve ammunition.

Number of bombing posts and of bombs with each.

Number of rounds of Very pistol ammunition.

Number of Vermorel sprayers.

Number of gongs.

A rough sketch showing the position of bombers' posts, machine guns, grenade stores, and reserve ammunition should accompany the report.

(j) Before handing over trenches, officers commanding companies will draw up a statement containing all available information on the following points:

Our own trenches and wire.

The enemy's trenches and wire.

Habits of the enemy.

Any part of trench which receives more than ordinary attention from the enemy's guns.

Number of bombing posts and bombs at each.

Number of machine guns on company's front.

Work in hand or contemplated.

What artillery covers the front, and how it is best and quickest obtained.

A list of trench stores, ammunition, etc., will also be drawn up ready for handing over. All stores should be carefully stacked in a convenient place. Ammunition, Very lights, sandbags, etc., sufficient for at least 24 hours consumption, should invariably be handed over to the relieving unit.

(k) The following constitute trench stores and will be handed over on relief:

S. A. A. | | Rifle racks.
Shovels. | | Rifle grenade firing stands.
Picks. | | Hand grenades.
Loophole plates. | | Rifle grenades.
Balers. | | Very pistol cartridges.
Fixed rifle batteries. | | Gongs, bells, and alarms.
Sniperscope rifles. | | Vermorel sprayers.
Braziers. | | Pumps.
Catapults. | | Reserve rations.
Grenade throwers. | |
The following will not be handed over: | |
Very pistols. | | Telescopic rifles.
Pistols, illuminating, | | Periscopes.
1½ inch. | | Telephones.

Battalion entrenching tools will not be taken to the trenches. Should the existing tools in the trenches be considered insufficient, application should be made to brigade headquarters for a further supply.

2. SENTRIES.—As a general rule, the following numbers of sentries will be posted:

By day.—One sentry for every 3 bays, exclusive of bombers, snipers, and machine gunners.

By night, in a fog or snowstorm.—One double sentry for each bay, exclusive of bombers and machine gunners.

Sentries will invariably be posted and relieved by a N. C. O. under the orders of the platoon commander.

It must be recognized that no fixed rules can be laid down as regards the number of sentries that are necessary and battalion commanders will use their discretion in the matter. The number required will depend on the proximity of the enemy, the tactical situation, and, above all, on the state of our own wire entanglements.

3. OFFICER AND N. C. Os. OF THE "WATCH."—In every company in the firing line the company commander will arrange for his officers to take it in turns to be on "watch" throughout the twenty-four hours.

Likewise in each platoon the platoon commander will detail a N. C. O. of the watch.

The officer and N. C. Os. of the watch will visit all sentries, bombing posts, and machine guns within the area of their command once every hour by day and by night.

At night the officer of the watch will carry a Very pistol. Very lights should be used sparingly, as they are often difficult to obtain.

The time when lights are most required is when the Germans are not sending any up.

4. STANDING TO ARMS.—Troops will always stand to arms one hour before daylight and one hour before dark. They will remain under arms in the first instance until the enemy's lines are visible, and in the second instance until darkness comes on. At these hours company commanders will arrange for the inspection of arms, ammunition, and equipment by platoon commanders. The latter will satisfy themselves that each man is in possession of two smoke helmets; ammunition will be made up to 120 rounds per rifle when troops stand to arms.

Whenever men stand to arms company commanders will order the parapet to be manned to insure that every man has a post from which he can fire at the bottom of our own wire.

At the inspection of rifles at the hours of standing to arms platoon commanders will satisfy themselves that the bolt action is working freely. A thorough inspection of arms will be held at midday, at which hour men will be washed and shaved.

5. GAS ATTACKS.—(i) It is to be impressed on all ranks that the smoke helmet issued to them affords complete protection against all forms of gas used by the enemy.

(ii) All ranks will invariably carry on their persons smoke helmets. Instruction is to be given in the method of adjusting smoke helmets rapidly, condemned helmets being used for this purpose.

(iii) Smoke helmets will be inspected at morning and evening "stand to."

(iv) The direction of the wind will be studied and special precautions taken when it favors a gas attack by the enemy.

(v) On the first sign of gas, whether it is detected by sight or smell, the sentries will sound the alarm gongs and bells which are hung up at intervals throughout the trenches. On hearing this alarm every officer and man will at once adjust his smoke helmet and fall in on his alarm post. Nobody will remain in dugouts. To make certain of the warning reaching everybody the order "Put on smoke helmets" will be passed from man to man throughout the trenches held by the —— division.

(vi) The officers in command of the trenches opposite the section of the enemy's line from which the gas is proceeding will send the S. O. S. call to the artillery, and will order rapid fire to be opened on the enemy trenches. Neighboring sectors of defense will be at once warned.

(vii) When the gas cloud is sufficiently thick to hide the enemy's front parapets, machine guns and rifles will open fire in short bursts on fixed lines covering the enemy's trenches, in order to inflict casualties, pierce gas tubes, and break up the density of the enemy's gas cloud.

(viii) Garrisons of trenches on the flanks of the front threatened will be prepared to open a flanking fire on the enemy should he attempt to advance from his front line.

(ix) As soon as the S. O. S. call has been sent to the artillery, messages will be sent to brigade H. Q. and the artillery "Gas trench(es)________________________________."

(x) Rifle bolts and machine-gun crank handles to be worked backwards and forwards while gas is about, to prevent the gas from impairing the action.

(xi) Vermorel sprayers to be used in trenches and dugouts in the affected area as soon as the gas has passed over, in order that gas helmets may be taken off.

(xii) Measures will be taken to prevent stragglers.

6. FIXING OF BAYONETS.—Bayonets will always be fixed during the hours of darkness, during a snowstorm, or thick mist, or when the proximity of the enemy renders this course advisable.

7. COUNTER ATTACKS.—As soon as possible after taking over a new line battalion commanders will draw up and submit to brigade headquarters their scheme for counter attacking the enemy should he gain possession of any part of their line.

In framing this scheme it must be borne in mind that in every line of trenches there are certain points which would be of value to the enemy if captured by him, whereas there are others which would be of little use to him.

Should the enemy attack and occupy any portion of our trenches he will be immediately counter attacked and driven out by the nearest body of troops. All ranks must clearly understand that counter attacks made at once and without hesitation will usually be sucessful, even if made by small numbers, but that a counter attack, once the enemy has been given time to establish himself, is a very difficult and costly operation.

8. MINES.—Should the enemy fire a mine in or near our trenches the crater thus formed will be immediately occupied by the nearest troops. This order will be made known to all ranks.

9. FIRING BY DAY AND NIGHT.—By day men will only fire when a target offers itself. If the enemy is in the habit of showing himself at any particular point, the attention of the platoon commander should be drawn to it. The latter will inform the battalion sniping officer, who will tell off a sniper's post to watch the spot.

By night all firing must be organized. If the enemy is believed to be working on his trenches or wire, the company commander will give directions to his platoon commanders to fire five rounds rapid at certain stated times. He will first ascertain that no patrols from neighboring companies will be out at these hours.

A certain number of fixed rifles will be placed in every trench and fired by the sentries. These rifles will be laid on certain selected spots.

Indiscriminate firing by day or night is forbidden.

If the enemy attacks, rapid fire will be opened without waiting for orders.

10. COMPANY MEETINGS.—Officers commanding companies will hold meetings of their platoon commanders and N. C. Os. each evening in the trenches. Only a few officers and N. C. Os. should be present at each meeting. At these meetings the following points should be discussed:

Work required to place our trenches in a better state of defense and to improve the comfort of the men.

Work to be done during the next 24 hours.

It is essential that all work which has to be carried out at night is explained to all noncommissioned officers in daylight.

Any alterations noticed in the enemy's trenches or wire.

What steps can be taken to annoy and harass the enemy.

Action in case of attack.

11. WORK ON TRENCHES.—Work on trenches should as far as possible be carried out during daylight.

12. GARRISONS OF TRENCHES.—It is an invariable rule that during daylight the front-line trenches should be held as lightly as is compatible with safety. At night the garrison must be strengthened.

The actual strength of garrisons will be governed by the tactical situation and by the number of support and communicating trenches at hand.

With proper support and communicating trenches only sentries and snipers should be in the front-line trenches during daylight. To these will be added bombers if there are any old communicating trenches leading to the enemy's lines or if the proximity of the enemy demands their presence.

13. DISCIPLINE.—(a) Sleeping in the front line trenches will not be allowed unless there is an absence of support trenches.

(b) No dugouts will be constructed without the permission of the battalion commander. All dugouts must be made splinter proof. Work on them will not be commenced until sufficient material is at hand. If it can be avoided dugouts will not be constructed in the fire trenches.

(c) No man will leave the trenches without permission from an officer. This order will be made known to all ranks.

(d) Cooking should not take place in the front-line trenches. Whenever possible cooking will be done under company arrangements in order that the men may have their meals at regular hours.

Washing and shaving should be carried out in support trenches when possible.

(e) All parties moving within the trench area will be correctly marched by an officer or N. C. O.

(f) Orderly room should be held daily in the trenches unless circumstances render this impossible.

(g) Sentries are strictly forbidden to wear any covering over the ears.

(h) An officer will always be present when an issue of rum takes place.

(i) Equipment will never be taken off in the front-line trenches except in the case of working parties, when equipment may be removed by order of the company commanders. In support trenches equipment may be removed at the discretion of battalion commanders.

(j) Sentries will remain standing at all times unless the height of the parapet renders this impossible.

(k) All parties, with the exception of stretcher bearers, moving in the trench area will wear their arms and equipment. Orderlies may be excused wearing their equipment at the discretion of commanding officers.

(l) The wearing of cotton bandoliers by working parties and orderlies is forbidden, nor are these bandoliers to be hung up in the trenches.

(m) Ammunition must be kept in a thoroughly clean state. If the ammunition is not clean jambs will occur. Ammunition will be frequently inspected.

(n) The "undercutting" of trenches is strictly forbidden. Drains will always be cut down the center of a trench and not at the sides.

(o) When mining is in progress in any of the trenches occupied by the brigade the sandbags filled with earth from the mine will on no account be used in the front trenches or other points which are visible to the enemy.

14. RECONNAISSANCE AND PATROLLING.—The best security against attack is active patrolling and constant observation of the enemy's lines, so that he can not undertake any new work without steps being taken to prevent its continuance.

The enemy's wire will be constantly patrolled to insure that he has cut no gaps in it with a view to launching an attack.

Patrols will also frequently visit our wire to insure that it is efficient.

The front of our own fire parapet should be examined nightly.

15. INFORMATION.—Every effort will be made by means of patrols, field glasses, etc., to ascertain information about the enemy, his trenches and wire. Any alterations in the enemy's lines must be reported, and if any of the enemy are seen a report will be sent in stating what dress they were wearing. The importance of forwarding all such information will be impressed on all ranks.

16. SNIPING.—In every battalion a sniping section will be formed, consisting of 1 officer and 25 N. C. O.'s and men. The officer will carry out the duties of intelligence officer to his battalion. He will render a daily report to his commanding officer containing the following information:

Number of casualties known to have been inflicted on the enemy.

Number and location of snipers' posts.

Any alterations in the enemy's trenches or wire.

Number of telescope rifles in possession.

Number and location of fixed rifles and rifle batteries in action.

Any activity by the enemy.

Battalion sniping officers will get into close touch with artillery observing officers within their sectors, and will give every assistance to them.

17. ARTILLERY SUPPORT.—As a general rule, a forward observing officer of an 18-pounder battery will be quartered at or near battalion H. Q.

Requests for retaliation should be made to this officer, and brigade H. Q. should be warned of the action taken.

Fire from howitzers and heavy batteries can, except in the case of the S. O. S. signal, only be obtained through brigade H. Q. If retaliatory fire is required from howitzers, it must be stated on what point it is wished that the fire should be directed.

Any trench mortaring by the enemy should be immediately reported to the officer commanding our trench mortars.

18. "S. O. S." AND "TEST" SIGNALS.—In the event of an infantry attack by the enemy, a mine being fired, or other emergency, the S. O. S. signal will be sent by the quickest route to the Field Artillery battery covering the trenches concerned.

The signal will be followed by the number of the trench, e.g., "S. O. S. B4."

The signal will be repeated to battalion H. Q., who will transmit it to brigade H. Q.

On receipt of the S. O. S. signal all batteries covering the trenches concerned will open a concentrated fire on the enemy's front line.

When necessity for fire no longer exists, a message to this effect will be sent to the artillery and to brigade H. Q.

In order to test the efficient working of the artillery lines, "test" messages will frequently be sent from the trenches to the supporting battery.

The number of the trench will always be sent, e.g., "Test A 6."

The test will consist of one round of shrapnel fired on the "night line" of the battery. No target will be given by the officer in the trenches.

The time taken from the handing in of the message until the shell bursts will be carefully noted and reported to battalion H. Q. The O. C. battalion will enter the result of all tests in his daily report. He will give the exact time at which the test was sent and will state whether it was a "direct" or an "indirect" test. A "direct" test is from trench to battery. An "indirect" test is from trench via battalion H. Q. to battery.

19. VERMOREL SPRAYERS.—One man will be detailed to look after each sprayer. A spare tin of solution will be kept with each sprayer. Medical officers will periodically inspect both sprayers and solution.

20. HOSTILE ARTILLERY FIRE.—In reporting activity by the enemy's artillery it is necessary to state:

(i) The time at which shelling began and when it ceased.

(ii) Your own position.

(iii) Whether howitzer or gun.

(iv) Direction from which shells arrive. Compass bearing should be given if possible.

(v) Whether shells burst in the air or on "graze."

In reporting results of our own fire, state:

(i) Your own position.

(ii) Estimate distances short, over, right, or left, in yards. Avoid vague statements.

(iii) Whether gun or howitzer.

(iv) Whether shrapnel or high explosive.

If shrapnel bursts in the air, judge whether range is correct by the splash of the bullets on the ground and not by the burst.

21. AIRCRAFT.—On the approach of any of the enemy's aircraft three blasts will be blown on a whistle. This will be the signal for all ranks to keep perfectly still.

One blast on a whistle will indicate that the aircraft has moved away.

All aircraft belonging to the enemy will be heavily fired on by machine guns and rifles as long as they are within range, but no firing will take place without the order of an officer, who will first satisfy himself that the aircraft is hostile. Directions should be given to the men as to how many lengths in front of the aeroplane aim should be taken. If a "Zeppelin" is sighted, a "priority" message will be sent to brigade H. Q. reporting the fact and stating approximately where the "Zeppelin" was seen and in what direction it was proceeding.

22. MAPS.—Maps with our own trenches marked on them will not be taken into the front-line trenches.

23. TELEPHONE MESSAGES.—No messages regarding the action of our own Artillery or other matters of an important nature will be sent by telephone to the fire trenches. Such messages will be sent by orderly. This is necessary because it has been found that the enemy has, at times, read our messages by induction.

24. SIGNALERS.—The brigade signaling section is responsible for the maintenance of communication between brigade H. Q. and battalions.

Battalion signalers are responsible for communications within the battalion.

All wires must be pinned in to the sides of trenches. Infantry wires on the S. and E. sides and Artillery wires on the N. and W. sides.

Pins for this purpose can be obtained from brigade headquarters.

All wires will be labeled with the name of the battalion at least every 50 yards.

Officers in charge of battalion signalers are responsible that all disused or unlabeled wires within their areas are reeled up.

All wires will be patroled at least once every 24 hours.

25. MEDICAL OFFICERS.—Medical officers attached to battalions will, in addition to looking after the sick and wounded, be responsible for the sanitation of the trenches generally, paying particular attention to the water supply and latrines. Battalion sanitary sections will work under the orders of the medical officer.

The medical officer will accompany the commanding officer periodically on his visits round the trenches.

Stretcher bearers are responsible that the rifles and equipment (including field glasses, wire cutters, etc.), of all men who are wounded are taken with them to the dressing station. The medical officer will instruct the N. C. O. i/c stretcher bearers to see that this order is carried out.

The arms and equipment of wounded men will be sent to the field ambulance with them, the ammunition having first been removed from pouches and magazines. Field glasses, wire cutters, etc., will not be sent to the field ambulance but will be sent to battalion headquarters.

The arms and equipment of men who are killed will be collected at battalion headquarters and handed over to the quartermaster for return to the base.

26. RATION PARTIES.—Parties to carry rations, water, and material to the companies in the front line will be detailed from the companies in reserve.

27. EMPTY CARTRIDGE CASES AND RUBBISH.—At intervals throughout the trenches sandbags will be hung up as receptacles for empty cartridge cases and chargers. Others will be hung up for the collection of rubbish. Sandbags to be labeled accordingly. All empty cases and chargers thus collected will be sent each evening to battalion H. Q. for transmission to the base.

28. DRESS, ETC.—Men must be properly dressed at all times and as smart and clean as circumstances will allow.

All men must shave daily.

Discipline as regards saluting, standing to attention, etc., will receive as much attention in the trenches as in billets.

29. PRISONERS.—Should any prisoners be captured they will be immediately searched, and all documents found on them will be forwarded to brigade H. Q. without delay. Germans usually carry all documents in the skirt pockets of their tunics. A telephone message will be dispatched to brigade H. Q. stating to what regiment the prisoners belong.

All ranks will be warned that should they find themselves in the hands of the enemy it is only necessary for them to give their number, name, and regiment. No other information whatever will be given.

30. RETURNS.—The following returns are due at brigade H. Q. daily when in the trenches:—

At  5.15 a. m.— | Situation and wind | By telephone.
At 11.00 a. m.— | Strength and casualty return | "
| Daily report on typed form | By orderly.
| Artillery intelligence report | "
At  4.00 p. m.— | Situation and wind | By telephone.
At  5.30 p. m.— | Intelligence report | By orderly or telephone.

At  9.00 p. m.—

Return of material required for trench construction to be
sent up the following evening

By telephone.

Activity by the enemy's aeroplanes will always be reported.

_______,

Brigade Major, ______ Brigade.

55TH (WEST LANCASHIRE) DIVISION TRENCH ORDERS.

THIS BOOK IS NOT TO BE TAKEN BEYOND THE FRONT TRENCHES.

Every officer, and every noncommissioned officer in command of any body of troops, is to be in possession of this book and to be thoroughly conversant with its contents.

J. K. Cochrane,
Lieut. Colonel, General Staff,
55th (West Lancashire) Division.

January, 1917.

CONTENTS.

| Section.
Duties | 1
Sentries | 2
Patrols | 3
Alertness | 4
Stand to | 5
Arrangements in case of attack | 6
Machine guns | 7
Cooperation between artillery, etc | 8
Method of dealing with crater formed by mine explosion | 9
Reliefs |
(a) Reconnaissance | 10
(b) Points to be noted by company commander | 10
(c) Guides | 10
(d)Smoking and talking | 10
(e) Rate of march to trenches | 10
(f) Procedure on arrival in trenches | 10
Wiring | 11
Organization of work on defenses | 12
Log books | 13
Undercutting trench sides | 14
Communications | 15
Ration parties from front trenches | 16
Firing at aeroplanes | 17
Rifles, equipment, and ammunition | 18
Precautions against gas attacks | 19
Action during enemy gas attack | 20
Action after enemy gas attack | 21
Action during gas shell bombardment | 22
Discipline with regard to carrying small box respirators | 23
Vermorel sprayers | 24
Sanitation | 25
Rations and cooking | 26
Care of grenades | 27
Steel helmets | 28
Issue of rum | 29
Chilled feet and frost bite | 30

55TH (WEST LANCASHIRE) DIVISION TRENCH ORDERS.

1. DUTIES.—(a) One officer per company and one N. C. O. per platoon will always be on duty. During their tour of duty they will not be in their dugouts. They will frequently visit all trenches occupied by their units.

Every listening post will be visited, if possible, by an officer once during his tour of duty.

(b) The officer on duty will, when his tour of duty is finished, inform the officer relieving him and report to him the situation, work in progress, and any other information of use.

(c) By night the officer and N. C. O. on duty will frequently patrol the trench line, to see that the sentries are alert and to inquire whether they have any information about the enemy to report.

(d) The N. C. O. coming on duty will go around and post new sentries with the N. C. O. coming off duty.

(e) The length of each tour of duty will naturally depend on the number of officers and N. C. O.'s available in the company. Normally each tour should be, by night 2 hours, by day 4 hours, day commencing at morning "stand to" and night commencing at evening "stand to." In inclement weather the tour of duty must be reduced.

(f) N. C. O.'s after posting sentries will report "all correct" or otherwise to the officer on duty.

(g) Men will be warned for duty by the platoon sergeant on duty. This will be done at evening "stand to."

(h) On being detailed for duty a man will be informed at which hours he will come on duty.

(i) Except under special circumstances, such, for instance, as a sentry being killed or wounded, no sentry will be relieved by another man unless the relief is properly carried out in the presence of a N. C. O.

(j) When possible to do so, notice boards will be placed in each sections' trench, on which will be pinned daily all orders regarding working parties and a list of the men in the section giving the times at which they will come on sentry and other duties.

(k) The company commander will be responsible for sending in the reports required by battalion H. Q.

2. SENTRIES.—(a) The number of sentry posts required depends on the propinquity or otherwise of the enemy, the strength of obstacles, the ease with which sentry posts can be reinforced, and other local conditions. There must be sentries enough to insure that the alarm is given promptly in case of attack, and that local resistance is sufficient until support can arrive. Brigade commanders are responsible that these requirements are met.

(b) Sentries will be relieved every two hours, except under bad weather conditions, when the length of a tour of sentry duty will be reduced.

(c) The next relief will remain within arm's length of the sentry.

(d) Every sentry is to be regularly posted by a N. C. O., who will explain to him his duties and ascertain that the sentry and his relief are aware of the position of the section and platoon commanders, and of the sentries on either side, and whether there are any patrols or working parties out in front.

(e) In important places, i.e., where enemy are suspected of mining, advanced posts, etc., no man should be posted alone. There should be a double sentry.

(f) No man who has been on work during the day will be placed on sentry till he has had at least 4 hours for rest, unless it is unavoidable.

(g) When the line is held by small posts at a considerable distance apart, a visiting patrol will also be maintained. This patrol will be responsible for the passing of orders along the line of posts.

(h) All orders are to be passed along the line by one platoon N. C. O. on duty to the next N. C. O. on duty.

(i) Every sentry is to report when an officer passes his post "all correct" or otherwise.

(j) During daylight no more sentries should be posted than are actually necessary to insure that the whole front to be watched is kept under efficient observation.

(k) Every sentry by day will be provided with a periscope.

3. PATROLS.—(a) It is the duty of troops holding the front line to establish a command of the ground in front of their parapet up to the enemy's wire. This can only be done by active and constant patrolling by night and reconnaissance by day, so that the ground is thoroughly well known to as large a proportion as possible of officers and other ranks, and so that no enemy can move or remain in it by day or night without fear of death.

(b) Every patrol must have definite orders as to its mission; broadly speaking, patrols may be divided into two classes: (1) Reconnoitering patrols; (2) fighting patrols.

(c) The first duty of reconnoitering patrols is to obtain the information for which they are sent out. They fight only in self-defense, or if an especially favorable opportunity presents itself of inflicting loss on the enemy without prejudice to their mission. They usually consist of from 2 to 6 men under an officer.

(d) Fighting patrols are sent out with the express purpose of causing loss or damage to the enemy by such means as engaging enemy patrols or working parties, or by raiding saps, listening posts, or trenches. For identification purposes they should always endeavor to secure at least one prisoner. Their strength depends on the nature of the resistance they are likely to meet with.

(e) Battalion commanders are responsible for the orders given to patrols, subject to any instructions which may be issued by higher authority. They are also responsible that all troops whom it concerns are warned when and where patrols will be out, and of the point to which they will return.

(f) The information gained by patrols is of little value unless transmitted quickly to those whom it concerns. Patrol reports will be made out by the commander of the patrol immediately on his return and dispatched at once by way of the battalion H. Q. to brigade H. Q., unless orders to the contrary have been given.

4. ALERTNESS.—Anything seen or heard in connection with the enemy, such as movements of individuals, transport wagons, troops, working parties, etc., is to be reported to the nearest officer by anyone who observes it and at any time.

5. STAND TO.—"Stand to" will take place one hour before sunrise and at sunset. At this parade every available man will be present. Rifles, ammunition, equipment, clothing, etc., will be inspected. Firing steps will be tested as soon as it is dusk to see that each man can fire on the foot of the nearest part of the wire entanglements immediately to his front. They are not to be tested at "stand to" in the morning. Rifles, ammunition, and equipment will be inspected after "stand down" in the morning and at "stand to" at night. Orders will be issued and steps taken to see that the men understand them. Gas helmets and other protective appliances will be inspected in accordance with the orders in force.

The time for "stand to" will be fixed weekly by brigade headquarters.

6. ARRANGEMENTS IN CASE OF ATTACK.—(a) The action to be taken in case of attack is laid down in defense schemes, divisional, brigade, and battalion, with reference to each form of attack which is considerable probable.

(b) In addition, minor defense schemes will be drawn up for each company front, based on battalion defense schemes, and platoon commanders also will keep up schemes based on that for the company and dealing specially with the action of their respective platoons.

(c) All the above schemes, divisional, brigade, battalion, company, and platoon, will be handed over at each relief to the relieving formation, unit, etc. They will be made out in consultation by the formations, units, etc., habitually occupying the defenses with which they deal.

(d) The object of defense schemes is to insure that every officer, N. C. O., and man knows what to do in case of attack, and does it instinctively and promptly. The minor schemes must therefore be detailed and exact, and each officer and man must have his duties thoroughly explained to him by his immediate superior. All defense schemes will be rehearsed once in each relief.

(e) At each relief of a battalion, company, or platoon the commander of it will report to his immediate commander that he has taken over and understands the defense schemes for the position he is occupying.

(f) All officers' servants, bombers, orderlies, etc., will have duties allotted to them in case of attack.

7. MACHINE GUNS.—(a) The concealment of machine-gun emplacements is important; consequently it is only in case of attack that machine guns will be fired from their defense emplacements.

(b) Unless emplacements are well concealed guns will not be mounted, except between evening and morning "stand to."

(c) The guns and their crews will be tactically under the orders of the battalion commander in whose subsector they are located, but no alteration will be made by him in their disposition or arcs of fire; he will, however, bring before his brigade commander any suggestion for improvement in the machine-gun dispositions for defense.

(d) Two men per gun will always be on duty with the gun.

(e) At dusk, but while there is still sufficient light, each gun will be laid on the center line of the zone alloted to it.

(f) Range cards will be prepared and kept with each gun.

(g) Officers will live in close proximity to their guns. They will daily inspect their guns, emplacements, and ammunition. They are responsible for the cleanliness and maintenance of the emplacements.

(h) The machine-gun company commander is responsible that his guns are always ready for action, that the emplacements are clear of all material except such as is required for the service of the gun, that embrasures or loopholes are kept clear of all obstructions which may interfere with fire or view, and that the ammunition is in good condition.

8. COOPERATION BETWEEN ARTILLERY, INFANTRY, MACHINE-GUN COMPANIES, AND TRENCH MORTAR BATTERIES.—The defense of any line depends largely on the cordial cooperation of all officers responsible for the different means of defense. Every opportunity is to be taken by officers of artillery, infantry, machine-gun companies, and trench mortar batteries of becoming personally acquainted with each other and gaining a knowledge of each other's methods. The Artillery liaison officer with a battalion is to be looked on as temporarily a member of battalion H. Q.

9. PRECAUTIONS WHEN ONE OF OUR MINES IS EXPLODED.—(a) In the event of one of our own mines being exploded, a clear space of 5 yards will be kept on either side of the mouth of the mine shaft.

(b) On any front where enemy mining exists, or is suspected, detailed schemes of action will be prepared, under the direction of the brigade commander, to deal with any case of a mine being blown within or without our trench line; and specially organized parties will be kept in immediate readiness for prompt occupation of the crater, where this is advisable (as in the case of a crater within or near our trench line), or for dealing with enemy action. All stores required for consolidation will be kept handy at a special dump in instant readiness and made up into man loads. The orders for action, down to the minutest detail, will be incorporated in the defense scheme and made known to every individual who may have to carry them out.

10. RELIEFS.—(a) Reconnaissance.—Prior to taking over a new line of trenches, the commanding officer, adjutant, and company commanders of battalions, and the commanders of M. G. Coys. and trench mortar batteries, will reconnoiter the trenches.

(b) Points to be noted by company commanders.—The following, among others, are points to be specially noted by company commanders before taking over trenches:

(i) Number of men holding line to be taken over and distribution.

(ii) Shelter accommodation.

(iii) Work being done and proposed.

(iv) Condition of the wire and defenses generally.

(v) Information as to the enemy, his habits, snipers, the work he is doing, etc.

(vi) Water supply.

(vii) Artillery support.

(viii) Communications.

(c) Guides.—(i) Arrangements will be made between the C. O.'s of incoming and outgoing battalions as to the rendezvous where guides will be provided by the latter to conduct the incoming troops to the trenches.

(ii) One guide per platoon, one for each company H. Q., and one for battalion H. Q. will be provided.

These guides must know the exact spot where they will meet the relieving troops and the best and safest way to the trenches.

(d) Smoking and talking.—After leaving the rendezvous there is to be no smoking or talking till arrival in the trenches.

(e) Rate of march to trenches.—The rate of marching to the trenches from billets will not exceed 2 miles an hour.

Strictest march discipline is to be enforced on the way to and from the trenches.

(f) Procedure on arrival in trenches.—(i) The troops being relieved will not leave the trenches until the relieving troops are in position and new sentries have been posted, all trench stores have been handed over and receipts received, and orders to move have been received from the company commander.

(ii) Platoon commanders will at once personally examine all firing positions and satisfy themselves that each man can fire on the foot of the nearest part of the wire entanglement.

(iii) They will examine the ammunition and grenade stores, vermorel sprayers, and antigas solution.

(iv) Battalion H. Q. will report to brigade H. Q. as soon as relief is completed.

When the relief is completed company commanders will report to that effect to battalion H. Q.

When shelters are some way behind the fire trench they should not be used during the first night of relief.

(v) Men will not be dismissed until the company commander has received reports from all his platoon commanders that everything is in order. On taking over trenches the garrison will "Stand to" at alarm posts before being dismissed.

The following are some of the many questions a platoon commander should ask himself on taking over a trench and at frequent intervals afterwards:

1. I am here for two purposes: To hold this line under all circumstances and to do as much damage as possible to the enemy. Am I doing all I can to make this line as strong as possible? Am I as offensive as I might be with organized snipers, sniperscopes, rifle grenades, etc., and patrols?

2. Do I connect up all right with the platoons on my right and left? Do I know the position of my nearest support?

3. Does every man know his firing position, and can he fire from it, over the parapet, at the foot of the wire?

4. Where are my S. A. A. and bomb stores? Are they under cover from the weather?

5. Do all my men know their duties in case of attack—bombers especially?

6. Are all my rifles and ammunition clean and in good order? Have all the men got rifle covers? Are the magazines kept charged?

7. Is my wire strong enough?

8. Are my parapets and traverses bullet proof everywhere?

9. Where are my sally ports and gaps in my wire?

10. Where are my listening posts? Are my listening patrols properly detailed?

11. What points in front particularly require patrolling at night?

12. Are my sentries in their right places? Are they properly posted by N. C. O.'s? Have they received proper instructions?

13. Have I got the S. O. S. message in my pocket, and do I know the orders regarding its use?

14. Are the trenches as clean and as sanitary as they might be? Are live rounds and cases properly collected? Are my bags for refuse and empties in position?

15. Are my trenches as dry as I might make them?

16. Am I doing all I can to prevent my men getting "trench feet"?

17. How can I prevent my parapets and dugouts from falling in?

18. Have I carefully studied the ground in front and noted all places where Germans expose themselves or are likely to do so? Have I taken advantage of suitable spots in the ground in front of my parapet or behind my trenches to make "snipers'" lairs, besides making loopholes in the parapet?

19. Have my men always got their box respirators on them, and are they in good order?

20. Are the arrangements, in case of gas attack complete and known to all ranks?

21. Are the orders as to wearing equipment carried out?

22. Are my men using wood from the defenses as firewood?

23. Are my men drinking water from any but authorized sources? Are the arrangements for cooking and the care of rations as clean and sanitary as they can be made? Are dugouts and shelters kept clean and tidy?

24. I am here for two purposes: To hold this line under all circumstances, and to do as much damage as possible to the enemy. Am I doing all I can to make this line as strong as possible? Am I as offensive as I might be with organized snipers, sniperscopes, rifle grenades, etc., and patrols?

11. WIRING.—(a) Each company will have a party of 1 N. C. O. and 6 men who will be specially trained in wiring. They will go out nightly and repair and improve the wire along the company front. The definite duty allotted to trained wirers will not preclude the use of other men to increase the amount of wire along the front.

(b) The wire defenses of the front must be such as to preclude the enemy from throwing bombs into our trench from the outer edge of our wire. The nearest wire to our parapet should be 30 yards from it, and should be 20 yards at least in depth.

12. ORGANIZATION OF WORK ON DEFENSES.—(a) The Infantry brigade commander is responsible for the maintenance of the front line system of trenches, under direction of the division and with the advice and assistance of the field company commander.

(b) One field company will usually be allotted to each brigade area for work under the C. R. E.

(c) The O. C. field company will act as technical adviser to the Infantry brigadiers, and with his officers will visit frequently the front line trenches and other trenches in the area, and be responsible for the technical quality of the work done in them; if necessary he will supply R. E. personnel for supervision, but this will be done sparingly, for the Infantry should be trained to do all ordinary maintenance and repair work, such as repairing wire, rebuilding of parapets, fixing U frames and revetment hurdles, construction of ordinary dugouts, keeping trenches drained, etc., without R. E. assistance or supervision, leaving the R. E. free for work requiring technical skill, such as—

New works.
Concrete dugouts and machine-gun emplacements.
Main drainage, etc.

(d) The pioneers will be employed under the C. R. E. on special jobs under their own officers, such as—

Construction of new trenches.
Repair of communication trenches.
Preparation of camps, etc.

(e) The battalion commander is responsible for all work done in his subsector, and is, under the brigade commander, responsible for drawing up a time-table allotting hours for work, rest, and meals. Time-tables will be submitted in the first instance to brigade H. Q. for approval, and will then remain in force till altered, any alteration being submitted in the same way as the original.

The following table is an example:

Instructions for working party.

[To be used by all officers requiring or detailing a working party.]

Working party from___________________________________________________

Officers__________________________ O. R.______________________________

Rendezvous________________________ Time______________________________

Guide will be furnished by___________________________________________

Tools_____________________________

_____________________________ To be drawn from__________________

_____________________________

Stores____________________________

____________________________ To be drawn from__________________

____________________________

Instructions on the work from________________________________________

Time party will stop work____________________________________________

Whether haversack rations are to be brought__________________________

(f) All work on the fire trench should be carried out by the garrison of the trench, assisted, if necessary, by the garrison of the support and the reserve trenches.

(g) All work in rear of the fire trenches will be carried out by the garrison of the support and reserve trenches.

(h) Efficiency of work depends, firstly, on organization, and, secondly, on supervision. Without these, effort is wasted and work is unsatisfactory.

(i) Organization demands forethought. Every officer charged with the execution of any work must—

(i) Think out beforehand exactly how it is to be performed, and how many men are necessary to carry it out, including any carrying parties that may be wanted.

(ii) Appoint a place and time (if this is not already fixed by routine) for the assembly of the party.

(iii) Ensure that the necessary tools are forthcoming, and that they are either brought by the party to the place of assembly, or are available for them there.

(iv) Ensure that the necessary materials are at hand or arrange for their conveyance to the place of work by the working party or by a separate carrying party before the working party arrives there.

(v) Parade the working party at the place of assembly, and tell each individual off to his task, or, in the case of larger parties, tell off their respective tasks, and appoint a N. C. O. or soldier in each squad to be responsible for the work.

(j) Supervision demands energy and watchfulness. The officer charged with the execution of the work will always personally supervise it. Working parties will, as far as possible, be detailed by companies, platoons, or sections, and will be accompanied by all officers and N. C. O.'s belonging to them, who will remain with the party and be responsible for the continuance and direction of the work of their own men during its execution.

(k) Unless work has to be performed with equipment on, jackets should be taken off (except in inclement weather) while men are actually working and put on at once when they stop.

(l) The best work is obtained from men when they are given certain definite tasks, proportionate to the time they are to work, and allowed to fall out when the task is finished. If this can not be done, a fair task must be exacted and men who idle given extra tasks after the rest are dismissed.

(m) A working party which is too big for the task in hand is worse than one which is too small, since one man who has no job generally makes several others idle.

(n) All officers and other ranks must be made to understand that working is as useful and important as fighting; that good work deserves as much credit as good fighting, and that bad work brings discredit on himself and his battalion.

(o) A covering party will be provided for digging and wiring parties outside the front trenches. When such parties are being employed an adequate garrison will be left in the front trench.

(p) The word "fatigue" will never be employed in connection with work in the trenches or other defences.

13. LOG BOOKS.—Each company commander in front line or support trenches will keep a log book (Army Book 136) in which will be entered—

(i) Work done;

(ii) Number of men working;

(iii) Hours worked;

(iv) Information obtained from patrols, sentries, or other sources, as to the enemy, his habits, and his trenches.

The above will be entered daily.

(v) Work projected or ordered, in order of importance;

(vi) A list of trench stores.

The log book will be inspected daily by the battalion commander and frequently by the brigade staff.

14. UNDERCUTTING TRENCH SIDES.—(a) The undercutting of trench sides to make shelters is forbidden.

(b) When shelters are made the required space from the ground level downwards will be cut out, and a roof, supported on reliable posts, will be made.

15. COMMUNICATIONS.—(a) Artillery lines will be laid on the north and west sides of trenches. Infantry lines on south and east.

(b) The Infantry brigade signal officer will exercise general supervision over all lines in the brigade area, and will notify Artillery brigades when any Artillery lines require attention or relaying. He will assist the Artillery whenever it may be possible to do so.

(c) All essential lines should be buried to a depth of at least 6 feet. Lines in the communication trenches should be reduced to a minimum.

(d) Lines will be clearly labeled at every hundred yards and at every junction with another line.

(e) All lines will be carefully patrolled at least once daily.

(f) One telephonist will always be on duty.

(g) Telephone communication to battalion headquarters and the company on each flank will be frequently tested.

(h) All "dead" lines will be reeled up at once.

(i) Every man is to know the position of his platoon commander's shelter and of the company headquarters.

(j) At least two men per section of the support and reserve companies must be able to act as guides to all the company headquarters of the battalion.

(k) All officers must know the shortest route from their own headquarters to those of the company on their flanks and to their own battalion headquarters.

(l) It is most important to maintain always visual signaling communications from the front line as far back as brigade headquarters. Brigade signal officers will be responsible to brigades that this is done. One message by day and one by night will be sent daily over each visual signaling route. These will be checked by the brigade staff at least once a week to insure that they are transmitted promptly and accurately.

(m) Pigeons when relieved by fresh ones will be flown back, each with a test message to brigade headquarters. Times taken from battalion headquarters to brigade headquarters will be checked in each case by the brigade signal officer, and once a week at least by the brigade staff.

(n) The brigade signal section while with the brigade forms an integral part of brigade headquarters. The brigade commander is responsible to higher authority for the communications within his brigade sector and must have full knowledge of them. He exercises control over his signals through the brigade signal officer. It is the duty of the brigade signal officer to bring to the notice of the brigade commander, as well as of the officer commanding divisional signal company, any defects which exist or any improvements which can be made.

16. RATION PARTIES FOUND FROM FRONT TRENCHES.—Usually rations and stores will be carried up to the trenches by supports and reserves. If this is not possible, and it is necessary that men from the front trenches have to be employed, not more than 10 per cent of the men in the firing line are to be away from the trenches at the same time.

17. FIRING AT AEROPLANES.—Will not be permitted except by order of an officer.

18. RIFLES, EQUIPMENT, AND AMMUNITION (Carrying and wearing of).—(a) Equipment will always be worn in the front trenches. Haversacks, water bottles, packs, and entrenching tools need not be worn. In the support and reserve trenches equipment will be worn at the discretion of the brigade commander.

(b) Ration and carrying parties, orderlies, etc., will wear equipment and carry rifles unless otherwise ordered in special cases by an officer. Permission to discard equipment, and particularly to discard arms, should be sparingly given.

(c) Loading of rifles.—Except when it is necessary to shoot, a round will never be kept in the chamber. Cut-offs will always be "in" and the safety catch "back."

(d) The magazine will be kept charged with five rounds.

(e) In the fire trenches, bayonets will be fixed at night.

(f) Care of rifles.—All rifles and ammunition will be inspected by an officer at least twice a day, viz, at morning and evening "Stand to." They must be kept scrupulously clean at all times, and any mud or grit removed at once without waiting for the next inspection. Breech covers will always be kept on rifles, and so fixed that they can be immediately cast loose. Each platoon will have its full complement of "breech clearers" in charge of men fully instructed in their use.

(g) Noncommissioned officers and men in firing line and support will at all times be in possession of their rifles and bayonets. The rifles of men in support reserve trenches or dugouts may be placed in protected racks, so that they can be seized quickly. Not more than six will be in one rack.

(h) In very cold weather sentries will occasionally work the bolt of the rifle to prevent the striker becoming frozen.

(i) On no account is the rifle to be used for the purpose of carrying camp kettles and other loads.

(j) Ammunition boxes in the trenches will be examined frequently to see if the lids work easily. They will not be needlessly broken into. Each box will be placed on its side in a recess, protected from the weather, with the lid facing outwards, and with the broader end of the wooden lid uppermost.

(k) Every man will have 120 rounds in his possession.

(l) Platoon commanders will report at "Stand to" whether their ammunition is correct or otherwise.

(m) Except in cases of emergency no bandoliers will be issued to men in the trenches.

(n) Disposal of rifles, equipment, and ammunition.—Men wounded and going sick will, if able to walk, wear their equipment and carry their rifles. The rifles and equipment of men unable to carry them, and also those of dead men, will be sent back to the dressing station. All rifles, however, badly damaged, and equipment damaged or not required, will be sent back to the quartermaster. Damaged cartridges and empty cases will be collected in sacks hung up in the trenches for the purpose and returned to the quartermaster.

19. PRECAUTIONS AGAINST GAS ATTACK.—When "Wind dangerous" is ordered, the following arrangements will be carried out:

(i) All small box respirators and P. H. helmets will be carefully inspected; such inspections will be carried out daily during the "Wind dangerous" period.

(ii) Within a mile of the front line the small box respirator will be worn in the "Alert" position on the chest with flap unbuttoned, but protecting the respirator from the wet.

(a) The small box respirator will be worn in the "Alert" position outside all clothing.

(b) Nothing will be carried slung across the body in such a way as to interfere with the adjustment of the box respirator.

(iii) Where for any reason a man is not in possession of a small box respirator, he will wear his P. H. helmet pinned to the shirt in the "Alert" position.

(iv) The chin strap of the steel helmet will on no account be worn under the chin to impede the adjustment of the mask.

(v) Detached parties of men moving within a mile of the front line will strictly observe the precautions laid down in (ii), (iii), and (iv). Commanding officers will be held responsible that this is done.

(vi) The duties of sentries are:

(a) To give warning;

(b) To adjust immediately the curtains of gas-proof dugouts.

(vii) All working parties east of the line Poperinghe—Bailleul—Estaires will have a sentry posted to give instant warning of a gas attack.

(viii) A sentry will be posted at each Strombos horn or similar alarm and instructed in its use.

(ix) A sentry will be posted at every tunnel dugout or other dugout holding more than 10 men.

(x) A sentry will be posted to each group of two or three small dugouts.

(xi) A sentry will be posted on each headquarters, signal office, and independent body of men east of the line Poperinghe—Bailleul—Estaires.

(xii) Men sleeping in rearward lines, works, or rest billets where they are allowed to take off their equipment will sleep with their small box respirators round their necks, and must know exactly where their P. H. helmet is to be found.

(xiii) Company gas N. C. O.'s will report to company headquarters in readiness to assist the company commander should a gas attack occur.

(xiv) Medical officers will be responsible that a proper proportion of the ammonia capsules issued to them are with stretcher bearers in the front line in readiness for their immediate use after a gas attack.

(xv) Company gas N. C. O.'s will inspect daily all antigas apparatus—Strombos horns, flapper fans, vacuum bulbs, and stores of combustibles for clearing dugouts. They will see that gas-proof dugouts are kept in good order and the curtains sprayed.

(xvi) An officer on duty will be detailed from each company in reserve, except resting battalions.

(xvii) Commanders of units in billets east of the line Poperinghe—Bailleul—Estaires will organize a system of giving the alarm and rousing the men in cellars or houses.

20. ACTION DURING ENEMY GAS ATTACK.—In the event of an enemy gas attack the following action will be taken:

(i) The alarm will at once be given by all means available; by telephone, gongs, Strombos horns, and, if necessary, by orderly, and in accordance with paras. (iv) and (v).

(ii) There should be as Little Movement and Talking as Possible. All ranks will at once adjust their small box respirators. In front lines, and wherever the tactical situation demands, they will stand to arms. In rear lines, where there are large gas-proof dugouts, there is no objection, provided the tactical situation allows it, to men, with the exception of sentries and officers and N. C. O.'s on duty, remaining in the gas-proof dugouts. In any case small box respirators will be adjusted immediately the alarm is given and before the men leave the dugout.

(iii) On the alarm being given, all bodies of troops or transport on the move will halt, and all working parties cease work until the gas cloud has passed.

(iv) Should the gas cloud be unaccompanied by an infantry attack, the message "Gas attack, trench ________________," but not the S. O. S. signal, will be sent.

(v) Should an infantry attack develop, the normal procedure of S. O. S. will be carried out.

(vi) Troops in the front line not affected by gas must be warned to be prepared to bring a cross fire to bear on the enemy when he attempts to advance against a gassed portion of the trench.

(vii) If a relief is in progress, units should stand steady as far as possible until the gas cloud has passed.

(viii) Supports, and parties bringing up ammunition and grenades, will only be moved up if the tactical situation demands.

(ix) The blanket doorways of protected dugouts will be properly adjusted.

(x) Men in charge of combustibles and fans will prepare to use them as soon as the gas cloud has passed, so as to admit of helmets being removed.

(xi) Helmets will not be removed after a gas attack until permission has been given by the company commander, who will ascertain from officers and N. C. O.'s trained at the divisional gas school that it is safe to do so. Trenches will be fanned clear of gas with fans and sandbags.

(xii) In order to guard against the danger of a subsequent gas cloud, all ranks, as soon as the gas is clear and permission has been received to remove their masks, will replace them in the "alert" position.

A sharp lookout will be maintained as long as the wind continues in a dangerous quarter, and men will sleep on the fire step, within reach of a sentry. A subsequent gas cloud is always likely.

(xiii) Dugouts will not be entered for at least four hours after a gas attack, and should be ventilated freely. Ventilation (natural or by means of fires and antigas fans) is the only sure method of clearing a dugout. If dugouts have to be entered owing to heavy shelling, this should be done with the utmost caution, and gas helmets put on at the slightest trace of gas. The clearing of dugouts should not be carried out by men who have been even slightly affected by gas. Dugouts can be efficiently ventilated by means of a small fire burning in the center of a dugout or cellar for 20 minutes. This method has been proved by experiments to be effective, but should be employed with due regard to the danger of smoke being visible to the enemy. Dry wood or other combustibles will be kept in readiness for the purpose.

(xiv) Special arrangements will be made by corps for warning the civil authorities who are responsible for the protection and warning of all civilians within the corps area.

21. ACTION AFTER ENEMY GAS ATTACK.—(i) Smoking will be prohibited for a period of three hours after the gas has ceased.

(ii) After a gas attack troops in the front trenches will be relieved of all fatigue and carrying work for 24 hours by sending up working parties from companies in rear. Horses should not be worked for a similar period if it can be avoided.

(iii) No man suffering from effects of gas will be permitted to walk to the dressing station.

(iv) Rifles and machine guns should be cleaned immediately after a gas attack; oil cleaning will prevent corrosion for 12 hours, but the first available opportunity should be taken to clean all parts in boiling water containing a little soda.

22. ACTION DURING GAS SHELL BOMBARDMENT.—(i) Small box respirators will be put on in the shelled area.

(ii) In the event of a sudden and intense bombardment with gas shell a local alarm will be given in the front-line system of trenches by orderlies; in reserve trenches and battery positions this local alarm may be given by French shunters' horns. In order to avoid false alarms of a gas attack the French shunters' horns should not be used in Infantry front-line trenches.

(iii) All dugouts in the vicinity will be visited and any sleeping men aroused.

23. DISCIPLINE WITH REGARD TO CARRYING SMALL BOX RESPIRATORS.—Small box respirators will always be carried within 2 miles of the front line (i.e., in advance of the line Elverdinghe—Vlamertinghe—Dickebush—Kemmel Hill—Neuve Eglise—Nieppe—Laventie) whatever the direction of the wind is. P. H. helmets will always be carried in corps areas whatever the direction of the wind is.

"WIND-DANGEROUS" period.—Orders as to the position in which the above are worn in "wind-dangerous" period are contained in section 19.

"WIND-SAFE" period.—When the wind is safe working parties during work and at the discretion of the officer in command may take off their box respirators, provided the latter are placed conveniently at hand for use in case of a sudden gas-shell attack or change of the wind.

The P. H. helmet will always be carried.

24. VERMOREL SPRAYERS.—(a) Vermorel sprayers form part of trench stores. They are provided for spraying the blankets of gas-proof dugouts and shelters.

(b) They will be stored in the gas-proof dugout or in a protected position close at hand.

(c) They must be kept one-third full of water. Six gallons of the solution given below to be used in them must be kept in corked jars or petrol tins close to each sprayer. It must not be kept in the sprayer owing to its corrosive nature, and after solution has been used the sprayer must be washed out with water:

Water.—3 gallons (one large bucket);

Sodium thiosulphate (hypo).—1½ lbs. (¾ mess tin);

Sodium carbonate (washing soda).—3 lbs. (one piled mess tin).

(d) Vermorel sprayers will be in charge of company gas N. C. O.'s, who will detail and train men in their care and use and superintend all spraying. The blankets on all gas-protected dugouts will be inspected and sprayed at the commencement of a wind-dangerous period and as often as is necessary to keep them in a moist condition during it.

(e) Company gas N. C. O.'s will take over Vermorel sprayers from outgoing N. C. O.'s.

(f) Vermorel sprayers in the line will on no account be used for clearing gas from trenches or dugouts after an attack. Against the present gas used by the enemy these chemicals have no effect, and Ayrton fans and fires are the means to be used.

The sprayers at medical aid posts are provided with a chemical solution which will clear any gas that may have entered their protected posts.

25. SANITATION.—(a) The importance of strict attention to sanitation will be impressed on all ranks.

(b) The commanding officer is responsible for sanitation in his unit, and the medical officer will advise him in sanitary matters, making frequent inspection of cook houses, latrines, refuse pits, and water arrangements. Under the medical officer latrines and refuse pits will be attended to by the regimental sanitary men and water duties by the R. A. M. C. details attached.

(c) Latrines will be constructed in trenches leading from communication trenches. Where the bucket system is employed, chloride of lime or creosol will be freely used. The soil will be removed at night and buried in a deep pit at least 100 yards from the trenches; these pits will be filled in when nearly full and labeled.

(d) Empty tins and other refuse will be collected in receptacles kept for the purpose in the trenches, and returning carrying parties will be used to carry these back to the incinerators in rear.

26. RATIONS AND COOKING.—(a) Ration parties from the support and reserve trenches will be made up in complete units.

(b) The company quartermaster sergeant will accompany the ration parties for his company and report his arrival to the company commander.

(c) Great care is to be taken that ration and carrying parties make as little noise as possible.

(d) Where cooking is done individually, definite times should be allocated for the purpose.

(e) Unused rations will be returned to the quartermaster.

(f) Waste in any form will be discouraged.

(g) Arrangements should be made to insure that soup or some hot drink is available for the men between midnight and 4 a. m.

(h) All cooking places and appliances will be kept scrupulously clean and inspected daily by an officer.

27. CARE OF GRENADES.—(a) Grenades in the trenches will be kept in waterproof boxes placed in recesses in the parapet.

(b) The brigade bombing officer will frequently inspect all grenades and posts, and will see that the proper number of grenades is kept up in each post and store; that they are protected from weather; that a sufficient number of bombers are present and understand their duties; that the grenades are in good condition; and that waistcoats or carriers are available.

28. STEEL HELMETS.—Steel helmets will be worn at all times in the trenches (including all communicating trenches). In addition, they will be worn elsewhere than in the trenches as may be ordered from time to time by divisional or brigade headquarters.

29. RUM.—(a) Rum will be issued by an officer, who will see that each individual drinks it in his presence.

(b) It is not to be issued in the trenches after "Stand down" in the evening or before "Stand down" in the morning, except with the special permission of the battalion commander.

(c) Men undergoing punishment for drunkenness will receive no issue of rum for fourteen days after the offense unless it is necessary for medical reasons.

30. CHILLED FEET AND FROSTBITE.—1. These conditions are caused by—

(a) Prolonged standing in cold water and mud;

(b) The continued wearing of wet socks, boots, and puttees;

(c) Constriction of the lower limbs.

2. They can be prevented or diminished by—

(a) The wearing of long gum boots;

(b) Improvements to trenches and provision of dry standings, and warmth;

(c) Reduction of time spent in the trenches as far as the military situation permits;

(d) Good battalion arrangements to insure that men enter the trenches warmly clad with dry boots, socks, and trousers, and with the skin well rubbed with whale oil or antifrostbite grease;

(e) Taking to the trenches a pair of ankle boots, in addition to the long gum boots, and changing from one into the other when possible, at the same time putting on a pair of dry socks.

N. B.—The effect from being wet through from perspiration is just as bad as that from water. Therefore, change your socks.

(f) Taking exercise. Work is the best specific against trench feet. Men who are kept moving are kept warm, with their blood circulating properly, and do not get trench feet.

(g) Providing warm food at least once a day in the trenches and shelter.

3. Commanding officers will be held personally responsible that the following instructions are implicitly carried out under the strictest supervision by officers:

(a) Previous to a tour of trench duty, men's feet will be well rubbed with oil or grease and dry socks put on. It is not sufficient to apply the oil or grease, it must be thoroughly rubbed in until the skin is dry.

(b) In addition to those worn, another pair of socks will be carried by each man and used as directed in section 30, paragraph 2 (e).

(c) Battalion arrangements will be made for the reissue of one dry pair of socks to each man daily in the trenches.

(d) Puttees are never to be worn with long gum boots. Socks can be prevented from creeping down under the sole of the foot by fastening them to the trousers by means of safety pins. On no account will anything in the form of a garter be worn, as it impedes circulation of the blood.

(e) Hot food will be provided at least once a day for men in trenches. Hot boxes will be available for carrying this.

(f) When the feet are affected on no account is hot water to be used, nor are they to be put near a fire.

(g) Regimental rest posts are to be instituted in close proximity to the trenches, where attention can properly be given to men who show signs of exposure.

(h) On return from the trenches the long gum boots are to be dried inside.

4. Divisional or brigade arrangements for: (a) Provision of the necessary accommodation for the washing and drying of socks in large numbers, and their supply, to battalions in the front line, in exchange for wet ones.

(b) Drying and brushing of clothes.

5. Long gum boots are issued solely for the use of men in the trenches, either in the forward or backward lines. They are not to be issued to or used by men under any other conditions.

Trancribers note:
The following printers errors have been corrected, otherwise spelling is as in the original.
sperior/superior
certatin/certain
sumbitted/submitted

*** END OF THE PROJECT GUTENBERG EBOOK SPECIMENS OF BRITISH TRENCH ORDERS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- SPECIMENS OF BRITISH TRENCH ORDERS

- CANADIAN CORPS TRENCH ORDERS.

- FOOTNOTES:

- SPECIMEN OF BATTALION TRENCH STANDING ORDERS.

- FOOTNOTES:

- BRIGADE STANDING ORDERS FOR THE TRENCHES.

- 55TH (WEST LANCASHIRE) DIVISION TRENCH ORDERS.

- CONTENTS.

- 55TH (WEST LANCASHIRE) DIVISION TRENCH ORDERS.

- THE FULL PROJECT GUTENBERG LICENSE