The Project Gutenberg eBook of A Catalogue of Books Published by Methuen and Co., October 1909

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: A Catalogue of Books Published by Methuen and Co., October 1909

Creator: Methuen & Co.

Release date: October 19, 2011 [eBook #37796]

Language: English

Credits: Produced by Brian Foley, Diane Monico, and the Online

Distributed Proofreading Team at http://www.pgdp.net (This

file was produced from images generously made available

by The Internet Archive/American Libraries.)

*** START OF THE PROJECT GUTENBERG EBOOK A CATALOGUE OF BOOKS PUBLISHED BY METHUEN AND CO., OCTOBER 1909 ***

A CATALOGUE OF BOOKS

PUBLISHED BY METHUEN

AND COMPANY: LONDON

36 ESSEX STREET

W.C.

CONTENTS

PAGE

General Literature,

2-24

Ancient Cities,

24

Antiquary's Books,

25

Arden Shakespeare,

25

Beginner's Books,

26

Business Books,

26

Byzantine Texts,

26

Churchman's Bible,

26

Churchman's Library,

27

Classical Translations,

27

Classics of Art,

27

Commercial Series,

27

Connoisseur's Library,

28

Handbooks of English Church History,

28

Illustrated Pocket Library of Plain and Coloured Books,

28

Junior Examination Series,

29

Junior School-Books,

29

Leaders of Religion,

30

Library of Devotion,

30

Little Books on Art,

31

Little Galleries,

31

Little Guides,

32

Little Library,

32

Little Quarto Shakespeare,

33

Miniature Library,

33

New Historical Series,

34

New Library of Medicine,

34

New Library of Music,

34

Oxford Biographies,

34

Romantic History,

34

School Examination Series,

35

School Histories,

35

Simplified French Texts,

35

Simplified German Texts,

35

Six Ages of European History,

36

Standard Library,

36

Textbooks of Science,

36

Textbooks of Technology,

37

Handbooks of Theology,

37

Westminster Commentaries,

37

Fiction,

37-45

Books for Boys and Girls,

45

Novels of Alexandre Dumas,

46

Methuen's Sixpenny Books,

46

OCTOBER 1909

A CATALOGUE OF

MESSRS. METHUEN'S

PUBLICATIONS

In this Catalogue the order is according to authors. An asterisk denotes that the book is in the press.

Colonial Editions are published of all Messrs. METHUEN'S Novels issued at a price above 2s. 6d., and similar editions are published of some works of General Literature. Colonial editions are only for circulation in the British Colonies and India.

All books marked net are not subject to discount, and cannot be bought at less than the published price. Books not marked net are subject to the discount which the bookseller allows.

Messrs. METHUEN'S books are kept in stock by all good booksellers. If there is any difficulty in seeing copies, Messrs. Methuen will be very glad to have early information, and specimen copies of any books will be sent on receipt of the published price plus postage for net books, and of the published price for ordinary books.

I.P.L. represents Illustrated Pocket Library.

PART I.—GENERAL LITERATURE

Abraham (George D.). THE COMPLETE MOUNTAINEER. With 75 Illustrations. Second Edition. Demy 8vo. 15s. net.

Acatos (M. J.). See Junior School Books.

Addleshaw (Percy). SIR PHILIP SIDNEY. With 12 Illustrations. Demy 8vo. 10s. 6d. net.

Adeney (W. F.), M.A. See Bennett (W. H.)

Ady (Cecilia M.). A HISTORY OF MILAN UNDER THE SFORZA. With 20 Illustrations and a Map. Demy 8vo. 10s. 6d. net.

Aeschylus. See Classical Translations.

Ainsworth (W. Harrison). See I.P.L.

Aldis (Janet). THE QUEEN OF LETTER WRITERS, MARQUISE DE SÉVIGNÉ, DAME DE BOURBILLY, 1626-96. With 18 Illustrations. Second Edition. Demy 8vo. 12s. 6d. net.

Alexander (William), D.D., Archbishop of Armagh. THOUGHTS AND COUNSELS OF MANY YEARS. Demy 16mo. 2s. 6d.

Alken (Henry). See I.P.L.

Allen (Charles C.). See Textbooks of Technology.

Allen (L. Jessie). See Little Books on Art.

Allen (J. Romilly), F.S.A. See Antiquary's Books.

Almack (E.), F.S.A. See Little Books on Art.

Amherst (Lady). A SKETCH OF EGYPTIAN HISTORY FROM THE EARLIEST TIMES TO THE PRESENT DAY. With many Illustrations and Maps. A New and Cheaper Issue Demy 8vo. 7s. 6d. net.

Anderson (F. M.). THE STORY OF THE BRITISH EMPIRE FOR CHILDREN. With 42 Illustrations. Cr. 8vo. 2s.

Anderson (J. G.), B.A., NOUVELLE GRAMMAIRE FRANÇAISE, À L'USAGE DES ÉCOLES ANGLAISES. Crown 8vo. 2s.

EXERCICES DE GRAMMAIRE FRANÇAISE. Cr. 8vo. 1s. 6d.

Andrewes (Bishop). PRECES PRIVATAE. Translated and edited, with Notes, by F. E. BRIGHTMAN, M.A., of Pusey House, Oxford. Cr. 8vo. 6s.

See also Library of Devotion.

'Anglo-Australian.' AFTER-GLOW MEMORIES. Cr. 8vo. 6s.

Anon. THE BUDGET, THE LAND AND THE PEOPLE. Second Edition. Crown 8vo. 6d. net.

HEALTH, WEALTH, AND WISDOM. Crown 8vo. 1s. net.

THE WESTMINSTER PROBLEMS BOOK. Prose and Verse. Compiled from The Saturday Westminster Gazette Competitions, 1904-1907. Cr. 8vo. 3s. 6d. net.

VENICE AND HER TREASURES. With many Illustrations. Round corners. Fcap. 8vo. 5s. net.

Aristotle. THE ETHICS OF. Edited, with an Introduction and Notes by JOHN BURNET, M.A., Cheaper issue. Demy 8vo. 10s. 6d. net.

Asman (H. N.), M.A., B.D. AN INTRODUCTION TO THE HISTORY OF ROME. With Maps and Illustrations. Cr. 8vo. 2s. 6d.

See also Junior School Books.

Atkins (H. G.). See Oxford Biographies.

Atkinson (C. M.). JEREMY BENTHAM. Demy 8vo. 5s. net.

Atkinson (C. T.), M.A., Fellow of Exeter College, Oxford, sometime Demy of Magdalen College. A HISTORY OF GERMANY, from 1713 to 1815. With 35 Maps and Plans. Demy 8vo. 15s. net.

Atkinson (T. D.). ENGLISH ARCHITECTURE. With 196 Illustrations. Fcap. 8vo. 3s. 6d. net.

A GLOSSARY OF TERMS USED IN ENGLISH ARCHITECTURE. With 265 Illustrations. Second Edition. Fcap. 8vo. 3s. 6d. net.

Atteridge (A. H.). NAPOLEON'S BROTHERS. With 24 Illustrations. Demy 8vo. 18s. net.

Auden (T.), M.A., F.S.A. See Ancient Cities.

Aurelius (Marcus). WORDS OF THE ANCIENT WISE. Thoughts from Epictetus and Marcus Aurelius. Edited by W. H. D. ROUSE, M.A., Litt. D. Fcap. 8vo. 3s. 6d. net.

See also Standard Library.

Austen (Jane). See Standard Library, Little Library and Mitton (G. E.).

Aves (Ernest). CO-OPERATIVE INDUSTRY. Crown 8vo. 5s. net.

Bacon (Francis). See Standard Library and Little Library.

Bagot (Richard). THE LAKES OF NORTHERN ITALY. With 37 Illustrations and a Map. Fcap. 8vo. 5s. net.

Bailey (J. C.), M.A. See Cowper (W.).

Bain (R. Nisbet). THE LAST KING OF POLAND AND HIS CONTEMPORARIES. With 16 Illustrations. Demy 8vo. 10s. 6d. net.

Baker (W. G.), M.A. See Junior Examination Series.

Baker (Julian L.), F.I.C., F.C.S. See Books on Business.

Balfour (Graham). THE LIFE OF ROBERT LOUIS STEVENSON. With a Portrait. Fourth Edition in one Volume. Cr. 8vo. Buckram, 6s.

Ballard (A.), B.A., LL.D. See Antiquary's Books.

Bally (S. E.). See Commercial Series.

Barham (R. H.). See Little Library.

Baring (The Hon. Maurice). WITH THE RUSSIANS IN MANCHURIA. Third Edition. Demy 8vo. 7s. 6d. net.

A YEAR IN RUSSIA. Second Edition. Demy 8vo. 10s. 6d. net.

RUSSIAN ESSAYS AND STORIES. Second Edition. Cr. 8vo. 5s. net.

Also published in a Colonial Edition.

Baring-Gould (S.). THE LIFE OF NAPOLEON BONAPARTE. With nearly 200 Illustrations, including a Photogravure Frontispiece. Second Edition. Wide Royal 8vo. 10s. 6d. net.

THE TRAGEDY OF THE CÆSARS: A STUDY OF THE CHARACTERS OF THE CÆSARS OF THE JULIAN AND CLAUDIAN HOUSES. With numerous Illustrations from Busts, Gems, Cameos, etc. Sixth Edition. Royal 8vo. 10s. 6d. net.

A BOOK OF FAIRY TALES. With numerous Illustrations by A. J. GASKIN. Second Edition. Cr. 8vo. Buckram. 6s., also Medium 8vo. 6d.

OLD ENGLISH FAIRY TALES. With numerous Illustrations by F. D. BEDFORD. Third Edition. Cr. 8vo. Buckram. 6s.

THE VICAR OF MORWENSTOW. Revised Edition. With a Portrait. Third Edition. Cr. 8vo. 3s. 6d.

OLD COUNTRY LIFE. With 69 Illustrations. Fifth Edition. Large Crown 8vo. 6s.

A GARLAND OF COUNTRY SONG: English Folk Songs with their Traditional Melodies. Collected and arranged by S. BARING-GOULD and H. F. SHEPPARD. Demy 4to. 6s.

SONGS OF THE WEST: Folk Songs of Devon and Cornwall. Collected from the Mouths of the People. By S. BARING-GOULD, M.A., and H. FLEETWOOD SHEPPARD, M.A. New and Revised Edition, under the musical editorship of CECIL J. SHARP. Large Imperial 8vo. 5s. net.

A BOOK OF NURSERY SONGS AND RHYMES. Edited by S. BARING-GOULD. Illustrated. Second and Cheaper Edition. Large Cr. 8vo. 2s. 6d. net.

STRANGE SURVIVALS: SOME CHAPTERS IN THE HISTORY OF MAN. Illustrated. Third Edition. Cr. 8vo. 2s. 6d. net.

YORKSHIRE ODDITIES: INCIDENTS AND STRANGE EVENTS. Fifth Edition. Cr. 8vo. 2s. 6d. net.

THE BARING-GOULD SELECTION READER. Arranged by G. H. ROSE. Illustrated. Crown 8vo. 1s. 6d.

THE BARING-GOULD CONTINUOUS READER. Arranged by G. H. ROSE. Illustrated. Crown 8vo. 1s. 6d.

A BOOK OF CORNWALL. With 33 Illustrations. Second Edition. Cr. 8vo. 6s.

A BOOK OF DARTMOOR. With 60 Illustrations. Second Edition. Cr. 8vo. 6s.

A BOOK OF DEVON. With 35 Illustrations. Third Edition. Cr. 8vo. 6s.

A BOOK OF NORTH WALES. With 49 Illustrations. Cr. 8vo. 6s.

A BOOK OF SOUTH WALES. With 57 Illustrations. Cr. 8vo. 6s.

A BOOK OF BRITTANY. With 69 Illustrations. Second Edition Cr. 8vo. 6s.

A BOOK OF THE RHINE: From Cleve to Mainz. With 8 Illustrations in Colour by TREVOR HADDEN, and 48 other Illustrations. Second Edition. Cr. 8vo. 6s.

A BOOK OF THE RIVIERA. With 40 Illustrations. Cr. 8vo. 6s.

A BOOK OF THE PYRENEES. With 25 Illustrations. Cr. 8vo. 6s.

See also Little Guides.

Barker (Aldred F.). See Textbooks of Technology.

Barker (E.), M.A. (Late) Fellow of Merton College, Oxford. THE POLITICAL THOUGHT OF PLATO AND ARISTOTLE. Demy 8vo. 10s. 6d. net.

Barnes (W. E.), D.D. See Churchman's Bible.

Barnett (Mrs. P. A.). See Little Library.

Baron (R. R. N.), M.A. FRENCH PROSE COMPOSITION. Fourth Edition. Cr. 8vo. 2s. 6d. Key, 3s. net.

See also Junior School Books.

Barron (H. M.), M.A., Wadham College, Oxford. TEXTS FOR SERMONS. With a Preface by Canon SCOTT HOLLAND. Cr. 8vo. 3s. 6d.

Bartholomew (J. G.), F.R.S.E. See Robertson (C. G.).

Bastable (C. F.), LL.D. THE COMMERCE OF NATIONS. Fourth Ed. Cr. 8vo. 2s. 6d.

Bastian (H. Charlton), M.A., M.D., F.R.S. THE EVOLUTION OF LIFE. With Diagrams and many Photomicrographs. Demy 8vo. 7s. 6d. net.

Batson (Mrs. Stephen). A CONCISE HANDBOOK OF GARDEN FLOWERS. Fcap. 8vo. 3s. 6d.

THE SUMMER GARDEN OF PLEASURE. With 36 Illustrations in Colour by OSMUND PITTMAN. Wide Demy 8vo. 15s. net.

Bayley (R. Child). THE COMPLETE PHOTOGRAPHER. With over 100 Illustrations. With Note on Direct Colour Process. Third Edition. Demy 8vo. 10s. 6d. net.

Beard (W. S.). EASY EXERCISES IN ALGEBRA FOR BEGINNERS. Cr. 8vo. 1s. 6d. With Answers. 1s. 9d.

See also Junior Examination Series and Beginner's Books.

Beckett (Arthur). THE SPIRIT OF THE DOWNS: Impressions and Reminiscences of the Sussex Downs, and Downland People and Places. With 20 Illustrations in Colour by STANLEY INCHBOLD. Second Edition. Demy 8vo. 10s. 6d. net.

Beckford (Peter). THOUGHTS ON HUNTING. Edited by J. OTHO PAGET, and Illustrated by G. H. JALLAND. Second Edition. Demy 8vo. 6s.

Beckford (William). See Little Library.

Beeching (H. C.), M.A., Canon of Westminster. See Library of Devotion.

Beerbohm (Max). A BOOK OF CARICATURES. Imperial 4to. 21s. net.

Begbie (Harold). MASTER WORKERS. Illustrated. Demy 8vo. 7s. 6d. net.

Behmen (Jacob). DIALOGUES ON THE SUPERSENSUAL LIFE. Edited by BERNARD HOLLAND. Fcap. 8vo. 3s. 6d.

Bell (Mrs. Arthur G.). THE SKIRTS OF THE GREAT CITY. With 16 Illustrations in Colour by ARTHUR G. BELL, 17 other Illustrations, and a Map. Second Edition. Cr. 8vo. 6s.

Belloc (H.). PARIS. With 7 Maps and a Frontispiece in Photogravure. Second Edition, Revised. Cr. 8vo. 6s.

HILLS AND THE SEA. Second Edition. Crown 8vo. 6s.

ON NOTHING AND KINDRED SUBJECTS. Second Edition. Fcap. 8vo. 5s.

ON EVERYTHING. Fcap. 8vo. 5s.

MARIE ANTOINETTE. With 35 Portraits and Illustrations. Demy 8vo. 15s. net.

THE PYRENEES. With 46 Sketches by the Author, and 22 Maps. Second Edition. Demy 8vo. 7s. 6d. net.

Bellot (H. H. L.), M.A. See Jones (L. A. A.).

Bennett (Joseph). FORTY YEARS OF MUSIC, 1865-1905. With 24 Illustrations. Demy 8vo. 16s. net.

Bennett (W. H.), M.A. A PRIMER OF THE BIBLE. Fifth Edition. Cr. 8vo. 2s. 6d. Bennett (W. H.) and Adeney (W. F.). A BIBLICAL INTRODUCTION. With a concise Bibliography. Fifth Edition. Cr. 8vo. 7s. 6d.

Benson (Archbishop). GOD'S BOARD. Communion Addresses. Second Edition. Fcap. 8vo. 3s. 6d. net.

Benson (A. C.), M.A. See Oxford Biographies.

Benson (R. M.). THE WAY OF HOLINESS. An Exposition of Psalm cxix. Analytical and Devotional. Cr. 8vo. 5s.

Bernard (E. R.), M.A., Canon of Salisbury. THE ENGLISH SUNDAY: ITS ORIGINS AND ITS CLAIMS. Fcap. 8vo. 1s. 6d.

Berry (W. Grinton), M.A. FRANCE SINCE WATERLOO. With 16 Illustrations and Maps. Cr. 8vo. 6s.

Beruete (A. de). See Classics of Art.

Betham-Edwards (Miss). HOME LIFE IN FRANCE. With 20 Illustrations. Fifth Edition. Crown 8vo. 6s.

Bethune-Baker (J. F.), M.A. See Handbooks of Theology.

Bindley (T. Herbert), B.D. THE OECUMENICAL DOCUMENTS OF THE FAITH. With Introductions and Notes. Second Edition. Cr. 8vo. 6s. net.

Binns (H. B.). THE LIFE OF WALT WHITMAN. Illustrated. Demy 8vo. 10s. 6d. net.

Binyon (Mrs. Laurence). NINETEENTH CENTURY PROSE. Selected and arranged by. Crown 8vo. 6s.

Binyon (Laurence). THE DEATH OF ADAM AND OTHER POEMS. Cr. 8vo. 3s. 6d. net.

See also Blake (William).

Birch (Walter de Gray), LL.D., F.S.A. See Connoisseur's Library.

Birnstingl (Ethel). See Little Books on Art.

Blackmantle (Bernard). See I.P.L.

Blair (Robert). See I.P.L.

Blake (William). THE LETTERS OF WILLIAM BLAKE, TOGETHER WITH A LIFE BY FREDERICK TATHAM. Edited from the Original Manuscripts, with an Introduction and Notes, by ARCHIBALD G. B. RUSSELL. With 12 Illustrations. Demy 8vo. 7s. 6d. net.

ILLUSTRATIONS OF THE BOOK OF JOB. With General Introduction by LAURENCE BINYON. Quarto. 21s. net.

See also I.P.L., and Little Library.

Bloom (J. Harvey), M.A. See Antiquary's Books.

Blouet (Henri). See Beginner's Books.

Boardman (T. H.), M.A. See French (W.).

Bode (Wilhelm), Ph.D. See Classics of Art.

Bodley (J. E. C.). THE CORONATION OF EDWARD VII. Demy 8vo. 21s. net. By Command of the King.

Body (George), D.D. THE SOUL'S PILGRIMAGE: Devotional Readings from the Published and Unpublished writings of George Body, D.D. Selected and arranged by J. H. BURN, B.D., F.R.S.E. Demy 16mo. 2s. 6d.

Bona (Cardinal). See Library of Devotion.

Bonnor (Mary L.). See Little Books on Art.

Boon (F. C.)., B.A. See Commercial Series.

Borrow (George). See Little Library.

Bos (J. Ritzema). AGRICULTURAL ZOOLOGY. Translated by J. R. AINSWORTH DAVIS, M.A. With 155 Illustrations. Second Edition. Cr. 8vo. 3s. 6d.

Botting (C. G.), B.A. EASY GREEK EXERCISES. Cr. 8vo. 2s.

See also Junior Examination Series.

Boulting (W.). TASSO AND HIS TIMES. With 24 Illustrations. Demy 8vo. 10s. 6d. net.

Boulton (E. S.), M.A. GEOMETRY ON MODERN LINES. Cr. 8vo. 2s.

Boulton (William B.). SIR JOSHUA REYNOLDS, P.R.A. With 49 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Bovill (W. B. Forster). HUNGARY AND THE HUNGARIANS. With 16 Illustrations in Colour by WILLIAM PASCOE, 12 other Illustrations and a Map. Demy 8vo. 7s. 6d. net.

Bowden (E. M.). THE IMITATION OF BUDDHA: Being Quotations from Buddhist Literature for each Day in the Year. Fifth Edition. Cr. 16mo. 2s. 6d.

Bower (E.), B.A. See New Historical Series.

Boyle (W.). CHRISTMAS AT THE ZOO. With Verses by W. BOYLE and 24 Coloured Pictures by H. B. NEILSON. Super Royal 16mo. 2s.

Brabant (F. G.), M.A. RAMBLES IN SUSSEX. With 30 Illustrations. Crown 8vo. 6s.

See also Little Guides.

Bradley (A. G.). ROUND ABOUT WILTSHIRE. With 14 Illustrations, in Colour by T. C. GOTCH, 16 other Illustrations, and a Map. Second Edition. Cr. 8vo. 6s.

THE ROMANCE OF NORTHUMBERLAND. With 16 Illustrations in Colour by FRANK SOUTHGATE, R.B.A., and 12 from Photographs. Second Edition. Demy 8vo. 7s. 6d net.

Bradley (John W.). See Little Books on Art.

Braid (James), Open Champion, 1901, 1905 and 1906. ADVANCED GOLF. With 88 Photographs and Diagrams. Fifth Edition. Demy 8vo. 10s. 6d. net.

Braid (James) and Others. GREAT GOLFERS IN THE MAKING. Edited by HENRY LEACH. With 24 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Brailsford (H. N.). MACEDONIA: ITS RACES AND THEIR FUTURE. With 32 Illustrations and 2 Maps. Demy 8vo. 12s. 6d. net.

Brentano (C.). See Simplified German Texts.

Brightman (F. E.), M.A. See Andrewes (Lancelot).

Brodrick (Mary) and Morton (A. Anderson). A CONCISE DICTIONARY OF EGYPTIAN ARCHÆOLOGY. A Hand-Book for Students and Travellers. With 80 Illustrations and many Cartouches. Cr. 8vo. 3s. 6d.

Brooks (E. E.), B.Sc. (Lond.), Leicester Municipal Technical School, and James (W. H. N.), A.M.I.E.E., A.R.C.Sc., Municipal School of Technology, Manchester.

See Textbooks of Technology.

Brown (S. E.), M.A., B.Sc., Senior Science Master at Uppingham. A PRACTICAL CHEMISTRY NOTE-BOOK FOR MATRICULATION AND ARMY CANDIDATES. Easy Experiments on the Commoner Substances. Cr. 4to. 1s. 6d. net.

Brown (J. Wood), M.A. THE BUILDERS OF FLORENCE. With 74 Illustrations by HERBERT RAILTON. Demy 4to. 18s. net.

Browne (Sir Thomas). See Standard Library.

Brownell (C. L.). THE HEART OF JAPAN. Illustrated. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Browning (Robert). BROWNING AND PARACELSUS. The Text of Browning's Poem, edited with Introduction, Footnotes, and Bibliography, by MARGARET L. LEE, Lecturer in English Literature to the Women's Department, King's College, and KATHRINE B. LOCOCK. Fcap. 8vo. 3s. 6d. net.

See also Little Library.

Bryant (Walter W.), B.A., F.R.A.S., F.R. Met. Soc., of the Royal Observatory, Greenwich. A HISTORY OF ASTRONOMY. With 47 Illustrations. Demy 8vo. 7s. 6d. net.

Buckland (Francis T.). CURIOSITIES OF NATURAL HISTORY. Illustrated by H. B. NEILSON. Cr. 8vo. 3s. 6d.

Buckton (A. M.). THE BURDEN OF ENGELA. Second Edition. Cr. 8vo. 3s. 6d. net.

EAGER HEART: A Mystery Play. Seventh Edition. Cr. 8vo. 1s. net.

KINGS IN BABYLON: A Drama. Cr. 8vo. 1s. net.

SONGS OF JOY. Cr. 8vo. 1s. net.

Budge (E. A. Wallis). THE GODS OF THE EGYPTIANS. With over 100 Coloured Plates and many Illustrations. Two Volumes. Royal 8vo. £3, 3s. net.

*Buist (H. Massac). THE COMPLETE AERONAUT. With many Illustrations. Demy 8vo. 12s. 6d. net.

Bull (Paul). Army Chaplain. GOD AND OUR SOLDIERS. Second Edition. Cr. 8vo. 6s.

Bulley (Miss). See Dilke (Lady).

Bunyan (John). THE PILGRIM'S PROGRESS. Edited, with an Introduction by C. H. FIRTH, M.A. With 39 Illustrations by R. ANNING BELL. Crown 8vo. 6s.

See also Standard Library and Library of Devotion.

Burch (G. J.), M.A., F.R.S. A MANUAL OF ELECTRICAL SCIENCE. Illustrated. Cr. 8vo. 3s.

Burgess (Gelett). GOOPS AND HOW TO BE THEM. Illustrated. Small 4to. 6s.

Burke (Edmund). See Standard Library.

Burn (A. E.), D.D., Rector of Handsworth and Prebendary of Lichfield. See Handbooks of Theology.

Burn (J. H.), B.D., F.R.S.E. THE CHURCHMAN'S TREASURY OF SONG: Gathered from the Christian poetry of all ages. Edited by. Fcap. 8vo. 3s. 6d. net.

See also Library of Devotion.

Burnet (John), M.A. See Aristotle.

Burns (Robert), THE POEMS. Edited by ANDREW LANG and W. A. CRAIGIE. With Portrait. Third Edition. Wide Demy 8vo, gilt top. 6s.

See also Standard Library.

Burnside (W. F.), M.A. OLD TESTAMENT HISTORY FOR USE IN SCHOOLS. Third Edition. Cr. 8vo. 3s. 6d.

Burton (Alfred). See I.P.L.

Bury (J. B.), M.A., Litt.D. See Gibbon (Edward).

Bussell (F. W.), D.D. CHRISTIAN THEOLOGY AND SOCIAL PROGRESS (The Bampton Lectures of 1905). Demy 8vo. 10s. 6d. net.

Butler (Joseph), D.D. See Standard Library.

Butlin (F. M.). AMONG THE DANES. With 12 Illustrations in Colour by ELLEN WILKINSON, and 15 from Photographs. Demy 8vo. 7s. 6d. net.

Cain (Georges), Curator of the Carnavalet Museum, Paris. WALKS IN PARIS. Translated by A. R. ALLINSON, M.A. With a Frontispiece in Colour by MAXWELL ARMFIELD, and 118 other Illustrations. Demy 8vo. 7s. 6d. net.

Caldecott (Alfred), D.D. See Handbooks of Theology.

Calderwood (D. S.), Headmaster of the Normal School, Edinburgh. TEST CARDS IN EUCLID AND ALGEBRA. In three packets of 40, with Answers. 1s. each. Or in three Books, price 2d., 2d., and 3d.

Cameron (Mary Lovett). OLD ETRURIA AND MODERN TUSCANY. With 32 Illustrations. Crown 8vo. 6s. net.

Cannan (Edwin), M.A. See Smith (Adam).

Canning (George). See Little Library.

Capey (E. F. H.). See Oxford Biographies.

Garden (Robert W.). THE CITY OF GENOA. With 12 Illustrations in Colour by WILLIAM PARKINSON, and 20 other Illustrations. Demy 8vo. 10s. 6d. net.

Careless (John). See I.P.L.

Carlyle (Thomas). THE FRENCH REVOLUTION. Edited by C. R. L. FLETCHER, Fellow of Magdalen College, Oxford. Three Volumes. Cr. 8vo. 18s.

THE LETTERS AND SPEECHES OF OLIVER CROMWELL. With an Introduction by C. H. FIRTH, M.A., and Notes and Appendices by Mrs. S. C. LOMAS. Three Volumes. Demy 8vo. 18s. net.

Carlyle (R. M. and A. J.), M.A. See Leaders of Religion.

Carmichael (Philip). ALL ABOUT PHILIPPINE. With 8 Illustrations. Cr. 8vo. 2s. 6d.

Carpenter (Margaret Boyd). THE CHILD IN ART. With 50 Illustrations. Second Edition. Large Cr. 8vo. 6s.

Carter (George), M.A. THE STORY OF MILTON'S 'PARADISE LOST.' Crown 8vo. 1s. 6d.

Cavanagh (Francis), M.D. (Edin.). See New Library of Medicine.

Celano (Brother Thomas of). THE LIVES OF FRANCIS OF ASSISI. Translated by A. G. FERRERS HOWELL. With a Frontispiece. Cr. 8vo. 5s. net.

Chambers (A. M.). A CONSTITUTIONAL HISTORY OF ENGLAND. Crown 8vo. 6s.

Chamisso (A. von). See Simplified German Texts.

Chandler (Arthur), Bishop of Bloemfontein. ARA COELI: AN ESSAY IN MYSTICAL THEOLOGY. Third Edition. Crown 8vo. 3s. 6d. net.

Channer (C. C.) and Roberts (M. E.). LACEMAKING IN THE MIDLANDS, PAST AND PRESENT. With 17 full-page Illustrations. Cr. 8vo. 2s. 6d.

Chapman (S. J.). See Books on Business.

Chatterton (Thomas). See Standard Library.

Chesterfield (Lord). THE LETTERS OF THE EARL OF CHESTERFIELD TO HIS SON. Edited, with an Introduction by C. STRACHEY, with Notes by A. CALTHROP. Two Volumes. Cr. 8vo. 12s.

Chesterton (G. K.). CHARLES DICKENS. With two Portraits in Photogravure. Fifth Edition. Cr. 8vo. 6s.

ALL THINGS CONSIDERED. Fifth Edition. Fcap. 8vo. 5s.

TREMENDOUS TRIFLES. Second Edition. Fcap. 8vo. 5s.

Childe (Charles P.), B.A., F.R.C.S. See New Library of Medicine.

Cicero. See Classical Translations.

Clapham (J. H.), Professor of Economics in the University of Leeds. THE WOOLLEN AND WORSTED INDUSTRIES. With 21 Illustrations and Diagrams. Cr. 8vo. 6s.

Clarke (F. A.), M.A. See Leaders of Religion.

Clausen (George), A.R.A., R.W.S. SIX LECTURES ON PAINTING. With 16 Illustrations. Third Edition. Large Post 8vo. 3s. 6d. net.

AIMS AND IDEALS IN ART. Eight Lectures delivered to the Students of the Royal Academy of Arts. With 32 Illustrations. Second Edition. Large Post 8vo. 5s. net.

Clay (Rotha Mary). See Antiquary's Books.

Cleather (A. L.). See Wagner (R.).

Clinch (G.), F.G.S. See Antiquary's Books and Little Guides.

Clough (W. T.) and Dunstan (A. E.). See Junior School Books and Textbooks of Science.

Clouston (T. S.), M.D., C.C.D., F.R.S.E. See New Library of Medicine.

*Clutton-Brock. SHELLEY: THE MAN AND THE POET. With 8 Illustrations. Demy 8vo. 7s. 6d. net.

Coast (W. G.), B.A. EXAMINATION PAPERS IN VERGIL. Cr. 8vo. 2s.

Cobb (W. F.), M.A. THE BOOK OF PSALMS: with an Introduction and Notes. Demy 8vo. 10s. 6d. net.

Cockshott (Winnifred), St. Hilda's Hall, Oxford. THE PILGRIM FATHERS, THEIR CHURCH AND COLONY. With 12 Illustrations. Demy 8vo. 7s. 6d. net.

Collingwood (W. G.), M.A. THE LIFE OF JOHN RUSKIN. With Portrait. Sixth Edition. Cr. 8vo. 2s. 6d. net.

Collins (W. E.), M.A. See Churchman's Library.

Colvill (Helen H.). ST. TERESA OF SPAIN. With 20 Illustrations. Demy 8vo. 7s. 6d. net.

Combe (William). See I.P.L.

Conrad (Joseph). THE MIRROR OF THE SEA: Memories and Impressions. Third Edition. Cr. 8vo. 6s.

Cook (A. M.), M.A., and Marchant (E. C.), M.A. PASSAGES FOR UNSEEN TRANSLATION. Selected from Latin and Greek Literature. Fourth Ed. Cr. 8vo. 3s. 6d.

LATIN PASSAGES FOR UNSEEN TRANSLATION. Cr. 8vo. 1s. 6d.

Cooke-Taylor (R. W.). THE FACTORY SYSTEM. Cr. 8vo. 2s. 6d.

Coolidge (W. A. B.), M.A. THE ALPS. With many Illustrations. Demy 8vo. 7s. 6d. net.

Cooper (C. S.), F.R.H.S. See Westell (W.P.).

Corkran (Alice). See Little Books on Art.

Cotes (Rosemary). DANTE'S GARDEN. With a Frontispiece. Second Edition. Fcap. 8vo. 2s. 6d.; leather, 3s. 6d. net.

BIBLE FLOWERS. With a Frontispiece and Plan. Fcap. 8vo. 2s. 6d. net.

Cotton (Charles). See I.P.L. and Little Library.

Coulton (G. G.). CHAUCER AND HIS ENGLAND. With 32 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

Cowley (Abraham). See Little Library.

Cowper (William). THE POEMS. Edited with an Introduction and Notes by J. C. BAILEY, M.A. Illustrated, including two unpublished designs by WILLIAM BLAKE. Demy 8vo. 10s. 6d. net.

Cox (J. Charles). See Ancient Cities, Antiquary's Books, and Little Guides.

Cox (Harold), B.A., M.P. LAND NATIONALIZATION AND LAND TAXATION. Second Edition revised. Cr. 8vo. 3s. 6d. net.

Crabbe (George). See Little Library.

Craik (Mrs.). See Little Library.

Crane (C. P.), D.S.O. See Little Guides.

Crane (Walter), R.W.S. AN ARTIST'S REMINISCENCES. With 123 Illustrations by the Author and others from Photographs. Second Edition. Demy 8vo. 18s. net.

INDIA IMPRESSIONS. With 84 Illustrations from Sketches by the Author. Second Edition. Demy 8vo. 7s. 6d. net.

Crashaw (Richard). See Little Library.

Crispe (T. E.), K.C. REMINISCENCES OF A K.C. With 2 Portraits. Demy 8vo. 10s. 6d. net.

Cross (J. A.), M.A. THE FAITH OF THE BIBLE. Fcap. 8vo. 2s. 6d. net.

Crowley (Ralph H.). THE HYGIENE OF SCHOOL LIFE. Cr. 8vo. 3s. 6d. net.

Cruikshank (G.). THE LOVING BALLAD OF LORD BATEMAN. With 11 Plates. Cr. 16mo. 1s. 6d. net.

Crump (B.). See Wagner (R.).

Cruttwell (C. T.), M.A., Canon of Peterborough. See Handbooks of English Church History.

Cunynghame (H. H.), C.B. See Connoisseur's Library.

Cutts (E. L.), D.D. See Leaders of Religion.

Daniell (G. W.), M.A. See Leaders of Religion.

Dante (Alighieri). LA COMMEDIA DI DANTE. The Italian Text edited by PAGET TOYNBEE, M.A., D.Litt. Cr. 8vo. 6s.

THE DIVINE COMEDY. Translated by H. F. CARY. Edited with a Life of Dante and Introductory Notes by PAGET TOYNBEE, M.A., D.Litt. Demy 8vo. 6d.

THE PURGATORIO OF DANTE. Translated into Spenserian Prose by C. GORDON WRIGHT. With the Italian text. Fcap. 8vo. 2s. 6d. net.

See also Little Library, Toynbee (Paget), and Vernon (Hon. W. Warren).

Darley (George). See Little Library.

D'Arcy (R. F.), M.A. A NEW TRIGONOMETRY FOR BEGINNERS. With numerous diagrams. Cr. 8vo. 2s. 6d.

Daudet (Alphonse). See Simplified French Texts.

Davenport (Cyril). See Connoisseur's Library and Little Books on Art.

Davenport (James). THE WASHBOURNE FAMILY. With 15 Illustrations and a Map. Royal 8vo. 21s. net.

Davey (Richard). THE PAGEANT OF LONDON. With 40 Illustrations in Colour by JOHN FULLEYLOVE, R.I. In Two Volumes. Demy 8vo. 15s. net.

See also Romantic History.

Davies (Gerald S.). See Classics of Art.

Davies (W. O. P.). See Junior Examination Series.

Davis (H. W. C.), M.A., Fellow and Tutor of Balliol College. ENGLAND UNDER THE NORMANS AND ANGEVINS: 1066-1272. With Maps and Illustrations.

Second Edition. Demy 8vo. 10s. 6d. net.

Dawson (Nelson). See Connoisseur's Library.

Dawson (Mrs. Nelson). See Little Books on Art.

Deane (A. C.). See Little Library.

Deans (Storry R.). THE TRIALS OF FIVE QUEENS: KATHARINE OF ARAGON, ANNE BOLEYN, MARY QUEEN OF SCOTS, MARIE ANTOINETTE and CAROLINE OF BRUNSWICK. With 12 Illustrations. Demy 8vo. 10s. 6d. net.

Dearmer (Mabel). A CHILD'S LIFE OF CHRIST. With 8 Illustrations in Colour by E. FORTESCUE-BRICKDALE. Large Cr. 8vo. 6s.

D'Este (Margaret). IN THE CANARIES WITH A CAMERA. With 50 Illustrations of which one is in Colour, from Photographs by Mrs. R. M. KING, and a Map. Cr. 8vo. 7s. 6d. net.

Delbos (Leon). THE METRIC SYSTEM. Cr. 8vo. 2s.

Demosthenes. AGAINST CONON AND CALLICLES. Edited by F. DARWIN SWIFT, M.A. Second Edition. Fcap. 8vo. 2s.

Dickens (Charles). See Little Library, I.P.L., and Chesterton (G. K.).

Dickinson (Emily). POEMS. Cr. 8vo. 4s. 6d. net.

Dickinson (G. L.), M.A., Fellow of King's College, Cambridge. THE GREEK VIEW OF LIFE. Sixth Edition. Cr. 8vo. 2s. 6d.

Dilke (Lady), Bulley (Miss), and Whitley (Miss). WOMEN'S WORK. Cr. 8vo. 2s. 6d.

Dillon (Edward), M.A. See Connoisseur's Library, Little Books on Art, and Classics of Art.

Ditchfield (P. H.), M.A., F.S.A. THE STORY OF OUR ENGLISH TOWNS. With an Introduction by AUGUSTUS JESSOPP, D.D. Second Edition. Cr. 8vo. 6s.

OLD ENGLISH CUSTOMS: Extant at the Present Time. Cr. 8vo. 6s.

ENGLISH VILLAGES. With 100 Illustrations. Second Edition. Cr. 8vo. 2s. 6d. net.

THE PARISH CLERK. With 31 Illustrations. Third Edition. Demy 8vo. 7s. 6d. net.

THE OLD-TIME PARSON. With 17 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Dixon (W. M.), M.A. A PRIMER OF TENNYSON. Third Edition. Cr. 8vo. 2s. 6d.

ENGLISH POETRY FROM BLAKE TO BROWNING. Second Edition. Cr. 8vo. 2s. 6d.

Dobbs (W. J.), M.A. See Textbooks of Science.

Doney (May). SONGS OF THE REAL. Cr. 8vo. 3s. 6d. net.

Douglas (Hugh A.). VENICE ON FOOT. With the Itinerary of the Grand Canal. With 75 Illustrations and 11 Maps. Fcap. 8vo. 5s. net.

Douglas (James). THE MAN IN THE PULPIT. Cr. 8vo. 2s. 6d. net.

Dowden (J.), D.D., Lord Bishop of Edinburgh. FURTHER STUDIES IN THE PRAYER BOOK. Cr. 8vo. 6s.

See also Churchman's Library.

Drage (G.). See Books on Business.

Driver (S. R.), D.D., D.C.L., Regius Professor of Hebrew in the University of Oxford. SERMONS ON SUBJECTS CONNECTED WITH THE OLD TESTAMENT. Cr. 8vo. 6s.

See also Westminster Commentaries.

Dry (Wakeling). See Little Guides.

Dryhurst (A. R.). See Little Books on Art.

Duff (Nora). MATILDA OF TUSCANY. With many Illustrations. Demy 8vo. 10s. 6d. net.

Duguid (Charles). See Books on Business.

Dumas (Alexandre). THE CRIMES OF THE BORGIAS AND OTHERS. With an Introduction by R. S. GARNETT. With 9 Illustrations. Cr. 8vo. 6s.

THE CRIMES OF URBAIN GRANDIER AND OTHERS. With 8 Illustrations. Cr. 8vo. 6s.

THE CRIMES OF THE MARQUISE DE BRINVILLIERS AND OTHERS. With 8 Illustrations. Cr. 8vo. 6s.

THE CRIMES OF ALI PACHA AND OTHERS. With 8 Illustrations. Cr. 8vo. 6s.

MY MEMOIRS. Translated by E. M. WALLER. With an Introduction by Andrew Lang. With Frontispieces in Photogravure. In six Volumes. Cr. 8vo. 6s. each volume.

VOL. I. 1802-1821.

VOL. II. 1822-1825.

VOL. III. 1826-1830.

VOL. IV. 1830-1831.

VOL. V. 1831-1832.

VOL. VI. 1832-1833.

MY PETS. Newly translated by A. R. ALLINSON, M.A. With 16 Illustrations by V. LECOMTE. Cr. 8vo. 6s.

See also Simplified French Texts.

Duncan (David), D.Sc., LL.D. THE LIFE AND LETTERS OF HERBERT SPENCER. With 17 Illustrations. Demy 8vo. 15s.

Dunn (J. T.)., D.Sc., and Mundella (V. A.). GENERAL ELEMENTARY SCIENCE. With 114 Illustrations. Second Edition. Cr. 8vo. 3s. 6d.

Dunn-Pattison (R. P.). NAPOLEON'S MARSHALS. With 20 Illustrations. Demy 8vo. Second Edition. 12s. 6d. net.

Dunstan (A. E.), B.Sc. (Lond.). See Textbooks of Science, and Junior School Books.

Durham (The Earl of). A REPORT ON CANADA. With an Introductory Note. Demy 8vo. 4s. 6d. net.

Dutt (W. A.). THE NORFOLK BROADS. With coloured Illustrations by FRANK SOUTHGATE, R.B.A. Second Edition. Cr. 8vo. 6s.

WILD LIFE IN EAST ANGLIA. With 16 Illustrations in colour by FRANK SOUTHGATE, R.B.A. Second Edition. Demy 8vo. 7s. 6d. net.

SOME LITERARY ASSOCIATIONS OF EAST ANGLIA. With 16 Illustrations in Colour by W. DEXTER, R.B.A., and 16 other Illustrations. Demy 8vo. 10s. 6d. net.

See also Little Guides.

Earle (John), Bishop of Salisbury. MICRO-COSMOGRAPHIE, or A PIECE OF THE WORLD DISCOVERED. Post 16mo. 2s. net.

Edmonds (Major J. E.), R.E.; D.A.Q.-M.G. See Wood (W. Birkbeck).

Edwardes (Tickner). THE LORE OF THE HONEY BEE. With 24 Illustrations. Cr. 8vo. 6s.

Edwards (Clement), M.P. RAILWAY NATIONALIZATION. Second Edition, Revised. Crown 8vo. 2s. 6d. net.

Edwards (W. Douglas). See Commercial Series.

Egan (Pierce). See I.P.L.

Egerton (H. E.), M.A. A HISTORY OF BRITISH COLONIAL POLICY. Second Ed., Revised. Demy 8vo. 7s. 6d. net.

Ellaby (C. G.). See Little Guides.

Ellerton (F. G.). See Stone (S. J.).

Epictetus. See Aurelius (Marcus).

Erasmus. A Book called in Latin ENCHIRIDION MILITIS CHRISTIANI, and in English the Manual of the Christian Knight. Fcap. 8vo. 3s. 6d. net.

Erckmann-Chatrian. See Simplified French Texts.

Evagrius. See Byzantine Texts.

Everett-Green (Mary Anne). ELIZABETH; ELECTRESS PALATINE AND QUEEN OF BOHEMIA. Revised by her Niece S. C. LOMAS. With a Prefatory Note by A. W. WARD, Litt.D. Demy 8vo. 10s. 6d. net.

Ewald (Carl). TWO LEGS, and OTHER STORIES. Translated from the Danish by ALEXANDER TEIXEIRA DE MATTOS. Illustrated by AUGUSTA GUEST. Large Cr. 8vo. 6s.

Ezekiel. See Westminster Commentaries.

Facon (H. T.), B.A. See Junior Examination Series.

Fairbrother (W. H.), M.A. THE PHILOSOPHY OF T. H. GREEN. Second Edition. Cr. 8vo. 3s. 6d.

Fea (Allan). THE FLIGHT OF THE KING. With over 70 Sketches and Photographs by the Author. New and revised Edition. Demy 8vo. 7s. 6d. net.

SECRET CHAMBERS AND HIDING-PLACES. With 80 Illustrations. New and revised Edition. Demy 8vo. 7s. 6d. net.

JAMES II. AND HIS WIVES. With 40 Illustrations. Demy 8vo. 10s. 6d. net.

Fell (E. F. B.). THE FOUNDATIONS OF LIBERTY. Cr. 8vo. 5s. net.

Ferrier (Susan). See Little Library.

Fidler (T. Claxton), M.Inst. C.E. See Books on Business.

Fielding (Henry). See Standard Library.

Finn (S. W.), M.A. See Junior Examination Series.

Firth (J. B.). See Little Guides.

Firth (C. H.), M.A., Regius Professor of Modern History at Oxford. CROMWELL'S ARMY: A History of the English Soldier during the Civil Wars, the Commonwealth, and the Protectorate. Cr. 8vo. 6s.

Firth (Edith E.). See Beginner's Books and Junior School Books.

FitzGerald (Edward). THE RUBÁIYÁT OF OMAR KHAYYAM. Printed from the Fifth and last Edition. With a Commentary by Mrs. STEPHEN BATSON, and a Biography of Omar by E. D. ROSS. Cr. 8vo. 6s.

See also Miniature Library.

FitzGerald (H. P.). A CONCISE HAND-BOOK OF CLIMBERS, TWINERS, AND WALL SHRUBS. Illustrated. Fcap. 8vo. 3s. 6d. net.

Fitzpatrick (S. A. O.). See Ancient Cities.

Flecker (W. H.), M.A., D.C.L., Headmaster of the Dean Close School, Cheltenham. THE STUDENT'S PRAYER BOOK. THE TEXT OF MORNING AND EVENING PRAYER AND LITANY. With an Introduction and Notes. Cr. 8vo. 2s. 6d.

Fletcher (C. R. L.), M.A. See Carlyle (Thomas).

Fletcher (J. S.). A BOOK OF YORKSHIRE. With 16 Illustrations in Colour by WAL PAGET and FRANK SOUTHGATE, R.B.A., 16 other Illustrations and a Map. Demy 8vo. 7s. 6d. net.

Flux (A. W.), M.A., William Dow Professor of Political Economy in M'Gill University, Montreal. ECONOMIC PRINCIPLES. Demy 8vo. 7s. 6d. net.

Foat (F. W. G.), D.Litt., M.A. A LONDON READER FOR YOUNG CITIZENS. With Plans and Illustrations. Cr. 8vo. 1s. 6d.

Ford (H. G.), M.A., Assistant Master at Bristol Grammar School. See Junior School Books.

Forel (A.). THE SENSES OF INSECTS. Translated by MACLEOD YEARSLEY. With 2 Illustrations. Demy 8vo. 10s. 6d. net.

Fortescue (Mrs. G.). See Little Books on Art.

Fouqué (La Motte). SINTRAM AND HIS COMPANIONS. Translated by A. C. FARQUHARSON. With 20 Illustrations by EDMUND J. SULLIVAN, and a Frontispiece in Photogravure from an engraving by ALBRECHT DÜRER. Demy 8vo. 7s. 6d. net. Half White Vellum, 10s. 6d. net.

See also Simplified German Texts.

Fraser (J. F.). ROUND THE WORLD ON A WHEEL. With 100 Illustrations. Fifth Edition. Cr. 8vo. 6s.

French (W.), M.A. See Textbooks of Science.

Freudenreich (Ed. von). DAIRY BACTERIOLOGY. A Short Manual for Students. Translated by J. R. AINSWORTH DAVIS, M.A. Second Edition. Revised. Cr. 8vo. 2s. 6d.

Fursdon (F. R. M). FRENCH AND ENGLISH PARALLELS. Fcap. 8vo. 3s. 6d. net.

Fyvie (John). TRAGEDY QUEENS OF THE GEORGIAN ERA. With 16 Illustrations. Second Ed. Demy 8vo. 12s. 6d. net.

Gallaher (D.) and Stead (W. J.). THE COMPLETE RUGBY FOOTBALLER, ON THE NEW ZEALAND SYSTEM. With 35 Illustrations. Second Ed. Demy 8vo. 10s. 6d. net.

Gallichan (W. M.). See Little Guides.

Galton (Sir Francis), F.R.S.; D.C.L., Oxf.; Hon. Sc.D., Camb.; Hon. Fellow Trinity College, Cambridge. MEMORIES OF MY LIFE. With 8 Illustrations. Third Edition. Demy 8vo. 10s. 6d. net.

Gambado (Geoffrey, Esq.). See I.P.L.

Garnett (Lucy M. J.). THE TURKISH PEOPLE: THEIR SOCIAL LIFE, RELIGIOUS BELIEFS AND INSTITUTIONS, AND DOMESTIC LIFE. With 21 Illustrations. Demy 8vo. 10s. 6d. net.

Gaskell (Mrs.). See Little Library, Standard Library and Sixpenny Novels.

Gasquet, the Right Rev. Abbot, O.S.B. See Antiquary's Books.

Gee (Henry), D.D., F.S.A. See Handbooks of English Church History.

George (H. B.), M.A., Fellow of New College, Oxford. BATTLES OF ENGLISH HISTORY. With numerous Plans. Fourth Edition Revised. Cr. 8vo. 3s. 6d.

A HISTORICAL GEOGRAPHY OF THE BRITISH EMPIRE. Fourth Edition. Cr. 8vo. 3s. 6d.

Gibbins (H. de B.), Litt.D., M.A. INDUSTRY IN ENGLAND: HISTORICAL OUTLINES. With 5 Maps. Sixth Edition. Demy 8vo. 10s. 6d.

THE INDUSTRIAL HISTORY OF ENGLAND. With Maps and Plans. Fifteenth Edition, Revised. Cr. 8vo. 3s.

ENGLISH SOCIAL REFORMERS. Second Edition. Cr. 8vo. 2s. 6d.

See also Hadfield (R. A.), and Commercial Series.

Gibbon (Edward). MEMOIRS OF MY LIFE AND WRITINGS. Edited by G. BIRKBECK HILL, LL.D. Cr. 8vo. 6s.

*THE DECLINE AND FALL OF THE ROMAN EMPIRE. Edited, with Notes, Appendices, and Maps, by J. B. BURY. M.A., Litt.D., Regius Professor of Modern History at Cambridge. In Seven Volumes. With many Illustrations and Maps. Demy 8vo. Gilt top. Each 10s. 6d. net.

Gibbs (Philip). THE ROMANCE OF GEORGE VILLIERS: FIRST DUKE OF BUCKINGHAM, AND SOME MEN AND WOMEN OF THE STUART COURT. With 20 Illustrations. Second Edition. Demy 8vo. 15s. net.

Gibson (E. C. S.), D.D., Lord Bishop of Gloucester. See Westminster Commentaries, Handbooks of Theology, and Oxford Biographies.

Gilbert (A. R.). See Little Books on Art.

Gloag (M. R.) and Wyatt (Kate M.). A BOOK OF ENGLISH GARDENS. With 24 Illustrations in Colour. Demy 8vo. 10s. 6d. net.

Glover (T. R.), M.A., Fellow and Classical Lecturer of St. John's College, Cambridge. THE CONFLICT OF RELIGIONS IN THE EARLY ROMAN EMPIRE. Third Edition. Demy 8vo. 7s. 6d. net.

Godfrey (Elizabeth). A BOOK OF REMEMBRANCE. Being Lyrical Selections for every day in the Year. Arranged by. Second Edition. Fcap. 8vo. 2s. 6d. net.

ENGLISH CHILDREN IN THE OLDEN TIME. With 32 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Godley (A. D.), M.A., Fellow of Magdalen College, Oxford. OXFORD IN THE EIGHTEENTH CENTURY. With 16 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Also published in a Colonial Edition.

LYRA FRIVOLA. Fourth Edition. Fcap. 8vo. 2s. 6d.

VERSES TO ORDER. Second Edition. Fcap. 8vo. 2s. 6d.

SECOND STRINGS. Fcap. 8vo. 2s. 6d.

Goldsmith (Oliver). See I.P.L. and Standard Library.

Goll (August). CRIMINAL TYPES IN SHAKESPEARE. Authorised Translation from the Danish by Mrs. CHARLES WEEKES. Cr. 8vo. 5s. net.

Gomme (G. L.). See Antiquary's Books.

Gordon (Lina Duff) (Mrs. Aubrey Waterfield). HOME LIFE IN ITALY: LETTERS FROM THE APENNINES. With 13 Illustrations by AUBREY WATERFIELD and 15 Illustrations from Photographs. Second Edition. Demy 8vo. 10s. 6d. net.

Gorst (Rt. Hon. Sir John). See New Library of Medicine.

Gostling (Frances M.). THE BRETONS AT HOME. With 12 Illustrations in Colour by GASTON FANTY LESCURE, and 32 from Photographs. Demy 8vo. 10s. 6d. net.

Goudge (H. L.), M.A., Principal of Wells Theological College. See Westminster Commentaries.

Graham (Harry). A GROUP OF SCOTTISH WOMEN. With 16 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

Graham (P. Anderson). THE RURAL EXODUS. The Problem of the Village and the Town. Cr. 8vo. 2s. 6d.

Grahame (Kenneth). THE WIND IN THE WILLOWS. With a Frontispiece by GRAHAM ROBERTSON. Fourth Edition. Cr. 8vo. 6s.

Granger (F. S.), M.A., Litt.D. PSYCHOLOGY. Fourth Edition. Cr. 8vo. 2s. 6d.

THE SOUL OF A CHRISTIAN. Cr. 8vo. 6s.

Gray (E. M'Queen). GERMAN PASSAGES FOR UNSEEN TRANSLATION. Cr. 8vo. 2s. 6d.

Gray (P. L.), B.Sc. THE PRINCIPLES OF MAGNETISM AND ELECTRICITY. With 181 Diagrams. Cr. 8vo. 3s. 6d.

Green (G. Buckland), M.A., late Fellow of St. John's College, Oxon. NOTES ON GREEK AND LATIN SYNTAX. Second Ed. revised. Crown 8vo. 3s. 6d.

Greenidge (A. H. J.), M.A., D.Litt. A HISTORY OF ROME: From the Tribunate of Tiberius Gracchus to the end of the Jugurthine War, B.C. 133-104. Demy 8vo. 10s. 6d. net.

Gregory (Miss E. C.). See Library of Devotion.

Grubb (H. C.). See Textbooks of Technology.

Gwynn (Stephen), M.P. A HOLIDAY IN CONNEMARA. With 16 Illustrations. Demy 8vo. 10s. 6d. net.

Hadfield (R. A.) and Gibbins (H. de B.). A SHORTER WORKING DAY. Cr. 8vo. 2s. 6d.

Hall (Cyril). THE YOUNG CARPENTER. With many Diagrams, and 15 Photographic Illustrations. Cr. 8vo. 5s.

Hall (Hammond). THE YOUNG ENGINEER: OR MODERN ENGINES AND THEIR MODELS. With 85 Illustrations. Second Edition. Cr. 8vo. 5s.

Hall (Mary). A WOMAN'S TREK FROM THE CAPE TO CAIRO. With 64 Illustrations and 2 Maps. Second Edition. Demy 8vo. 16s. net.

Hamel (Frank). FAMOUS FRENCH SALONS. With 20 Illustrations. Third Edition. Demy 8vo. 12s. 6d. net.

Hannay (D.). A SHORT HISTORY OF THE ROYAL NAVY. Vol. I., 1217-1688. Vol. II., 1689-1815. Demy 8vo. Each 7s. 6d. net.

Hannay (James O.), M.A. THE SPIRIT AND ORIGIN OF CHRISTIAN MONASTICISM. Cr. 8vo. 6s.

THE WISDOM OF THE DESERT. Fcap. 8vo. 3s. 6d. net.

Hardie (Martin). See Connoisseur's Library.

Hare (A. T.), M.A. THE CONSTRUCTION OF LARGE INDUCTION COILS. With 35 Illustrations. Demy 8vo. 6s.

Harker (Alfred), M.A., F.R.S., Fellow of St. John's College, and Lecturer in Petrology in the University of Cambridge. THE NATURAL HISTORY OF IGNEOUS ROCKS. With 112 Diagrams and 2 Plates. Demy 8vo. 12s. 6d. net.

Harper (Charles G.). 'THE AUTOCAR' ROAD-BOOK. In four Volumes. Crown 8vo. Each 7s. 6d. net.

Vol. I.—SOUTH OF THE THAMES.

Harvey (Alfred), M.B. See Ancient Cities and Antiquary's Books.

Hawthorne (Nathaniel). See Little Library.

Headley (F. W.). DARWINISM AND MODERN SOCIALISM. Cr. 8vo. 5s. net.

Heath (Frank R.). See Little Guides.

Heath (Dudley). See Connoisseur's Library.

Henderson (B. W.), Fellow of Exeter College, Oxford. THE LIFE AND PRINCIPATE OF THE EMPEROR NERO. Illustrated. New and cheaper issue. Demy 8vo. 7s. 6d. net.

AT INTERVALS. Fcap 8vo. 2s. 6d. net.

Henderson (M. Sturge). GEORGE MEREDITH: NOVELIST, POET, REFORMER. With a Portrait in Photogravure. Second Edition. Crown 8vo. 6s.

Henderson (T. F.). See Little Library and Oxford Biographies.

Henderson (T. F.) and Watt (Francis). SCOTLAND OF TO-DAY. With 20 Illustrations in colour and 24 other Illustrations Second Edition. Cr. 8vo. 6s.

Henley (W. E.). ENGLISH LYRICS. CHAUCER TO POE, 1340-1849. Second Edition. Cr. 8vo. 2s. 6d. net.

Henley (W. E.) and Whibley (C.). A BOOK OF ENGLISH PROSE, CHARACTER, AND INCIDENT, 1387-1649. Cr. 8vo. 2s. 6d. net.

Herbert (George). See Library of Devotion.

Herbert of Cherbury (Lord). See Miniature Library.

Hett (Walter S.), B.A. A SHORT HISTORY OF GREECE TO THE DEATH OF ALEXANDER THE GREAT. With 3 Maps and 4 Plans. Cr. 8vo. 3s. 6d.

Hewins (W. A. S.), B.A. ENGLISH TRADE AND FINANCE IN THE SEVENTEENTH CENTURY. Cr. 8vo. 2s. 6d.

Hewitt (Ethel M.) A GOLDEN DIAL. A Day Book of Prose and Verse. Fcap. 8vo. 2s. 6d. net.

Hey (H.), Inspector, Surrey Education Committee, and Rose (G. H.), City and Guilds Woodwork Teacher. A WOODWORK CLASS-BOOK. Pt. I. Illustrated. 4to. 2s.

Heywood (W.). See St. Francis of Assisi.

Hill (Clare). See Textbooks of Technology.

Hill (George Francis). ONE HUNDRED MASTERPIECES OF SCULPTURE. With 101 Illustrations. Demy 8vo. 10s. 6d. net.

Hill (Henry), B.A., Headmaster of the Boy's High School, Worcester, Cape Colony. A SOUTH AFRICAN ARITHMETIC. Cr. 8vo. 3s. 6d.

Hind (C. Lewis). DAYS IN CORNWALL. With 16 Illustrations in Colour by WILLIAM PASCOE, and 20 other Illustrations and a Map. Second Edition. Cr. 8vo. 6s.

Hirst (F. W.). See Books on Business.

Hobhouse (L. T.), late Fellow of C.C.C., Oxford. THE THEORY OF KNOWLEDGE. Demy 8vo. 10s. 6d. net.

Hobson (J. A.), M.A. INTERNATIONAL TRADE: A Study of Economic Principles. Cr. 8vo. 2s. 6d. net.

PROBLEMS OF POVERTY. An Inquiry into the Industrial Condition of the Poor. Seventh Edition. Cr. 8vo. 2s. 6d.

THE PROBLEM OF THE UNEMPLOYED. Fourth Edition. Cr. 8vo. 2s. 6d.

Hodgetts (E. A. Brayley). THE COURT OF RUSSIA IN THE NINETEENTH CENTURY. With 20 Illustrations. Two Volumes. Demy 8vo. 24s. net.

Hodgkin (T.), D.C.L. See Leaders of Religion.

Hodgson (Mrs. W.). HOW TO IDENTIFY OLD CHINESE PORCELAIN. With 40 Illustrations. Second Edition. Post 8vo. 6s.

Holden-Stone (G. de). See Books on Business.

Holdich (Sir T. H.), K.C.I.E., C.B., F.S.A. THE INDIAN BORDERLAND, 1880-1900. With 22 Illustrations and a Map. Second Edition. Demy 8vo. 10s. 6d. net.

Holdsworth (W. S.), D.C.L. A HISTORY OF ENGLISH LAW. In Four Volumes. Vols. I., II., III. Demy 8vo. Each 10s. 6d. net.

Holland (Clive). TYROL AND ITS PEOPLE. With 16 Illustrations in Colour by ADRIAN STOKES, 31 other Illustrations and a Map. Demy 8vo. 10s. 6d. net.

Holland (H. Scott), Canon of St. Paul's. See Newman (J. H.).

Hollings (M. A.), M.A. See Six Ages of European History.

Hollway-Calthrop (H. C.), late of Balliol College, Oxford; Bursar of Eton College. PETRARCH: HIS LIFE, WORK, AND TIMES. With 24 Illustrations. Demy 8vo. 12s. 6d. net.

Holmes (T. Scott). See Ancient Cities.

Holyoake (G. J.). THE CO-OPERATIVE MOVEMENT OF TO-DAY. Fourth Ed. Cr. 8vo. 2s. 6d.

Hone (Nathaniel J.). See Antiquary's Books.

Hook (A.). HUMANITY AND ITS PROBLEMS. Cr. 8vo. 5s. net.

Hoppner. See Little Galleries.

Horace. See Classical Translations.

Horsburgh (E. L. S.), M.A. LORENZO THE MAGNIFICENT: AND FLORENCE IN HER GOLDEN AGE. With 24 Illustrations and 2 Maps. SECOND EDITION. DEMY 8VO. 15S. NET.

WATERLOO: With Plans. Second Edition. Cr. 8vo. 5s.

See also Oxford Biographies.

Horth (A. C.). See Textbooks of Technology.

Horton (R. F.), D.D. See Leaders of Religion.

Hosie (Alexander). MANCHURIA. With 30 Illustrations and a Map. Second Edition. Demy 8vo. 7s. 6d. net.

How (F. D.). SIX GREAT SCHOOLMASTERS. With 13 Illustrations. Second Edition. Demy 8vo. 7s. 6d.

Howell (A. G. Ferrers). FRANCISCAN DAYS. Being Selections for every day in the year from ancient Franciscan writings. Cr. 8vo. 3s. 6d. net.

Howell (G.). TRADE UNIONISM—NEW AND OLD. Fourth Edition. Cr. 8vo. 2s. 6d.

Huggins (Sir William), K.C.B., O.M., D.C.L., F.R.S. THE ROYAL SOCIETY; OR, SCIENCE IN THE STATE AND IN THE SCHOOLS. With 25 Illustrations. Wide Royal 8vo. 4s. 6d. net.

Hughes (C. E.). THE PRAISE OF SHAKESPEARE. An English Anthology. With a Preface by SIDNEY LEE. Demy 8vo. 3s. 6d. net.

Hugo (Victor). See Simplified French Texts.

Hulton (Samuel F.). THE CLERK OF OXFORD IN FICTION. With 12 Illustrations. Demy 8vo. 10s. 6d. net.

Hume (Martin), M.A. See Romantic History.

Hutchinson (Horace G.). THE NEW FOREST. Illustrated in colour with 50 Pictures by WALTER TYNDALE and 4 by LUCY KEMP-WELCH. Fourth Edition. Cr. 8vo. 6s.

Hutton (A. W.), M.A. See Leaders of Religion and Library of Devotion.

Hutton (Edward). THE CITIES OF UMBRIA. With 20 Illustrations in Colour by A. PISA, and 12 other Illustrations. Third Edition. Cr. 8vo. 6s.

THE CITIES OF SPAIN. With 24 Illustrations in Colour, by A. W. RIMINGTON, 20 other Illustrations and a Map. Third Edition. Cr. 8vo. 6s.

FLORENCE AND THE CITIES OF NORTHERN TUSCANY, WITH GENOA. With 16 Illustrations in Colour by WILLIAM PARKINSON, and 16 other Illustrations. Second Edition. Cr. 8vo. 6s.

ENGLISH LOVE POEMS. Edited with an Introduction. Fcap. 8vo. 3s. 6d. net.

COUNTRY WALKS ABOUT FLORENCE. With 32 Drawings by ADELAIDE MARCHI and 20 other Illustrations. Fcap. 8vo. 5s. net.

IN UNKNOWN TUSCANY. With an Appendix by WILLIAM HEYWOOD. With 8 Illustrations in Colour and 20 others. Second Edition. Demy 8vo. 7s. 6d. net.

ROME. With 16 Illustrations in Colour by MAXWELL ARMFIELD, and 12 other Illustrations. Cr. 8vo. 6s.

Hutton (R. H.). See Leaders of Religion.

Hutton (W. H.), M.A. THE LIFE OF SIR THOMAS MORE. With Portraits after Drawings by HOLBEIN. Second Edition. Cr. 8vo. 5s.

See also Leaders of Religion.

Hyde (A. G.). GEORGE HERBERT AND HIS TIMES. With 32 Illustrations. Demy 8vo. 10s. 6d. net.

Hyett (F. A.). FLORENCE: HER HISTORY AND ART TO THE FALL OF THE REPUBLIC. Demy 8vo. 7s. 6d. net.

Ibsen (Henrik). BRAND. A Drama. Translated by WILLIAM WILSON. Third Edition. Cr. 8vo. 3s. 6d.

Inge (W. R.), M.A., Fellow and Tutor of Hertford College, Oxford. CHRISTIAN MYSTICISM. (The Bampton Lectures of 1899.) Demy 8vo. 12s. 6d. net.

See also Library of Devotion.

Innes (A. D.), M.A. A HISTORY OF THE BRITISH IN INDIA. With Maps and Plans. Cr. 8vo. 6s.

ENGLAND UNDER THE TUDORS. With Maps. Second Edition. Demy 8vo. 10s. 6d. net.

Innes (Mary). SCHOOLS OF PAINTING. With 76 Illustrations. Cr. 8vo. 5s. net.

Isaiah. See Churchman's Bible.

Jackson (C. E.), B.A. See Textbooks of Science.

Jackson (S.), M.A. See Commercial Series.

Jackson (F. Hamilton). See Little Guides.

Jacob (F.), M.A. See Junior Examination Series.

Jeans (J. Stephen). TRUSTS, POOLS, AND CORNERS AS AFFECTING COMMERCE AND INDUSTRY. Cr. 8vo. 2s. 6d.

See also Books on Business.

Jebb (Camilla). A STAR OF THE SALONS: JULIE DE LESPINASSE. With 20 Illustrations. Demy 8vo. 10s. 6d. net.

Jeffery (Reginald W.), M.A. THE HISTORY OF THE THIRTEEN COLONIES OF NORTH AMERICA 1497-1763. With 8 Illustrations and a Map. Demy 8vo. 7s. 6d. net.

Jeffreys (D. Gwyn). DOLLY'S THEATRICALS. Super Royal 16mo. 2s. 6d.

Jenks (E.), M.A., B.C.L. AN OUTLINE OF ENGLISH LOCAL GOVERNMENT. Second Ed. Revised by R. C. K. ENSOR, M.A. Cr. 8vo. 2s. 6d.

Jenner (Mrs. H.). See Little Books on Art.

Jennings (A. C.), M.A. See Handbooks of English Church History.

Jennings (Oscar), M.D. EARLY WOODCUT INITIALS. Demy 4to. 21s. net.

Jerningham (Charles Edward). THE MAXIMS OF MARMADUKE. Fcap. 8vo. 5s.

Jessopp (Augustus), D.D. See Leaders of Religion.

Jevons (F. B.), M.A., Litt.D., Principal of Hatfield Hall, Durham. RELIGION IN EVOLUTION. Cr. 8vo. 3s. 6d. net.

See also Churchman's Library and Handbooks of Theology.

Johnson (A. H.), M.A. See Six Ages of European History.

Johnston (Sir H. H.), K.C.B. BRITISH CENTRAL AFRICA. With nearly 200 Illustrations and Six Maps. Third Edition. Cr. 4to. 18s. net.

Jones (H.). See Commercial Series.

Jones (H. F.). See Textbooks of Science.

Jones (L. A. Atherley), K.C., M.P., and Bellot (Hugh H. L.), M.A., D.C.L. THE MINER'S GUIDE TO THE COAL MINES REGULATION ACTS AND THE LAW OF EMPLOYERS AND WORKMEN. Cr. 8vo. 2s. 6d. net.

COMMERCE IN WAR. Royal 8vo. 21s. net.

Jones (R. Compton), M.A. POEMS OF THE INNER LIFE. Selected by. Thirteenth Edition. Fcap. 8vo. 2s. 6d. net.

Jonson (Ben). See Standard Library.

Julian (Lady) of Norwich. REVELATIONS OF DIVINE LOVE. Ed. by GRACE WARRACK. Third Ed. Cr. 8vo. 3s. 6d.

Juvenal. See Classical Translations.

'Kappa.' LET YOUTH BUT KNOW: A Plea for Reason in Education. Second Edition. Cr. 8vo. 3s. 6d. net.

Kaufmann (M.), M.A. SOCIALISM AND MODERN THOUGHT. Second Edition Revised and Enlarged. Cr. 8vo. 2s. 6d. net.

Keats (John). THE POEMS. Edited with Introduction and Notes by E. de SÉLINCOURT, M.A. With a Frontispiece in Photogravure. Second Edition Revised. Demy 8vo. 7s. 6d. net.

REALMS OF GOLD. Selections from the Works of. Fcap. 8vo. 3s. 6d. net.

See also Little Library and Standard Library.

Keble (John). THE CHRISTIAN YEAR. With an Introduction and Notes by W. LOCK, D.D., Warden of Keble College. Illustrated by R. ANNING BELL. Third Edition. Fcap. 8vo. 3s. 6d.; padded morocco, 5s.

See also Library of Devotion.

Kelynack (T. N.), M.D., M.R.C.P. See New Library of Medicine.

Kempis (Thomas à). THE IMITATION OF CHRIST. With an Introduction by DEAN FARRAR. Illustrated by C. M. GERE. Third Edition. Fcap. 8vo. 3s. 6d.; padded morocco. 5s.

Also Translated by C. BIGG, D.D. Cr. 8vo. 3s. 6d.

See also Montmorency (J. E. G. de), Library of Devotion, and Standard Library.

Kennedy (James Houghton), D.D., Assistant Lecturer in Divinity in the University of Dublin. See St. Paul.

Kerr (S. Parnell). GEORGE SELWYN AND THE WITS. With 16 Illustrations. Demy 8vo. 12s. 6d. net.

Kimmins (C. W.), M.A. THE CHEMISTRY OF LIFE AND HEALTH. Illustrated. Cr. 8vo. 2s. 6d.

Kinglake (A. W.). See Little Library.

Kipling (Rudyard). BARRACK-ROOM BALLADS. 91st Thousand. Twenty-sixth Edition. Cr. 8vo. 6s. Also Fcap. 8vo, Leather. 5s.

THE SEVEN SEAS. 79th Thousand. Fifteenth Edition. Cr. 8vo. 6s. Also Fcap. 8vo, Leather. 5s.

THE FIVE NATIONS. 68th Thousand. Sixth Edition. Cr. 8vo. 6s. Also Fcap. 8vo, Leather. 5s.

DEPARTMENTAL DITTIES. Eighteenth Edition. Cr. 8vo. 6s. Also Fcap. 8vo, Leather. 5s.

Knight (Albert E.). THE COMPLETE CRICKETER. With 50 Illustrations. Demy 8vo. 7s. 6d. net.

Knowling (R. J.), M.A., Professor of New Testament Exegesis at King's College, London. See Westminster Commentaries.

Knox (Winifred F.). THE COURT OF A SAINT. With 16 Illustrations. Demy 8vo. 10s. 6d. net.

Kropotkin (Prince). THE TERROR IN RUSSIA. An Appeal to the Nation. Seventh Edition. Cr. 8vo. 2d. net.

Laboulaye (Edouard). See Simplified French Texts.

Lamb (Charles and Mary), THE WORKS. Edited by E. V. LUCAS. Illustrated. In Seven Volumes. Demy 8vo. 7s. 6d. each.

See also Little Library and Lucas (E. V.)

Lambert (F. A. H.). See Little Guides.

Lambros (Professor S. P.). See Byzantine Texts.

Lane-Poole (Stanley). A HISTORY OF EGYPT IN THE MIDDLE AGES. With 101 Illustrations and a Map. Cr. 8vo. 6s.

Langbridge (F.), M.A. BALLADS OF THE BRAVE: Poems of Chivalry, Enterprise, Courage, and Constancy. Fourth Edition. Cr. 8vo. 2s. 6d.

Lankester (Sir E. Ray), K.C.B., F.R.S. SCIENCE FROM AN EASY CHAIR. With many Illustrations, of which 2 are in Colour. Cr. 8vo. 6s.

Law (William). See Library of Devotion and Standard Library.

Leach (Henry). THE SPIRIT OF THE LINKS. Cr. 8vo. 6s.

See also Braid (James).

Le Braz (Anatole). THE LAND OF PARDONS. Translated by FRANCES M. GOSTLING. With 12 Illustrations in Colour by T. C. GOTCH, and 40 other illustrations. Third Edition. Crown 8vo. 6s.

Lee (Margaret L.). See Browning (Robert).

Lees (Beatrice). See Six Ages of European History.

Lees (Frederick). A SUMMER IN TOURAINE. With 12 Illustrations in Colour by MAXWELL ARMFIELD, and 87 from Photographs. Also a Map. Second Edition. Demy 8vo. 10s. 6d. net.

Lehmann (R. C.), M.P. THE COMPLETE OARSMAN. With 59 Illustrations. Demy 8vo. 10s. 6d. net.

Lewes (V. B.), M.A. AIR AND WATER. Illustrated. Cr. 8vo. 2s. 6d.

Lewis (B. M. Gwyn). A CONCISE HANDBOOK OF GARDEN SHRUBS. With 20 Illustrations. Fcap. 8vo. 3s. 6d. net.

Lindsay (Lady Mabel). ANNI DOMINI: A GOSPEL STUDY. In Two Volumes. Super Royal 8vo. 10s. net.

Lindsay (W. M.), Fellow of Jesus College, Oxford. See Plautus.

Lisle (Fortunéede). See Little Books on Art.

Littlehales (H.). See Antiquary's Books.

Llewellyn (Owen) and Raven-Hill (L.). THE SOUTH-BOUND CAR. With 85 Illustrations. Crown 8vo. 6s.

Lock (Walter), D.D., Warden of Keble College. ST. PAUL, THE MASTER-BUILDER. Second Ed. Cr. 8vo. 3s. 6d.

THE BIBLE AND CHRISTIAN LIFE. Cr. 8vo. 6s.

See also Keble (J.) and Leaders of Religion.

Locker (F.). See Little library.

Locock (Katherine B.). See Browning (Rt.).

Lodge (Sir Oliver), F.R.S. THE SUBSTANCE OF FAITH, ALLIED WITH SCIENCE: A Catechism for Parents and Teachers. Ninth Ed. Cr. 8vo. 2s. net.

MAN AND THE UNIVERSE: A STUDY OF THE INFLUENCE OF THE ADVANCE IN SCIENTIFIC KNOWLEDGE UPON OUR UNDERSTANDING OF CHRISTIANITY. Seventh Edition. Demy 8vo. 7s. 6d. net.

THE SURVIVAL OF MAN: A STUDY OF UNRECOGNISED HUMAN FACULTY. Demy 8vo. 7s. 6d. net.

Lodge (Eleanor C.). See Six Ages of European History.

Lofthouse (W. F.), M.A. ETHICS AND ATONEMENT. With a Frontispiece. Demy 8vo. 5s. net.

Longfellow (H. W.). See Little Library.

Lorimer (George Horace). LETTERS FROM A SELF-MADE MERCHANT TO HIS SON. Seventeenth Edition. Cr. 8vo. 3s. 6d.

OLD GORGON GRAHAM. Second Edition. Cr. 8vo. 6s.

*Lorimer (Norma). BY THE WATERS OF EGYPT. With 16 Illustrations in Colour by BENTON FLETCHER, and 32 other Illustrations. Demy 8vo. 16s. net.

Lover (Samuel). See I.P.L.

Lucas (E. V.). THE LIFE OF CHARLES LAMB. With 28 Illustrations. Fourth and Revised Edition in One Volume. Demy 8vo. 7s. 6d. net.

A WANDERER IN HOLLAND. With 20 Illustrations in Colour by HERBERT MARSHALL, 34 Illustrations after old Dutch Masters, and a Map. Ninth Edition. Cr. 8vo. 6s.

A WANDERER IN LONDON. With 16 Illustrations in Colour by NELSON DAWSON, 36 other Illustrations and a Map. Seventh Edition. Cr. 8vo. 6s.

A WANDERER IN PARIS. With 16 Illustrations in Colour by WALTER DEXTER, and 32 from Photographs after Old Masters. Third Edition. Cr. 8vo. 6s.

THE OPEN ROAD: a Little Book for Wayfarers. Fifteenth Edition. Fcap. 8vo. 5s.; India Paper, 7s. 6d.

THE FRIENDLY TOWN: a Little Book for the Urbane. Fourth Edition. Fcap. 8vo. 5s.; India Paper, 7s. 6d.

FIRESIDE AND SUNSHINE. Fifth Edition. Fcap. 8vo. 5s.

CHARACTER AND COMEDY. Fifth Edition. Fcap. 8vo. 5s.

THE GENTLEST ART. A Choice of Letters by Entertaining Hands. Fifth Edition. Fcap. 8vo. 5s.

A SWAN AND HER FRIENDS. With 24 Illustrations. Demy 8vo. 12s. 6d. net.

HER INFINITE VARIETY: A FEMININE PORTRAIT GALLERY. Fourth Edition. Fcap. 8vo. 5s.

LISTENER'S LURE: AN OBLIQUE NARRATION. Sixth Edition. Fcap. 8vo. 5s.

GOOD COMPANY: A RALLY OF MEN. Fcap. 8vo. 5s.

ONE DAY AND ANOTHER: A VOLUME OF ESSAYS. Second Ed. Fcap. 8vo. 5s.

OVER BEMERTON'S: AN EASY-GOING CHRONICLE. Sixth Edition. Fcap. 8vo. 5s.

See also Lamb (Charles).

Lucian. See Classical Translations.

Lyde (L. W.), M.A. See Commercial Series.

Lydon (Noel S.). A PRELIMINARY GEOMETRY. With numerous Diagrams. Cr. 8vo. 1s.

See also Junior School Books.

Lyttelton (Hon. Mrs. A.). WOMEN AND THEIR WORK. Cr. 8vo. 2s. 6d.

M. (R.). THE THOUGHTS OF LUCIA HALIDAY. With some of her Letters. Edited by R. M. Fcap. 8vo. 2s. 6d. net.

Macaulay (Lord). CRITICAL AND HISTORICAL ESSAYS. Edited by F. C. MONTAGUE, M.A. Three Volumes. Cr. 8vo. 18s.

M'Allen (J. E. B.), M.A. See Commercial Series.

McCabe (Joseph) (formerly Very Rev. F. Antony, O.S.F.). THE DECAY OF THE CHURCH OF ROME. Second Edition. Demy 8vo. 7s. 6d. net.

MacCunn (Florence A.). MARY STUART. With 44 Illustrations, including a Frontispiece in Photogravure. New and Cheaper Edition. Large Cr. 8vo. 6s.

See also Leaders of Religion.

McDermott (E. R.). See Books on Business.

McDougall (William), M.A. (Oxon.), M.B. (Cantab.). AN INTRODUCTION TO SOCIAL PSYCHOLOGY. Second Ed. Cr. 8vo. 5s. net.

M'Dowall (A. S.). See Oxford Biographies.

Macfie (Ronald C.), M.A., M.B. See New Library of Medicine.

Mackay (A. M.), B.A. See Churchman's Library.

Mackenzie (W. Leslie), M.A., M.D., D.P.H., etc. THE HEALTH OF THE SCHOOL CHILD. Cr. 8vo. 2s. 6d.

Macklin (Herbert W.), M.A. See Antiquary's Books.

M'Neile (A. H.), B.D. See Westminster Commentaries.

'Mdlle Mori' (Author of). ST. CATHERINE OF SIENA AND HER TIMES. With 28 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Maeterlinck (Maurice). THE BLUE BIRD: A FAIRY PLAY IN FIVE ACTS. Translated by ALEXANDER TEIXEIRA DE MATTOS. Second Edition. Fcap. 8vo. Deckle Edges. 3s. 6d. net.

Magnus (Laurie), M.A. A PRIMER OF WORDSWORTH. Cr. 8vo. 2s. 6d.

Mahaffy (J. P.), Litt.D. A HISTORY OF THE EGYPT OF THE PTOLEMIES. With 79 Illustrations. Cr. 8vo. 6s.

Maitland (F. W.), M.A., LL.D. ROMAN CANON LAW IN THE CHURCH OF ENGLAND. Royal 8vo. 7s. 6d.

Major (H.), B.A., B.Sc. A HEALTH AND TEMPERANCE READER. Cr. 8vo. 1s.

Malden (H. E.), M.A. ENGLISH RECORDS. A Companion to the History of England. Cr. 8vo. 3s. 6d.

THE RIGHTS AND DUTIES OF A CITIZEN. Seventh Edition. Cr. 8vo. 1s. 6d.

See also School Histories.

Marchant (E. C.), M.A., Fellow of Peterhouse, Cambridge. A GREEK ANTHOLOGY. Second Edition. Cr. 8vo. 3s. 6d.

See also Cook (A. M.).

Marett (R. R.), M.A., Fellow and Tutor of Exeter College, Oxford. THE THRESHOLD OF RELIGION. Cr. 8vo. 3s. 6d. net.

Marks (Jeannette), M.A. ENGLISH PASTORAL DRAMA from the Restoration to the date of the publication of the 'Lyrical Ballads' (1660-1798). Cr. 8vo. 5s. net.

Marr (J. E.), F.R.S. Fellow of St John's College, Cambridge. THE SCIENTIFIC STUDY OF SCENERY. Third Edition. Revised. Illustrated. Cr. 8vo. 6s.

AGRICULTURAL GEOLOGY. Illustrated. Cr. 8vo. 6s.

Marriott (Charles). A SPANISH HOLIDAY. With 8 Illustrations by A. M. FOWERAKER, R.B.A., and 22 other Illustrations. Demy 8vo. 7s. 6d. net.

Marriott (J. A. R.), M.A. THE LIFE AND TIMES OF LORD FALKLAND. With 23 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

See also Six Ages of European History.

Marvell (Andrew). See Little Library.

Masefield (John). SEA LIFE IN NELSON'S TIME. With 16 Illustrations. Cr. 8vo. 3s. 6d. net.

ON THE SPANISH MAIN: or, SOME ENGLISH FORAYS IN THE ISTHMUS OF DARIEN. With 22 Illustrations and a Map. Demy 8vo. 10s. 6d. net.

A SAILOR'S GARLAND. Selected and Edited by. Second Ed. Cr. 8vo. 3s. 6d. net.

AN ENGLISH PROSE MISCELLANY. Selected and Edited by. Cr. 8vo. 6s.

Maskell(A.). See Connoisseur's Library.

Mason (A. J.), D.D. See Leaders of Religion.

Masterman (C. F. G.), M.A., M.P. TENNYSON AS A RELIGIOUS TEACHER. Cr. 8vo. 6s.

THE CONDITION OF ENGLAND. Third Edition. Cr. 8vo. 6s.

Masterman (J. H. B.), M.A. See Six Ages of European History.

Matheson (E. F.). COUNSELS OF LIFE. Fcap. 8vo. 2s. 6d. net.

Maude (J. H.), M.A. See Handbooks of English Church History.

May (Phil). THE PHIL MAY ALBUM. Second Edition. 4to. 1s. net.

Mayne (Ethel Colburn). ENCHANTERS OF MEN. With 24 Illustrations. Demy 8vo. 10s. 6d. net.

Meakin (Annette M. B.), Fellow of the Anthropological Institute. WOMAN IN TRANSITION. Cr. 8vo. 6s.

GALICIA: THE SWITZERLAND OF SPAIN. With 105 Illustrations and a Map. Demy 8vo. 12s. 6d. net.

*Medley (D. J.), M.A., Professor of History in the University of Glasgow. ORIGINAL ILLUSTRATIONS OF ENGLISH CONSTITUTIONAL HISTORY, COMPRISING A SELECTED NUMBER OF THE CHIEF CHARTERS AND STATUTES. Cr. 8vo. 7s. 6d. net.

Mellows (Emma S.). A SHORT STORY OF ENGLISH LITERATURE. Cr. 8vo. 3s. 6d.

Mérimée (P.). See Simplified French Texts.

Methuen (A. M. S.), M.A. THE TRAGEDY OF SOUTH AFRICA. Cr. 8vo. 2s. net. Also Cr. 8vo. 3d. net.

ENGLAND'S RUIN: DISCUSSED IN FOURTEEN LETTERS TO A PROTECTIONIST. Ninth Edition. Cr. 8vo. 3d. net.

Meynell (Everard). COROT AND HIS FRIENDS. With 28 Illustrations. Demy 8vo 10s. 6d. net.

Miles (Eustace), M.A. LIFE AFTER LIFE: OR, THE THEORY OF REINCARNATION. Cr. 8vo. 2s. 6d. net.

THE POWER OF CONCENTRATION: HOW TO ACQUIRE IT. Third Edition. Cr. 8vo. 3s. 6d. net.

Millais (J. G.). THE LIFE AND LETTERS OF SIR JOHN EVERETT MILLAIS, President of the Royal Academy. With many Illustrations, of which 2 are in Photogravure. New Edition. Demy 8vo. 7s. 6d. net.

See also Little Galleries.

Millin (G. F.). PICTORIAL GARDENING. With 21 Illustrations. Crown 8vo. 3s. 6d. net.

Millis (C. T.), M.I.M.E. See Textbooks of Technology.

Milne (J. G.), M.A. A HISTORY OF EGYPT UNDER ROMAN RULE. With 143 Illustrations. Cr. 8vo. 6s.

Milton (John). A DAY BOOK OF MILTON. Edited by R. F. TOWNDROW. Fcap. 8vo. 2s. 6d. net.

See also Little Library and Standard Library.

Minchin (H. C.), M.A. See Peel (R.).

Mitchell (P. Chalmers), M.A. OUTLINES OF BIOLOGY. With 74 Illustrations. Second Edition Edition. Cr. 8vo. 6s.

Mitton (G. E.). JANE AUSTEN AND HER TIMES. With 21 Illustrations. Second and Cheaper Edition. Large Cr. 8vo. 6s.

Moffat (Mary M.). QUEEN LOUISA OF PRUSSIA. With 20 Illustrations. Fourth Edition. Crown 8vo. 6s.

Moil (A.). See Books on Business.

Moir (D. M.). See Little Library.

Molinos (Dr. Michael de). See Library of Devotion.

Money (L. G. Chiozza), M.P. RICHES AND POVERTY. Eighth Edition. Demy 8vo. 5s. net. Also Cr. 8vo. 1s. net.

Montagu (Henry), Earl of Manchester. See Library of Devotion.

Montaigne. A DAY BOOK OF. Edited by C. F. POND. Fcap. 8vo. 2s. 6d. net.

Montgomery (H. B.). THE EMPIRE OF THE EAST. With a Frontispiece in Colour and 18 other Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Montmorency (J. E. G. de), B.A., LL.B. THOMAS À KEMPIS, HIS AGE AND BOOK. With 22 Illustrations. Second Edition. Demy 8vo. 7s. 6d. net.

Moore (H. E.). BACK TO THE LAND. Cr. 8vo. 2s. 6d.

Moore (T. Sturge). ART AND LIFE. With 88 Illustrations. Cr. 8vo. 5s. net.

Moorhouse (E. Hallam). NELSON'S LADY HAMILTON. With 51 Portraits. Second Edition. Demy 8vo. 7s. 6d. net.

Moran (Clarence G.). See Books on Business.

More (Sir Thomas). See Standard Library.

Morfill (W. R.), Oriel College, Oxford. A HISTORY OF RUSSIA FROM PETER THE GREAT TO ALEXANDER II. With 12 Maps and Plans. Cr. 8vo. 3s. 6d.

Morich (R. J.). See School Examination Series.

Morley (Margaret W.), Founded on. THE BEE PEOPLE. With 74 Illustrations. Sq. Crown 8vo. 2s. 6d.

LITTLE MITCHELL: THE STORY OF A MOUNTAIN SQUIRREL TOLD BY HIMSELF. With 26 Illustrations. Sq. Cr. 8vo. 2s. 6d.

Morris (J.). THE MAKERS OF JAPAN. With 24 Illustrations. Demy 8vo. 12s. 6d. net.

Morris (Joseph E.). See Little Guides.

Morton (A. Anderson). See Brodrick (M.).

Moule (H. C. G.), D.D., Lord Bishop of Durham. See Leaders of Religion.

Muir (M. M. Pattison), M.A. THE CHEMISTRY OF FIRE. Illustrated. Cr. 8vo. 2s. 6d.

Mundella (V. A.), M.A. See Dunn (J. T.).

Munro (R.), M.A., LL.D. See Antiquary's Books.

Musset (Alfred de). See Simplified French Texts.

Myers (A. Wallis). THE COMPLETE LAWN TENNIS PLAYER. With 90 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

Naval Officer (A). See I.P.L.

Newman (Ernest). See New Library of Music.

Newman (George), M.D., D.P.H., F.R.S.E. See New Library of Medicine.

Newman (J. H.) and others. See Library of Devotion.

Newsholme (Arthur), M.D., F.R.C.P. See New Library of Medicine.

Nichols (Bowyer). See Little Library.

Nicklin (T.), M.A. EXAMINATION PAPERS IN THUCYDIDES. Cr. 8vo. 2s.

Nimrod. See I.P.L.

Norgate (G. Le Grys). THE LIFE OF SIR WALTER SCOTT. With 53 Illustrations by JENNY WYLIE. Demy 8vo. 7s. 6d. net.

Norway (A. H.). NAPLES. PAST AND PRESENT. With 25 Coloured Illustrations by MAURICE GREIFFENHAGEN. Third Edition. Cr. 8vo. 6s.

Novalis. THE DISCIPLES AT SAÏS AND OTHER FRAGMENTS. Edited by Miss UNA BIRCH. Fcap. 8vo. 3s. 6d. net.

Officer (An). See I.P.L.

Oldfield (W. J.), M.A., Prebendary of Lincoln. A PRIMER OF RELIGION. BASED ON THE CATECHISM OF THE CHURCH OF ENGLAND. Crown 8vo. 2s. 6d.

Oldham (F. M.), B.A. See Textbooks of Science.

Oliphant (Mrs.). See Leaders of Religion.

Oliver, Thomas, M.D. See New Library of Medicine.

Oman (C. W. C.), M.A., Fellow of All Souls', Oxford. A HISTORY OF THE ART OF WAR IN THE MIDDLE AGES. Illustrated. Demy 8vo. 10s. 6d. net.

ENGLAND BEFORE THE CONQUEST. With Maps. Demy 8vo. 10s. 6d. net.

Oppé (A. P.). See Classics of Art.

Ottley (R. L.), D.D. See Handbooks of Theology and Leaders of Religion.

Overton (J. H.). See Leaders of Religion.

Owen (Douglas). See Books on Business.

Oxford (M. N.), of Guy's Hospital. A HANDBOOK OF NURSING. Fifth Edition. Cr. 8vo. 3s. 6d.

Pakes (W. C. C.). THE SCIENCE OF HYGIENE. Illustrated. Demy 8vo. 15s.

Parker (Eric). A BOOK OF THE ZOO; BY DAY AND NIGHT. With 24 Illustrations from Photographs by HENRY IRVING. Cr. 8vo. 6s.

Parker (Gilbert), M.P. A LOVER'S DIARY. Fcap. 8vo. 5s.

Parkes (A. K.). SMALL LESSONS ON GREAT TRUTHS. Fcap. 8vo. 1s. 6d.

Parkinson (John). PARADISI IN SOLE PARADISUS TERRESTRIS, OR A GARDEN OF ALL SORTS OF PLEASANT FLOWERS. Folio. £3, 3s. net.

Parsons (Mrs. C.). GARRICK AND HIS CIRCLE. With 36 Illustrations. Second Edition. Demy 8vo. 12s. 6d. net.

THE INCOMPARABLE SIDDONS. With 20 Illustrations. Demy 8vo. 12s. 6d. net.

Pascal. See Library of Devotion.

Paston (George). SOCIAL CARICATURE IN THE EIGHTEENTH CENTURY. With 214 Illustrations. Imperial Quarto. £2, 12s. 6d. net.

LADY MARY WORTLEY MONTAGU AND HER TIMES. With 24 Illustrations. Second Edition. Demy 8vo. 15s. net.

See also Little Books on Art and I.P.L.

Patmore (K. A.). THE COURT OF LOUIS XIII. With 16 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

Patterson (A. H.). NOTES OF AN EAST COAST NATURALIST. Illustrated in Colour by F. SOUTHGATE, R.B.A. Second Edition. Cr. 8vo. 6s.

NATURE IN EASTERN NORFOLK. With 12 Illustrations in Colour by FRANK SOUTHGATE, R.B.A. Second Edition. Cr. 8vo. 6s.

WILD LIFE ON A NORFOLK ESTUARY. With 40 Illustrations by the Author, and a Prefatory Note by Her Grace the DUCHESS OF BEDFORD. Demy 8vo. 10s. 6d. net.

MAN AND NATURE ON TIDAL WATERS. With Illustrations by the Author. Cr. 8vo. 6s.

Peacock (Netta). See Little Books on Art.

Peake (C. M. A.), F.R.H.S. A CONCISE HANDBOOK OF GARDEN ANNUAL AND BIENNIAL PLANTS. With 24 Illustrations. Fcap. 8vo. 3s. 6d. net.

Peel (Robert), and Minchin (H. C.), M.A. OXFORD. With 100 Illustrations in Colour. Cr. 8vo. 6s.

Peel (Sidney), late Fellow of Trinity College, Oxford, and Secretary to the Royal Commission on the Licensing Laws. PRACTICAL LICENSING REFORM. Second Edition. Cr. 8vo. 1s. 6d.

Pentin (Herbert), M.A. See Library of Devotion.

Petrie (W. M. Flinders), D.C.L., LL.D., Professor of Egyptology at University College. A HISTORY OF EGYPT. Fully Illustrated. In six volumes. Cr. 8vo. 6s. each.

VOL. I. FROM THE EARLIEST KINGS TO XVITH DYNASTY. Sixth Edition.

VOL. II. THE XVIITH AND XVIIITH DYNASTIES. Fourth Edition.

VOL. III. XIXTH TO XXXTH DYNASTIES.

VOL. IV. EGYPT UNDER THE PTOLEMAIC DYNASTY. J. P. MAHAFFY, Litt.D.

VOL. V. EGYPT UNDER ROMAN RULE. J. G. MILNE, M.A.

VOL. VI. EGYPT IN THE MIDDLE AGES. STANLEY LANE-POOLE, M.A.

RELIGION AND CONSCIENCE IN ANCIENT EGYPT. Lectures delivered at University College, London. Illustrated. Cr. 8vo. 2s. 6d.

SYRIA AND EGYPT, FROM THE TELL EL AMARNA LETTERS. Cr. 8vo. 2s. 6d.

EGYPTIAN TALES. Translated from the Papyri. First Series, IVth to XIIth Dynasty. Edited by W. M. FLINDERS PETRIE. Illustrated by TRISTRAM ELLIS. Second Edition. Cr. 8vo. 3s. 6d.

EGYPTIAN TALES. Translated from the Papyri. Second Series, XVIIIth to XIXth Dynasty. Illustrated by TRISTRAM ELLIS. Crown 8vo. 3s. 6d.

EGYPTIAN DECORATIVE ART. A Course of Lectures delivered at the Royal Institution. Illustrated. Cr. 8vo. 3s. 6d.

Phillips (W. A.). See Oxford Biographies.

Phillpotts (Eden). MY DEVON YEAR. With 38 Illustrations by J. LEY PETHYBRIDGE. Second and Cheaper Edition. Large Cr. 8vo. 6s.

UP-ALONG AND DOWN-ALONG. Illustrated by CLAUDE SHEPPERSON. Cr. 4to. 5s. net.

Phythian (J. Ernest), TREES IN NATURE, MYTH, AND ART. With 24 Illustrations. Crown 8vo. 6s.

Plarr (Victor G.), M.A. See School Histories.

Plato. See Standard Library.

Plautus. THE CAPTIVI. Edited, with an Introduction, Textual Notes, and a Commentary, by W. M. LINDSAY, Fellow of Jesus College, Oxford. Demy 8vo. 10s. 6d. net.

Plowden-Wardlaw (J. T.), B.A. See School Examination Series.

Podmore (Frank). MODERN SPIRITUALISM. Two Volumes. Demy 8vo. 21s. net.

MESMERISM AND CHRISTIAN SCIENCE: A Short History of Mental Healing. Demy 8vo. 10s. 6d. net.

Pollard (Alice). See Little Books on Art.

Pollard (Alfred W.). THE SHAKESPEARE FOLIOS AND QUARTOS. With numerous Facsimiles. Folio. One Guinea net.

Pollard (Eliza F.). See Little Books on Art.

Pollock (David), M.I.N.A. See Books on Business.

Potter (M. C.), M.A., F.L.S. AN ELEMENTARY TEXT-BOOK OF AGRICULTURAL BOTANY. Illustrated. Third Edition. Cr. 8vo. 4s. 6d.

Powell (A. E.). LIEUTENANT ROYAL ENGINEERS. Crown 8vo. 3s. 6d. net.

Power (J. O'Connor). THE MAKING OF AN ORATOR. Cr. 8vo. 6s.

Price (Eleanor C.). A PRINCESS OF THE OLD WORLD. With 21 Illustrations. Demy 8vo. 12s. 6d. net.

Price (L. L.), M.A., Fellow of Oriel College, Oxon. A HISTORY OF ENGLISH POLITICAL ECONOMY FROM ADAM SMITH TO ARNOLD TOYNBEE. Fifth Edition. Cr. 8vo. 2s. 6d.

Protheroe (Ernest). THE DOMINION OF MAN. GEOGRAPHY IN ITS HUMAN ASPECT. With 32 full-page Illustrations. Second Edition. Cr. 8vo. 2s.

Psellus. See Byzantine Texts.

Pullen-Burry (B.). IN A GERMAN COLONY; or, FOUR WEEKS IN NEW BRITAIN. With 8 Illustrations and 2 Maps. Cr. 8vo. 5s. net.

Pycraft (W. P.). BIRD LIFE. With 2 Illustrations in Colour by G. E. LODGE, and many from Drawings and Photographs. Demy 8vo. 10s. 6d. net.

'Q' (A. T. Quiller Couch). THE GOLDEN POMP. A PROCESSION OF ENGLISH LYRICS FROM SURREY TO SHIRLEY. Second and Cheaper Edition. Cr. 8vo. 2s. 6d. net.

G. R. and E. S. MR. WOODHOUSE'S CORRESPONDENCE. Cr. 8vo. 6s.

Also published in a Colonial Edition.

Rackham (R. B.), M.A. See Westminster Commentaries.

Ragg (Laura M.). THE WOMEN ARTISTS OF BOLOGNA. With 20 Illustrations. Demy 8vo. 7s. 6d. net.

Ragg (Lonsdale). B.D., Oxon. DANTE AND HIS ITALY. With 32 Illustrations. Demy 8vo. 12s. 6d. net.

Rahtz (F. J.), M.A., B.Sc. HIGHER ENGLISH. Fourth Edition. Cr. 8vo. 3s. 6d.

JUNIOR ENGLISH. Fourth Edition. Cr. 8vo. 1s. 6d.

Randolph (B. W.), D.D. See Library of Devotion.

Rannie (D. W.), M.A. A STUDENT'S HISTORY OF SCOTLAND. Cr. 8vo. 3s. 6d.

WORDSWORTH AND HIS CIRCLE. With 20 Illustrations. Demy 8vo. 12s. 6d. net.

Rashdall (Hastings), M.A., Fellow and Tutor of New College, Oxford. DOCTRINE AND DEVELOPMENT. Cr. 8vo. 6s.

Raven (J. J.), D.D., F.S.A. See Antiquary's Books.

Raven-Hill (L.). See Llewellyn (Owen).

Rawlings (Gertrude Burford). COINS AND HOW TO KNOW THEM. With 206 Illustrations. Second Edition. Cr. 8vo. 6s.

Rawstorne (Lawrence, Esq.). See I.P.L.

Raymond (Walter). See School Histories.

Rea (Lilian). THE LIFE AND TIMES OF MARIE MADELEINE COUNTESS OF LA FAYETTE. With 20 Illustrations. Demy 8vo. 10s. 6d. net.

Read (C. Stanford), M.B. (Lond.), M.R.C.S., L.R.C.P. FADS AND FEEDING. Cr. 8vo. 2s. 6d.

Real Paddy (A). See I.P.L.

Reason (W.), M.A. UNIVERSITY AND SOCIAL SETTLEMENTS. Edited by Cr. 8vo. 2s. 6d.

Redpath (H. A.), M.A., D.Litt. See Westminster Commentaries.

Rees (J. D.), C.I.E., M.P. THE REAL INDIA. Second Edition. Demy 8vo. 10s. 6d. net.

Reich (Emil), Doctor Juris. WOMAN THROUGH THE AGES. With 36 Illustrations. Two Volumes. Demy 8vo. 21s. net.

Reynolds (Sir Joshua). See Little Galleries.

Rhodes (W. E.). See School Histories.

Ricketts (Charles). See Classics of Art.

Richardson (Charles). THE COMPLETE FOXHUNTER. With 46 Illustrations, of which 4 are in Colour. Second Edition. Demy 8vo. 12s. 6d. net.

Richmond (Wilfrid), Chaplain of Lincoln's Inn. THE CREED IN THE EPISTLES. Cr. 8vo. 2s. 6d. net.

Riehl (W. H.). See Simplified German Texts.

Roberts (M. E.). See Channer (C. C.).

Robertson (A.), D.D., Lord Bishop of Exeter. REGNUM DEI. (The Bampton Lectures of 1901). A New and Cheaper Edition. Demy 8vo. 7s. 6d. net.

Robertson (C. Grant). M.A., Fellow of All Souls' College, Oxford. SELECT STATUTES, CASES, AND CONSTITUTIONAL DOCUMENTS, 1660-1832. Demy 8vo. 10s. 6d. net.

Robertson (C. Grant) and Bartholomew (J. G.), F.R.S.E., F.R.G.S. A HISTORICAL AND MODERN ATLAS OF THE BRITISH EMPIRE. Demy Quarto. 4s. 6d. net.

Robertson (Sir G. S.), K.C.S.I. CHITRAL: THE STORY OF A MINOR SIEGE. With 8 Illustrations. Third Edition. Demy 8vo. 10s. 6d. net.

Robinson (Cecilia). THE MINISTRY OF DEACONESSES. With an Introduction by the late Archbishop of Canterbury. Cr. 8vo. 3s. 6d.

Robinson (F. S.). See Connoisseur's Library.

Rochefoucauld (La). See Little Library.

Rodwell (G.), B.A. NEW TESTAMENT GREEK. A Course for Beginners. With a Preface by WALTER LOCK, D.D., Warden of Keble College. Fcap. 8vo. 3s. 6d.

Roe (Fred). OLD OAK FURNITURE. With many Illustrations by the Author, including a frontispiece in colour. Second Edition. Demy 8vo. 10s. 6d. net.

Rogers (A. G. L.), M.A. See Books on Business.

Roland. See Simplified French Texts.

Romney (George). See Little Galleries.

Roscoe (E. S.). See Little Guides.

Rose (Edward). THE ROSE READER. Illustrated. Cr. 8vo. 2s. 6d. Also in 4 Parts. Parts I. and II. 6d. each; Part III. 8d.; Part IV. 10d.

Rose (G. H.). See Hey (H.) and Baring-Gould (S.).

Rowntree (Joshua). THE IMPERIAL DRUG TRADE. A RE-STATEMENT OF THE OPIUM QUESTION. Third Edition Revised. Cr. 8vo. 2s. net.

Royde-Smith (N. G.). THE PILLOW BOOK: A GARNER OF MANY MOODS. Collected by. Second Edition. Cr. 8vo. 4s. 6d. net.

POETS OF OUR DAY. Selected, with an Introduction, by. Fcap. 8vo. 5s.

Rubie (A. E.), D.D. See Junior School Books.

Rumbold (The Right Hon. Sir Horace). Bart., G.C.B., G.C.M.G. THE AUSTRIAN COURT IN THE NINETEENTH CENTURY. With 16 Illustrations. Second Ed. Demy 8vo. 18s. net.

Russell (Archibald G. B.). See Blake (William.)

Russell (W. Clark). THE LIFE OF ADMIRAL LORD COLLINGWOOD. With 12 Illustrations by F. BRANGWYN. Fourth Edition. Cr. 8vo. 6s.

Ryley (M. Beresford). QUEENS OF THE RENAISSANCE. With 24 Illustrations. Demy 8vo. 10s. 6d. net.

Sainsbury (Harrington), M.D., F.R.C.P. PRINCIPIA THERAPEUTICA. Demy 8vo. 7s. 6d. net.

See also New Library of Medicine.

St. Anselm. See Library of Devotion.

St. Augustine. See Library of Devotion.

St. Bernard. See Library of Devotion.

St. Cyres (Viscount). See Oxford Biographies.

St. Francis of Assisi. THE LITTLE FLOWERS OF THE GLORIOUS MESSER, AND OF HIS FRIARS. Done into English, with Notes by WILLIAM HEYWOOD. With 40 Illustrations from Italian Painters. Demy 8vo. 5s. net.

See also Library of Devotion and Standard Library.

St. Francis de Sales. See Library of Devotion.

St. James. See Churchman's Bible and Westminster Commentaries.

St. Luke. See Junior School Books.

St. Mark. See Junior School Books and Churchman's Bible.

St. Matthew. See Junior School Books.

St. Paul. SECOND AND THIRD EPISTLES OF PAUL THE APOSTLE TO THE CORINTHIANS. Edited by JAMES HOUGHTON KENNEDY, D.D., Assistant Lecturer in Divinity in the University of Dublin. With Introduction, Dissertations, and Notes by J. SCHMITT. Cr. 8vo. 6s.

See also Churchman's Bible and Westminster Commentaries.

'Saki' (H. Munro). REGINALD. Second Edition. Fcap. 8vo. 2s. 6d. net.

Salmon (A. L.). See Little Guides.

Sanders (Lloyd). THE HOLLAND HOUSE CIRCLE. With 24 Illustrations. Second Edition. Demy 8vo. 12s. 6d. net.

Sathas (C.). See Byzantine Texts.

Schmitt (John). See Byzantine Texts.

Schofield (A. T.), M.D., Hon. Phys. Freidenham Hospital. See New Library of Medicine.

Scudamore (Cyril). See Little Guides.

Scupoli (Dom. L.). See Library of Devotion.

Ségur (Madame de). See Simplified French Texts.

Sélincourt (E. de). See Keats (John).

Sélincourt (Hugh de). GREAT RALEGH. With 16 Illustrations. Demy 8vo. 10s. 6d. net.

Sells (V. P.), M.A. THE MECHANICS OF DAILY LIFE. Illustrated. Cr. 8vo. 2s. 6d.

Selous (Edmund). TOMMY SMITH'S ANIMALS. Illustrated by G. W. ORD. Eleventh Edition. Fcap. 8vo. 2s. 6d. School Edition, 1s. 6d.

TOMMY SMITH'S OTHER ANIMALS. Illustrated by AUGUSTA GUEST. Fifth Edition. Fcap. 8vo. 2s 6d.

School Edition, 1s. 6d.

Senter (George), B.Sc. (Lond.), Ph.D. See Textbooks of Science.

Shakespeare (William).

THE FOUR FOLIOS, 1623; 1632; 1664; 1685. Each £4, 4s. net, or a complete set, £12, 12s. net.

Folios 2, 3 and 4 are ready.

THE POEMS OF WILLIAM SHAKESPEARE. With an Introduction and Notes by GEORGE WYNDHAM. Demy 8vo. Buckram, gilt top, 10s. 6d.

See also Arden Shakespeare, Standard Library and Little Quarto Shakespeare.

Sharp (A.). VICTORIAN POETS. Cr. 8vo. 2s. 6d.

Sharp (Cecil). See Baring-Gould (S.).

Sharp (Elizabeth). See Little Books on Art.

Shedlock (J. S.). THE PIANOFORTE SONATA. Cr. 8vo. 5s.

Shelley (Percy B.). See Standard Library.

Sheppard (H. F.), M.A. See Baring-Gould (S.).

Sherwell (Arthur), M.A. LIFE IN WEST LONDON. Third Edition. Cr. 8vo. 2s. 6d.

Shipley (Mary E.). AN ENGLISH CHURCH HISTORY FOR CHILDREN. With a Preface by the Bishop of Gibraltar. With Maps and Illustrations. Cr. 8vo. Each part 2s. 6d. net.

PART I.—To the Norman Conquest.

PART II.—To the Reformation.

Sichel (Walter). See Oxford Biographies.

Sidgwick (Mrs. Alfred). HOME LIFE IN GERMANY. With 16 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

Sime (John). See Little Books on Art.

Simonson (G. A.). FRANCESCO GUARDI. With 41 Plates. Imperial 4to. £2, 2s. net.

Sketchley (R. E. D.). See Little Books on Art.

Skipton (H. P. K.). See Little Books on Art.

Sladen (Douglas). SICILY: The New Winter Resort. With over 200 Illustrations. Second Edition. Cr. 8vo. 5s. net.

Smallwood (M. G.). See Little Books on Art.

Smedley (F. E.). See I.P.L.

Smith (Adam). THE WEALTH OF NATIONS. Edited with an Introduction and numerous Notes by EDWIN CANNAN, M.A. Two volumes. Demy 8vo. 21s. net.

Smith (H. Bompas), M.A. A NEW JUNIOR ARITHMETIC. Crown 8vo. Without Answers, 2s. With Answers, 2s. 6d.

Smith (H. Clifford). See Connoisseur's Library.

Smith (Horace and James). See Little Library.

Smith (R. Mudie). THOUGHTS FOR THE DAY. Edited by. Fcap. 8vo. 3s. 6d. net.

Smith (Nowell C.). See Wordsworth (W.).

Smith (John Thomas). A BOOK FOR A RAINY DAY: Or, Recollections of the Events of the Years 1766-1833. Edited by WILFRED WHITTEN. Illustrated. Wide Demy 8vo. 12s. 6d. net.

Snell (F. J.). A BOOK OF EXMOOR. Illustrated. Cr. 8vo. 6s.

Snowden (C. E.). A HANDY DIGEST OF BRITISH HISTORY. Demy 8vo. 4s. 6d.

Sophocles. See Classical Translations.

Sornet (L. A.), and Acatos (M. J.). See Junior School Books.

Southey (R.). ENGLISH SEAMEN. Edited by DAVID HANNAY.

Vol. I. (Howard, Clifford, Hawkins, Drake, Cavendish). Second Edition. Cr. 8vo. 6s.

Vol. II. (Richard Hawkins, Grenville, Essex, and Raleigh). Cr. 8vo. 6s.

See also Standard Library.

Souvestre (E.). See Simplified French Texts.

Spence (C. H.), M.A. See School Examination Series.

Spicer (A. Dykes), M.A. THE PAPER TRADE. A Descriptive and Historical Survey. With Diagrams and Plans. Demy 8vo. 12s. 6d. net.

Spooner (W. A.), M.A. See Leaders of Religion.

Spragge (W. Horton), M.A. See Junior School Books.

Staley (Edgcumbe). THE GUILDS OF FLORENCE. Illustrated. Second Edition. Royal 8vo. 16s. net.

Stanbridge (J. W.), B.D. See Library of Devotion.

'Stancliffe.' GOLF DO'S AND DONT'S. Second Edition. Fcap. 8vo. 1s.

Stead (D. W.). See Gallaher (D.).

Stedman (A. M. M.), M.A.

INITIA LATINA: Easy Lessons on Elementary Accidence. Eleventh Edition. Fcap. 8vo. 1s.

FIRST LATIN LESSONS. Eleventh Edition. Cr. 8vo. 2s.

FIRST LATIN READER. With Notes adapted to the Shorter Latin Primer and Vocabulary. Seventh Edition. 18mo. 1s. 6d.

EASY SELECTIONS FROM CÆSAR. The Helvetian War. Fourth Edition. 18mo. 1s.

EASY SELECTIONS FROM LIVY. The Kings of Rome. Second Edition. 18mo. 1s. 6d.

EASY LATIN PASSAGES FOR UNSEEN TRANSLATION. Thirteenth Ed. Fcap. 8vo. 1s. 6d.

EXEMPLA LATINA. First Exercises in Latin Accidence. With Vocabulary. Fourth Edition. Cr. 8vo. 1s.

EASY LATIN EXERCISES ON THE SYNTAX OF THE SHORTER AND REVISED LATIN PRIMER. With Vocabulary. Thirteenth Ed. Cr. 8vo. 1s. 6d. Key, 3s. net.

THE LATIN COMPOUND SENTENCE: Rules and Exercises. Second Edition. Cr. 8vo. 1s. 6d. With Vocabulary. 2s.

NOTANDA QUAEDAM: Miscellaneous Latin Exercises on Common Rules and Idioms. Fifth Edition. Fcap. 8vo. 1s. 6d. With Vocabulary. 2s. KEY, 2s. net.

LATIN VOCABULARIES FOR REPETITION: Arranged according to Subjects. Sixteenth Edition. Fcap. 8vo. 1s. 6d.

A VOCABULARY OF LATIN IDIOMS. 18mo. Fourth Edition. 1s.

STEPS TO GREEK. Fourth Edition. 18mo. 1s.

A SHORTER GREEK PRIMER. Third Edition. Cr. 8vo. 1s. 6d.

EASY GREEK PASSAGES FOR UNSEEN TRANSLATION. Fourth Edition, revised. Fcap. 8vo. 1s. 6d.

GREEK VOCABULARIES FOR REPETITION. Arranged according to Subjects. Fourth Edition. Fcap. 8vo. 1s. 6d.

GREEK TESTAMENT SELECTIONS. For the use of Schools. With Introduction, Notes, and Vocabulary. Fourth Edition. Fcap. 8vo. 2s. 6d.

STEPS TO FRENCH. Ninth Edition. 18mo. 8d.

FIRST FRENCH LESSONS. Ninth Edition. Cr. 8vo. 1s.

EASY FRENCH PASSAGES FOR UNSEEN TRANSLATION. Sixth Edition. Fcap. 8vo. 1s. 6d.

EASY FRENCH EXERCISES ON ELEMENTARY SYNTAX. With Vocabulary. Fourth Edition. Cr. 8vo. 2s. 6d.

KEY. 3s. net.

FRENCH VOCABULARIES FOR REPETITION: Arranged according to Subjects. Fourteenth Edition. Fcap. 8vo. 1s.

See also School Examination Series.

Steel (R. Elliott), M.A., F.C.S. THE WORLD OF SCIENCE. With 147 Illustrations. Second Edition. Cr. 8vo. 2s. 6d.

See also School Examination Series.

Stephenson (C.), of the Technical College, Bradford, and Suddards (F.), of the Yorkshire College, Leeds. A TEXTBOOK DEALING WITH ORNAMENTAL DESIGN FOR WOVEN FABRICS. With 66 full-page Plates and numerous Diagrams in the Text. Third Edition. Demy 8vo. 7s. 6d.

Sterne (Laurence). See Little Library.

Steuart (Katherine). BY ALLAN WATER. Second Edition. Cr. 8vo. 6s.

RICHARD KENNOWAY AND HIS FRIENDS. A Sequel to 'By Allan Water.' Demy 8vo. 7s. 6d. net.

Stevenson (R. L.). THE LETTERS OF ROBERT LOUIS STEVENSON TO HIS FAMILY AND FRIENDS. Selected and Edited by SIDNEY COLVIN. Eighth Edition. 2 vols. Cr. 8vo. 12s.

VAILIMA LETTERS. With an Etched Portrait by WILLIAM STRANG. Seventh Edition. Cr. 8vo. Buckram. 6s.

THE LIFE OF R. L. STEVENSON. See Balfour (G.).

Stevenson (M. I.). FROM SARANAC TO THE MARQUESAS. Being Letters written by Mrs. M. I. STEVENSON during 1887-88. Cr. 8vo. 6s. net.

LETTERS FROM SAMOA, 1891-95. Edited and arranged by M. C. BALFOUR. With many Illustrations. Second Edition. Cr. 8vo. 6s. net.

Stoddart (Anna M.). See Oxford Biographies.

Stokes (F. G.), B.A. HOURS WITH RABELAIS. From the translation of SIR T. URQUHART and P. A. MOTTEUX. With a Portrait in Photogravure. Cr. 8vo. 3s. 6d. net.

Stone (S. J.). POEMS AND HYMNS. With a Memoir by F. G. ELLERTON, M.A. With Portrait. Cr. 8vo. 6s.

Storr (Vernon F.), M.A., Canon of Winchester. DEVELOPMENT AND DIVINE PURPOSE. Cr. 8vo. 5s. net.

Story (Alfred T.). AMERICAN SHRINES IN ENGLAND. With 4 Illustrations in Colour, and 19 other Illustrations. Crown 8vo. 6s.

See also Little Guides.

Straker (F.). See Books on Business.

Streane (A. W.), D.D. See Churchman's Bible.

Streatfeild (R. A.). MODERN MUSIC AND MUSICIANS. With 24 Illustrations. Second Ed. Demy 8vo. 7s. 6d. net.

See also New Library of Music.

Stroud (Henry), D.Sc., M.A. ELEMENTARY PRACTICAL PHYSICS. With 115 Diagrams. Second Edit., revised. Cr. 8vo. 4s. 6d.

Sturch (F.), Staff Instructor to the Surrey County Council. MANUAL TRAINING DRAWING (WOODWORK). With Solutions to Examination Questions, Orthographic, Isometric and Oblique Projection. With 50 Plates and 140 Figures. Foolscap. 5s. net.

Suddards (F.). See Stephenson (C.).

Surtees (R. S.). See I.P.L.

Sutherland (William). OLD AGE PENSIONS IN THEORY AND PRACTICE, WITH SOME FOREIGN EXAMPLES. Cr. 8vo. 3s. 6d. net.

Swanton (E. W.), Member of the British Mycological Society. FUNGI AND HOW TO KNOW THEM. With 16 Coloured Plates by M. K. SPITTAL, and 32 Monotone Plates. Cr. 8vo. 5s. net.

Symes (J. E.), M.A. THE FRENCH REVOLUTION. Second Edition. Cr. 8vo. 2s. 6d.

Sympson (E. Mansel), M.A., M.D. See Ancient Cities.

Tabor (Margaret E.). THE SAINTS IN ART. With 20 Illustrations. Fcap. 8vo. 3s. 6d. net.

Tacitus. AGRICOLA. Edited by R. F. DAVIS, M.A. Cr. 8vo. 2s.

GERMANIA. By the same Editor. Cr. 8vo. 2s.

See also Classical Translations.

Tallack (W.). HOWARD LETTERS AND MEMORIES. Demy 8vo. 10s. 6d. net.

Tatham (Frederick). See Blake (William).

Tauler (J.). See Library of Devotion.

Taylor (A. E.). THE ELEMENTS OF METAPHYSICS. Second Edition. Demy 8vo. 10s. 6d. net.

Taylor (F. G.), M.A. See Commercial Series.

Taylor (I. A.). See Oxford Biographies.

Taylor (John W.). THE COMING OF THE SAINTS. With 26 Illustrations. Demy 8vo. 7s. 6d. net.

Taylor (T. M.), M.A., Fellow of Gonville and Caius College, Cambridge. A CONSTITUTIONAL AND POLITICAL HISTORY OF ROME. To the Reign of Domitian. Cr. 8vo. 7s. 6d.

Teasdale-Buckell (G. T.). THE COMPLETE SHOT. With 53 Illustrations. Third Edition. Demy 8vo. 12s. 6d. net.

Tennyson (Alfred, Lord). EARLY POEMS. Edited, with Notes and an Introduction, by J. CHURTON COLLINS, M.A. Cr. 8vo. 6s.

IN MEMORIAM, MAUD, AND THE PRINCESS. Edited by J. CHURTON COLLINS, M.A. Cr. 8vo. 6s.

See also Little Library.

Terry (C. S.). See Oxford Biographies.

Terry (F. J.), B.A. ELEMENTARY LATIN. Cr. 8vo. 2s.

TEACHER'S HANDBOOK TO ELEMENTARY LATIN. Containing the necessary supplementary matter to Pupil's edition. Cr. 8vo. 3s. 6d. net.

Thackeray (W. M.). See Little Library.

Theobald (F. V.), M.A. INSECT LIFE. Illustrated. Second Edition Revised. Cr. 8vo. 2s. 6d.

Thibaudeau (A. C.). BONAPARTE AND THE CONSULATE. Translated and Edited by G. K. FORTESQUE, LL.D. With 12 Illustrations. Demy 8vo. 10s. 6d. net.

Thompson (A. H.). See Little Guides.

Thompson (Francis). SELECTED POEMS OF FRANCIS THOMPSON. With a Biographical Note by WILFRID MEYNELL. With a Portrait in Photogravure. Second Ed. Fcap. 8vo. 5s. net.

Thompson (A. P.). See Textbooks of Technology.

Thompson (J. M.), Fellow and Dean of Divinity of Magdalen College, Oxford. JESUS ACCORDING TO ST. MARK. Cr. 8vo. 5s. net.

Tileston (Mary W.). DAILY STRENGTH FOR DAILY NEEDS. Sixteenth Edition. Medium 16mo. 2s. 6d. net. Also an edition in superior binding, 6s.

Tompkins (H. W.), F.R.H.S. See Little Books on Art and Little Guides.

Toynbee (Paget), M.A., D.Litt. IN THE FOOTPRINTS OF DANTE. A Treasury of Verse and Prose from the works of Dante. Small Cr. 8vo. 4s. 6d. net.

DANTE IN ENGLISH LITERATURE: FROM CHAUCER TO CARY. Two vols. Demy 8vo. 21s. net.

See also Oxford Biographies and Dante.

Tozer (Basil). THE HORSE IN HISTORY. With 25 Illustrations. Cr. 8vo. 6s.

Tremayne (Eleanor E.). See Romantic History.

Trench (Herbert). DEIRDRE WEDDED, AND OTHER POEMS. Second and Revised Edition. Large Post 8vo. 6s.

NEW POEMS. Second Edition. Large Post 8vo. 6s.

APOLLO AND THE SEAMAN. Large Post 8vo. Paper, 1s. 6d. net; cloth, 2s. 6d. net.

Trevelyan (G. M.), Fellow of Trinity College, Cambridge. ENGLAND UNDER THE STUARTS. With Maps and Plans. Third Edition. Demy 8vo. 10s. 6d. net.

ENGLISH LIFE THREE HUNDRED YEARS AGO: Being the first two chapters of England under the Stuarts. Edited by J. TURRAL, B.A. Cr. 8vo. 1s.

Triggs (H. Inigo), A.R.I.B.A. TOWN PLANNING: PAST, PRESENT, AND POSSIBLE. With 173 Illustrations. Wide Royal 8vo. 15s. net.

Troutbeck (G. E.). See Little Guides.

Tyler (E. A.), B.A., F.C.S. See Junior School Books.

Tyrrell-Gill (Frances). See Little Books on Art.

Unwin (George). See Antiquary's Books.

Vardon (Harry). THE COMPLETE GOLFER. With 63 Illustrations. Tenth Edition. Demy 8vo. 10s. 6d. net.

Vaughan (Henry). See Little Library.

Vaughan (Herbert M.), B.A. (Oxon.). THE LAST OF THE ROYAL STUARTS, HENRY STUART, CARDINAL, DUKE OF YORK. With 20 Illustrations. Second Edition. Demy 8vo. 10s. 6d. net.

THE MEDICI POPES (LEO X. AND CLEMENT VII.) With 20 Illustrations. Demy 8vo. 15s. net.

THE NAPLES RIVIERA. With 25 Illustrations in Colour by MAURICE GREIFFENHAGEN. Second Edition. Cr. 8vo. 6s.

Vernon (Hon. W. Warren), M.A. READINGS ON THE INFERNO OF DANTE. With an Introduction by the Rev. Dr. MOORE. In Two Volumes. Second Edition. Cr. 8vo. 15s. net.

READINGS ON THE PURGATORIO OF DANTE. With an Introduction by the late DEAN CHURCH. In Two Volumes. Third Edition. Cr. 8vo. 15s. net.

READINGS ON THE PARADISO OF DANTE. With an Introduction by the BISHOP OF RIPON. In Two Volumes. Second Edition. Cr. 8vo. 15s. net.

Vincent (J. E.). THROUGH EAST ANGLIA IN A MOTOR CAR. With 16 Illustrations in Colour by FRANK SOUTHGATE, R.B.A., and a Map. Cr. 8vo. 6s.

Voegelin (A.), M.A. See Junior Examination Series.

Waddell (Col. L. A.), LL.D., C.B. LHASA AND ITS MYSTERIES. With a Record of the Expedition of 1903-1904. With 155 Illustrations and Maps. Third and Cheaper Edition. Medium 8vo. 7s. 6d. net.

Wade (G. W.), D.D. OLD TESTAMENT HISTORY. With Maps. Sixth Edition. Cr. 8vo. 6s.

Wade (G. W.), D.D., and Wade (J. H.), M.A. See Little Guides.

Wagner (Richard). RICHARD WAGNER'S MUSIC DRAMAS: Interpretations, embodying Wagner's own explanations. By ALICE LEIGHTON CLEATHER and BASIL CRUMP. In Three Volumes. Fcap. 8vo. 2s. 6d. each.

VOL. I.—THE RING OF THE NIBELUNG. Third Edition.

VOL. II.—PARSIFAL, LOHENGRIN, AND THE HOLY GRAIL.

VOL. III.—TRISTAN AND ISOLDE.

Waineman (Paul). A SUMMER TOUR IN FINLAND. With 16 Illustrations in Colour by ALEXANDER FEDERLEY, 16 other Illustrations and a Map. Demy 8vo. 10s. 6d. net.

Walkley (A. B.). DRAMA AND LIFE. Cr. 8vo. 6s.

Wall (J. C.). See Antiquary's Books.

Wallace-Hadrill (F.), Second Master at Herne Bay College. REVISION NOTES ON ENGLISH HISTORY. Cr. 8vo. 1s.

Walters (H. B.). See Little Books on Art and Classics of Art.

Walton (F. W.), M.A. See School Histories.

Walton (Izaak) and Cotton (Charles). See I.P.L. and Little Library.

Waterhouse (Elizabeth). WITH THE SIMPLE-HEARTED: Little Homilies to Women in Country Places. Second Edition. Small Pott 8vo. 2s. net.

COMPANIONS OF THE WAY. Being Selections for Morning and Evening Reading. Chosen and arranged by ELIZABETH WATERHOUSE. Large Cr. 8vo. 5s. net.

THOUGHTS OF A TERTIARY. Pott 8vo. 1s. net.

See also Little Library.

Watt (Francis). See Henderson (T. F.).

Weatherhead (T. C.), M.A. EXAMINATION PAPERS IN HORACE. Cr. 8vo. 2s.

See also Junior Examination Series.

Webb (George W.), B.A. A SYSTEMATIC GEOGRAPHY OF THE BRITISH ISLES. With Maps and Diagrams. Cr. 8vo. 1s.

Webber (F. C.). See Textbooks of Technology.

*Weigall (Arthur E. P.). A GUIDE TO THE ANTIQUITIES OF UPPER EGYPT: From Abydos to the Sudan Frontier. With 67 Maps, and Plans. Cr. 8vo. 7s. 6d. net.

Weir (Archibald), M.A. AN INTRODUCTION TO THE HISTORY OF MODERN EUROPE. Cr. 8vo. 6s.

Welch (Catharine). THE LITTLE DAUPHIN. With 16 Illustrations. Cr. 8vo. 6s.

Wells (Sidney H.) See Textbooks of Science.

Wells (J.), M.A., Fellow and Tutor of Wadham College. OXFORD AND OXFORD LIFE. Third Edition. Cr. 8vo. 3s. 6d.

A SHORT HISTORY OF ROME. Ninth Edition. With 3 Maps. Cr. 8vo. 3s. 6d.

See also Little Guides.

Wesley (John). See Library of Devotion.

Westell (W. Percival). THE YOUNG NATURALIST. A GUIDE TO BRITISH ANIMAL LIFE. With 8 Coloured Plates by C. F. NEWALL, and 240 specially selected Photographs from the collections of well-known amateur photographers. Cr. 8vo. 6s.

Westell (W. Percival), F.L.S., M.B.O.U., and Cooper (C. S.), F.R.H.S. THE YOUNG BOTANIST. With 8 Coloured and 63 Black and White Plates drawn from Nature, by C. F. NEWALL. Cr. 8vo. 3s. 6d. net.

Whibley (C.). See Henley (W. E.).

Whibley (L.), M.A., Fellow of Pembroke College, Cambridge. GREEK OLIGARCHIES: THEIR ORGANISATION AND CHARACTER. Cr. 8vo. 6s.

White (Eustace E.). THE COMPLETE HOCKEY PLAYER. With 32 Illustrations. Second Edition. Demy 8vo. 5s. net.

White (George F.), Lieut.-Col. A CENTURY OF SPAIN AND PORTUGAL. Demy 8vo. 12s. 6d. net.

White (Gilbert). See Standard Library.

Whitfield (E. E.), M.A. See Commercial Series.

Whitehead (A. W.). GASPARD DE COLIGNY, ADMIRAL OF FRANCE. With 26 Illustrations and 10 Maps and Plans. Demy 8vo. 12s. 6d. net.

Whiteley (R. Lloyd), F.I.C., Principal of the Municipal Science School, West Bromwich. AN ELEMENTARY TEXTBOOK OF INORGANIC CHEMISTRY. Cr. 8vo. 2s. 6d.

Whitley (Miss). See Dilke (Lady).

Whitling (Miss L.), late Staff Teacher of the National Training School of Cookery. THE COMPLETE COOK. With 42 Illustrations. Demy 8vo. 7s. 6d. net.

Whitten (W.). See Smith (John Thomas).

Whyte(A. G.), B.Sc. See Books on Business.

Wilberforce (Wilfrid). See Little Books on Art.

Wilde (Oscar). DE PROFUNDIS. Twelfth Edition. Cr. 8vo. 5s. net.

THE WORKS OF OSCAR WILDE. In 12 Volumes. Fcap. 8vo. Gilt top. Deckle edge. 5s. net each volume.

I. LORD ARTHUR SAVILE'S CRIME and the PORTRAIT OF MR. W. H.

II. THE DUCHESS OF PADUA.

III. POEMS (including 'The Sphinx,' 'The Ballad of Reading Gaol,' and 'Uncollected Pieces').

IV. LADY WINDERMERE'S FAN.

V. A WOMAN OF NO IMPORTANCE.

VI. AN IDEAL HUSBAND.

VII. THE IMPORTANCE OF BEING EARNEST.

VIII. A HOUSE OF POMEGRANATES.

IX. INTENTIONS.

X. DE PROFUNDIS and PRISON LETTERS.

XI. ESSAYS ('Historical Criticism,' 'English Renaissance,' 'London Models,' 'Poems in Prose').

XII. SALOMÉ, A FLORENTINE TRAGEDY, LA SAINTE COURTISANE.

Wilkins (W. H.), B.A. THE ALIEN INVASION. Cr. 8vo. 2s. 6d.

Williams (H. Noel). THE WOMEN BONAPARTES. The Mother and three Sisters of Napoleon. With 36 Illustrations. In Two Volumes Demy 8vo. 24s net.

A ROSE OF SAVOY: MARIE ADELÉIDE OF SAVOY, DUCHESSE DE BOURGOGNE, MOTHER OF LOUIS XV. With a Frontispiece in Photogravure and 16 other Illustrations. Second Edition. Demy 8vo. 15s. net.

Williams (A.). PETROL PETER: or Pretty Stories and Funny Pictures. Illustrated in Colour by A. W. MILLS. Demy 4to. 3s. 6d. net.

Williamson (M. G.), M.A. See Ancient Cities.

Williamson (W.), B.A. See Junior Examination Series, Junior School Books, and Beginner's Books.

Wilmot-Buxton (E. M.), F.R. Hist. S. MAKERS OF EUROPE. Outlines of European History for the Middle Forms of Schools. With 12 Maps. Tenth Edition. Cr. 8vo. 3s. 6d.

THE ANCIENT WORLD. With Maps and Illustrations. Cr. 8vo. 3s. 6d.

A BOOK OF NOBLE WOMEN. With 16 Illustrations. Cr. 8vo. 3s. 6d.

A HISTORY OF GREAT BRITAIN: FROM THE COMING OF THE ANGLES TO THE YEAR 1870. With 20 Maps. Second Edition. Cr. 8vo. 3s. 6d.

BY ROAD AND RIVER. A Descriptive Geography of the British Isles. With 12 Illustrations and 12 Maps. Cr. 8vo. 2s.

See also Beginner's Books and New Historical Series.

Wilson (Bishop). See Library of Devotion.

Wilson (A. J.). See Books on Business.

Wilson (H. A.). See Books on Business.

Wilton (Richard), M.A. LYRA PASTORALIS: Songs of Nature, Church, and Home. Pott 8vo. 2s. 6d.

Winbolt (S. E.), M.A. EXERCISES IN LATIN ACCIDENCE. Cr. 8vo. 1s. 6d.

LATIN HEXAMETER VERSE: An Aid to Composition. Cr. 8vo. 3s. 6d. KEY, 5s. net.

Windle (B. C. A.), D.Sc., F.R.S., F.S.A. See Antiquary's Books, Little Guides, Ancient Cities, and School Histories.

Wood (Sir Evelyn), F.M., V.C., G.C.B., G.C.M.G. FROM MIDSHIPMAN TO FIELD-MARSHAL. With Illustrations, and 29 Maps. Fifth and Cheaper Edition. Demy 8vo. 7s. 6d. net.

THE REVOLT IN HINDUSTAN. 1857-59. With 8 Illustrations and 5 Maps. Second Edition. Cr. 8vo. 6s.

Wood (J. A. E.). See Textbooks of Technology.

Wood (J. Hickory). DAN LENO. Illustrated. Third Edition. Cr. 8vo. 6s.

Wood (W. Birkbeck), M.A., late Scholar of Worcester College, Oxford, and Edmonds (Major J. E.), R.E., D.A.Q.-M.G. A HISTORY OF THE CIVIL WAR IN THE UNITED STATES. With an Introduction by H. SPENSER WILKINSON. With 24 Maps and Plans. Second Edition. Demy 8vo. 12s. 6d. net.

Wordsworth (Christopher), M.A. See Antiquary's Books.

Wordsworth (W.). THE POEMS OF. With an Introduction and Notes by NOWELL C. SMITH, late Fellow of New College, Oxford. In Three Volumes. Demy 8vo. 15s. net.

POEMS BY WILLIAM WORDSWORTH. Selected with an Introduction by STOPFORD A. BROOKE. With 40 Illustrations by E. H. NEW, including a Frontispiece in Photogravure. Cr. 8vo. 7s. 6d. net.

See also Little Library.

Wordsworth (W.) and Coleridge (S. T.). See Little Library.

Wright (Arthur), D.D., Fellow of Queen's College, Cambridge. See Churchman's Library.

Wright (C. Gordon). See Dante.

Wright (J. C.). TO-DAY. Thoughts on Life for every day. Demy 16mo. 1s. 6d. net.

Wright (Sophie). GERMAN VOCABULARIES FOR REPETITION. Fcap. 8vo. 1s. 6d.

Wyatt (Kate M.). See Gloag (M. R.).

Wylde (A. B.). MODERN ABYSSINIA. With a Map and a Portrait. Demy 8vo. 15s. net.

Wyllie (M. A.). NORWAY AND ITS FJORDS. With 16 Illustrations, in Colour by W. L. WYLLIE, R.A., and 17 other Illustrations. Crown 8vo. 6s.

Wyndham (Geo.). See Shakespeare (Wm.).

Yeats (W. B.). A BOOK OF IRISH VERSE. Revised and Enlarged Edition. Cr. 8vo. 3s. 6d.

Young (Filson). THE COMPLETE MOTORIST. With 138 Illustrations. New Edition (Seventh), with many additions. Demy 8vo. 12s. 6d. net.

THE JOY OF THE ROAD: An Appreciation of the Motor Car. With a Frontispiece in Photogravure. Sm. Demy 8vo. 5s. net.

Zachariah of Mitylene. See Byzantine Texts.

Zimmern (Antonia). WHAT DO WE KNOW CONCERNING ELECTRICITY? Fcap. 8vo. 1s. 6d. net.

Ancient Cities

General Editor, B. C. A. WINDLE, D.Sc., F.R.S.

Cr. 8vo. 4s. 6d. net.

BRISTOL. By Alfred Harvey, M.B. Illustrated by E. H. New.

CANTERBURY. By J. C. Cox, LL.D., F.S.A. Illustrated by B. C. Boulter.

CHESTER. By B. C. A. Windle, D.Sc. F.R.S. Illustrated by E. H. New.

DUBLIN. By S. A. O. Fitzpatrick. Illustrated by W. C. Green.

EDINBURGH. By M. G. Williamson, M.A. Illustrated by Herbert Railton.

LINCOLN. By E. Mansel Sympson, M.A., M.D. Illustrated by E. H. New.

SHREWSBURY. By T. Auden, M.A., F.S.A. Illustrated by Katharine M. Roberts.

WELLS and GLASTONBURY. By T. S. Holmes. Illustrated by E. H. New.

The Antiquary's Books

General Editor, J. CHARLES COX, LL.D., F.S.A.

Demy 8vo. 7s. 6d. net.

ARCHÆOLOGY AND FALSE ANTIQUITIES. By R. Munro, LL.D. With 81 Illustrations.

BELLS OF ENGLAND, THE. By Canon J. J. Raven, D.D., F.S.A. With 60 Illustrations. Second Edition.

BRASSES OF ENGLAND, THE. By Herbert W. Macklin, M.A. With 85 Illustrations. Second Edition.

CELTIC ART IN PAGAN AND CHRISTIAN TIMES. By J. Romilly Allen, F.S.A. With 44 Plates and numerous Illustrations.

DOMESDAY INQUEST, THE. By Adolphus Ballard, B.A., LL.B. With 27 Illustrations.

ENGLISH CHURCH FURNITURE. By J. C. Cox, LL.D., F.S.A., and A. Harvey, M.B. With 121 Illustrations. Second Edition.

ENGLISH COSTUME. From Prehistoric Times to the End of the Eighteenth Century. By George Clinch, F.G.S. With 131 Illustrations.

ENGLISH MONASTIC LIFE. By the Right Rev. Abbot Gasquet, O.S.B. With 50 Illustrations, Maps and Plans. Fourth Edition.

ENGLISH SEALS. By J. Harvey Bloom. With 93 Illustrations.

FOLK-LORE AS AN HISTORICAL SCIENCE. By G. L. Gomme. With 28 Illustrations.

GILDS AND COMPANIES OF LONDON, THE. By George Unwin. With 37 Illustrations.

MANOR AND MANORIAL RECORDS, THE. By Nathaniel J. Hone. With 54 Illustrations.

MEDIÆVAL HOSPITALS OF ENGLAND, THE. By Rotha Mary Clay. With many Illustrations.

OLD SERVICE BOOKS OF THE ENGLISH CHURCH. By Christopher Wordsworth, M.A., and Henry Littlehales. With 38 Coloured and other Illustrations.

PARISH LIFE IN MEDIÆVAL ENGLAND. By the Right Rev. Abbot Gasquet, O.S.B. With 39 Illustrations. Second Edition.

REMAINS OF THE PREHISTORIC AGE IN ENGLAND. By B. C. A. Windle, D.Sc., F.R.S. With 94 Illustrations. Second Edition.

ROYAL FORESTS OF ENGLAND, THE. By J. C. Cox, LL.D., F.S.A. With 25 Plates and 23 other Illustrations.

SHRINES OF BRITISH SAINTS. By J. C. Wall. With 28 Plates and 50 other Illustrations.

The Arden Shakespeare

Demy 8vo. 2s. 6d. net each volume.

An edition of Shakespeare in single Plays. Edited with a full Introduction, Textual Notes, and a Commentary at the foot of the page.

ALL'S WELL THAT ENDS WELL. Edited by W. O. Brigstocke.

ANTONY AND CLEOPATRA. Edited by R. H. Case.

CYMBELINE. Edited by E. Dowden.

COMEDY OF ERRORS, THE. Edited by Henry Cuningham.

HAMLET. Edited by E. Dowden. Second Edition.

JULIUS CAESAR. Edited by M. Macmillan.

KING HENRY V. Edited by H. A. Evans.

KING HENRY VI. PT. I. Edited by H. C. Hart.

KING HENRY VI. PT. II. Edited by H. C. Hart and C. K. Pooler.

KING LEAR. Edited by W. J. Craig.

KING RICHARD III. Edited by A. H. Thompson.

LIFE AND DEATH OF KING JOHN, THE. Edited by Ivor B. John.

LOVE'S LABOUR'S LOST. Edited by H. C. Hart.

*MACBETH. Edited by H. Cuningham.

MEASURE FOR MEASURE. Edited by H. C. Hart.

MERCHANT OF VENICE, THE. Edited by C. K. Pooler.

MERRY WIVES OF WINDSOR, THE. Edited by H. C. Hart.

A MIDSUMMER NIGHT'S DREAM. Edited by H. Cuningham.

OTHELLO. Edited by H. C. Hart.

PERICLES. Edited by K. Deighton.

ROMEO AND JULIET. Edited by Edward Dowden.

TAMING OF THE SHREW, THE. Edited by R. Warwick Bond.

TEMPEST, THE. Edited by M. Luce.

TIMON OF ATHENS. Edited by K. Deighton.

TITUS ANDRONICUS. Edited by H. B. Baildon.

TROILUS AND CRESSIDA. Edited by K. Deighton.

TWO GENTLEMEN OF VERONA, THE. Edited by R. W. Bond.

TWELFTH NIGHT. Edited by M. Luce.

The Beginner's Books

Edited by W. WILLIAMSON, B.A.

EASY DICTATION AND SPELLING. By W. Williamson, B.A. Seventh Ed. Fcap. 8vo. 1s.

EASY EXERCISES IN ARITHMETIC. Arranged by W. S. Beard. Third Edition. Fcap. 8vo. Without Answers, 1s. With Answers, 1s. 3d.

EASY FRENCH RHYMES. By Henri Blouet. Second Edition. Illustrated. Fcap. 8vo. 1s.

AN EASY POETRY BOOK. Selected and arranged by W. Williamson, B.A. Second Edition. Cr. 8vo. 1s.

EASY STORIES FROM ENGLISH HISTORY. By E. M. Wilmot-Buxton, F.R.Hist.S. Fifth Edition. Cr. 8vo. 1s.

A FIRST HISTORY OF GREECE. By E. E. Firth. With 7 Maps. Cr. 8vo. 1s. 6d.

STORIES FROM ROMAN HISTORY. By E. M. Wilmot-Buxton. Second Edition. Cr. 8vo. 1s. 6d.

STORIES FROM THE OLD TESTAMENT. By E. M. Wilmot-Buxton. Cr. 8vo. 1s. 6d.

Books on Business

Cr. 8vo. 2s. 6d. net.

AUTOMOBILE INDUSTRY, THE. G. Holden-Stone.

BREWING INDUSTRY, THE. J. L. Baker, F.I.C., F.C.S. With 28 Illustrations.

BUSINESS OF ADVERTISING, THE. C. G. Moran. With 11 Illustrations.

BUSINESS SIDE OF AGRICULTURE, THE. A. G. L. Rogers.

BUSINESS OF INSURANCE, THE. A. J. Wilson.

CIVIL ENGINEERING. C. T. Fidler. With 15 Illustrations.

COTTON INDUSTRY AND TRADE, THE. S. J. Chapman. With 8 Illustrations.

THE ELECTRICAL INDUSTRY: LIGHTING, TRACTION, AND POWER. A. G. Whyte.

IRON TRADE OF GREAT BRITAIN, THE. J. S. Jeans. With 12 Illustrations.

LAW IN BUSINESS. H. A. Wilson.

MINING AND MINING INVESTMENTS. A. Moil.

MONEY MARKET, THE. F. Straker.

MONOPOLIES, TRUSTS, AND KARTELLS. F. W. Hirst.

PORTS AND DOCKS. Douglas Owen.

RAILWAYS. E. R. McDermott.

SHIPBUILDING INDUSTRY THE: Its History, Practice, Science, and Finance. David Pollock, M.I.N.A.

STOCK EXCHANGE, THE. C. Duguid. Second Edition.

TRADE UNIONS. G. Drage.

Byzantine Texts

Edited by J. B. BURY, M.A., Litt.D.

THE SYRIAC CHRONICLE KNOWN AS THAT OF ZACHARIAH OF MITYLENE. Translated by F. J. Hamilton, D.D., and E. W. Brooks. Demy 8vo. 12s. 6d. net.

EVAGRIUS. Edited by L. Bidez and Léon Parmentier. Demy 8vo. 10s. 6d. net.

THE HISTORY OF PSELLUS. Edited by C. Sathas. Demy 8vo. 15s. net.

ECTHESIS CHRONICA AND CHRONICON ATHENARUM. Edited by Professor S. P. Lambros. Demy 8vo. 7s. 6d. net.

THE CHRONICLE OF MOREA. Edited by John Schmitt. Demy 8vo. 15s. net.

The Churchman's Bible

General Editor, J. H. BURN, B.D., F.R.S.E.

Fcap. 8vo. 1s. 6d. net each.

THE EPISTLE OF ST. PAUL THE APOSTLE TO THE GALATIANS. Explained by A. W. Robinson, M.A. Second Edition.

ECCLESIASTES. Explained by A. W. Streane, D.D.

THE EPISTLE OF ST. PAUL THE APOSTLE TO THE PHILIPPIANS. Explained by C. R. D. Biggs, D.D. Second Edition.

THE EPISTLE OF ST. JAMES. Explained by H. W. Fulford, M.A.

ISAIAH. Explained by W. E. Barnes, D.D. Two Volumes. With Map. 2s. net each.

THE EPISTLE OF ST. PAUL THE APOSTLE TO THE EPHESIANS. Explained by G. H. Whitaker, M.A.

THE GOSPEL ACCORDING TO ST. MARK. Explained by J. C. Du Buisson, M.A. 2s. 6d. net.

THE EPISTLE OF PAUL THE APOSTLE TO THE COLOSSIANS AND PHILEMON. Explained by H. J. C. Knight. 2s. net.

The Churchman's Library

General Editor, J. H. BURN, B.D., F.R.S.E.

Crown 8vo. 3s. 6d. each.

THE BEGINNINGS OF ENGLISH CHRISTIANITY. By W. E. Collins, M.A. With Map.

THE CHURCHMAN'S INTRODUCTION TO THE OLD TESTAMENT. By A. M. Mackay, B.A. Second Edition.

EVOLUTION. By F. B. Jevons, M.A., Litt.D.

SOME NEW TESTAMENT PROBLEMS. By Arthur Wright, D.D. 6s.

THE WORKMANSHIP OF THE PRAYER BOOK: Its Literary and Liturgical Aspects. By J. Dowden, D.D. Second Edition, Revised and Enlarged.

Classical Translations

Crown 8vo.

AESCHYLUS—The Oresteian Trilogy (Agamemnon, Choëphoroe, Eumenides). Translated by Lewis Campbell, LL.D. 5s.

CICERO—De Oratore I. Translated by E. N. P. Moor, M.A. Second Edition. 3s. 6d.

CICERO—The Speeches against Cataline and Antony and for Murena and Milo. Translated by H. E. D. Blakiston, M.A. 5s.

CICERO—De Natura Deorum. Translated by F. Brooks, M.A. 3s. 6d.

Cicero—De Officiis. Translated by G. B. Gardiner, M.A. 2s. 6d.

HORACE—The Odes and Epodes. Translated by A. D. Godley, M.A. 2s.

LUCIAN—Six Dialogues. Translated by S. T. Irwin, M.A. 3s. 6d.

SOPHOCLES—Ajax and Electra. Translated by E. D. Morshead, M.A. 2s. 6d.

TACITUS—Agricola and Germania. Translated by R. B. Townshend. 2s. 6d.

JUVENAL—Thirteen Satires. Translated by S. G. Owen, M.A. 2s. 6d.

Classics of Art

Edited by DR. J. H. W. LAING.

Wide Royal 8vo. Gilt top.

THE ART OF THE GREEKS. By H. B. Walters. With 112 Plates and 18 Illustrations in the Text. 12s. 6d. net.

FLORENTINE SCULPTORS OF THE RENAISSANCE. By Wilhelm Bode, Ph.D. Translated by Jessie Haynes. With 94 Plates. 12s. 6d. net.

GHIRLANDAIO. By Gerald S. Davies, Master of the Charterhouse. With 50 Plates. Second Edition. 10s. 6d.

MICHELANGELO. By Gerald S. Davies, Master of the Charterhouse. With 126 Plates. 12s. 6d. net.

RUBENS. By Edward Dillon, M.A. With a Frontispiece in Photogravure and 483 Plates. 25s. net.

RAPHAEL. By A. P. Oppé. With a Frontispiece in Photogravure and 200 Illustrations. 12s. 6d. net.

*TITIAN. By Charles Ricketts. With about 200 Illustrations. 12s. 6d. net.

VELAZQUEZ. By A. de Beruete. With 94 Plates. 10s. 6d. net.

Commercial Series

Crown 8vo.

BRITISH COMMERCE AND COLONIES FROM ELIZABETH TO VICTORIA. By H. de B. Gibbins, Litt.D., M.A. FOURTH EDITION. 2S.

COMMERCIAL EXAMINATION PAPERS. By H. de B. Gibbins, Litt.D., M.A. 1s. 6d.

THE ECONOMICS OF COMMERCE. By H. de B. Gibbins, Litt.D., M.A. Second Edition. 1s. 6d.

A GERMAN COMMERCIAL READER. By S. E. Bally. With Vocabulary. 2s.

A COMMERCIAL GEOGRAPHY OF THE BRITISH EMPIRE. By L. W. Lyde, M.A. Seventh Edition. 2s.

A COMMERCIAL GEOGRAPHY OF FOREIGN NATIONS. By F. C. Boon, B.A. 2s.

A PRIMER OF BUSINESS. By S. Jackson, M.A. Fourth Edition. 1s. 6d.

A SHORT COMMERCIAL ARITHMETIC. By F. G. Taylor, M.A. Fourth Edition. 1s. 6d.

FRENCH COMMERCIAL CORRESPONDENCE. By S. E. Bally. With Vocabulary. Fourth Edition. 2s.

GERMAN COMMERCIAL CORRESPONDENCE. By S. E. Bally. With Vocabulary. Second Edition. 2s. 6d.

A FRENCH COMMERCIAL READER. By S. E. Bally. With Vocabulary. Second Edition. 2s.

PRECIS WRITING AND OFFICE CORRESPONDENCE. By E. E. Whitfield, M.A. Second Edition. 2s.

AN ENTRANCE GUIDE TO PROFESSIONS AND BUSINESS. By H. Jones. 1s. 6d.

THE PRINCIPLES OF BOOK-KEEPING BY DOUBLE ENTRY. By J. E. B. M'Allen, M.A. 2s.

COMMERCIAL LAW. By W. Douglas Edwards. Second Edition. 2s.

The Connoisseur's Library

Wide Royal 8vo. 25s. net.

MEZZOTINTS. By Cyril Davenport. With 40 Plates in Photogravure.

PORCELAIN. By Edward Dillon. With 19 Plates in Colour, 20 in Collotype, and 5 in Photogravure.

MINIATURES. By Dudley Heath. With 9 Plates in Colour, 15 in Collotype, and 15 in Photogravure.

IVORIES. By A. Maskell. With 80 Plates in Collotype and Photogravure.

ENGLISH FURNITURE. By F. S. Robinson. With 160 Plates in Collotype and one in Photogravure. Second Edition.

ENGLISH COLOURED BOOKS. By Martin Hardie. With 28 Illustrations in Colour and Collotype.

EUROPEAN ENAMELS. By Henry H. Cunynghame, C.B. With 54 Plates in Collotype and Half-tone and 4 Plates in Colour.

GOLDSMITHS' AND SILVERSMITHS' WORK. By Nelson Dawson. With 51 Plates in Collotype and a Frontispiece in Photogravure. Second Edition.

GLASS. By Edward Dillon. With 37 Illustrations in Collotype and 12 in Colour.

SEALS. By Walter de Gray Birch. With 52 Illustrations in Collotype and a Frontispiece in Photogravure.

JEWELLERY. By H. Clifford Smith. With 50 Illustrations in Collotype, and 4 in Colour. Second Edition.

Handbooks of English Church History

Edited by J. H. BURN, B.D. Crown 8vo. 2s. 6d. net.

THE FOUNDATIONS OF THE ENGLISH CHURCH. J. H. Maude.

THE SAXON CHURCH AND THE NORMAN CONQUEST. C. T. CRUTTWELL.

THE MEDIÆVAL CHURCH AND THE PAPACY. A. C. Jennings.

THE REFORMATION PERIOD. By Henry Gee.

The Illustrated Pocket Library of Plain and Coloured Books

Fcap. 8vo. 3s. 6d. net each volume.

COLOURED BOOKS

OLD COLOURED BOOKS. By George Paston. With 16 Coloured Plates. Fcap. 8vo. 2s. net.

THE LIFE AND DEATH OF JOHN MYTTON, ESQ. By Nimrod. With 18 Coloured Plates by Henry Alken and T. J. Rawlins. Fourth Edition.

THE LIFE OF A SPORTSMAN. By Nimrod. With 35 Coloured Plates by Henry Alken.

HANDLEY CROSS. By R. S. Surtees. With 17 Coloured Plates and 100 Woodcuts in the Text by John Leech. Second Edition.

MR. SPONGE'S SPORTING TOUR. By R. S. Surtees. With 13 Coloured Plates and 90 Woodcuts in the Text by John Leech.

JORROCKS' JAUNTS AND JOLLITIES. By R. S. Surtees. With 15 Coloured Plates by H. Alken. Second Edition.

ASK MAMMA. By R. S. Surtees. With 13 Coloured Plates and 70 Woodcuts in the Text by John Leech.

THE ANALYSIS OF THE HUNTING FIELD. By R. S. Surtees. With 7 Coloured Plates by Henry Alken, and 43 Illustrations on Wood.

THE TOUR OF DR. SYNTAX IN SEARCH OF THE PICTURESQUE. By William Combe. With 30 Coloured Plates by T. Rowlandson.

THE TOUR OF DOCTOR SYNTAX IN SEARCH OF CONSOLATION. By William Combe. With 24 Coloured Plates by T. Rowlandson.

THE THIRD TOUR OF DOCTOR SYNTAX IN SEARCH OF A WIFE. By William Combe. With 24 Coloured Plates by T. Rowlandson.

THE HISTORY OF JOHNNY QUAE GENUS: the Little Foundling of the late Dr. Syntax. By the Author of 'The Three Tours.' With 24 Coloured Plates by Rowlandson.

THE ENGLISH DANCE OF DEATH, from the Designs of T. Rowlandson, with Metrical Illustrations by the Author of 'Doctor Syntax.' Two Volumes.

This book contains 76 Coloured Plates.

THE DANCE OF LIFE: A Poem. By the Author of 'Doctor Syntax.' Illustrated with 26 Coloured Engravings by T. Rowlandson.

LIFE IN LONDON: or, the Day and Night Scenes of Jerry Hawthorn, Esq., and his Elegant Friend, Corinthian Tom. By Pierce Egan. With 36 Coloured Plates by I. R. and G. Cruikshank. With numerous Designs on Wood.

REAL LIFE IN LONDON: or, the Rambles and Adventures of Bob Tallyho, Esq., and his Cousin, The Hon. Tom Dashall. By an Amateur (Pierce Egan). With 31 Coloured Plates by Alken and Rowlandson, etc. Two Volumes.

THE LIFE OF AN ACTOR. By Pierce Egan. With 27 Coloured Plates by Theodore Lane, and several Designs on Wood.

THE VICAR OF WAKEFIELD. By Oliver Goldsmith. With 24 Coloured Plates by T. Rowlandson.

THE MILITARY ADVENTURES OF JOHNNY NEWCOME. By an Officer. With 15 Coloured Plates by T. Rowlandson.

THE NATIONAL SPORTS OF GREAT BRITAIN. With Descriptions and 50 Coloured Plates by Henry Alken.

THE ADVENTURES OF A POST CAPTAIN. By A Naval Officer. With 24 Coloured Plates by Mr. Williams.

GAMONIA: or, the Art of Preserving Game; and an Improved Method of making Plantations and Covers, explained and illustrated by Lawrence Rawstorne, Esq. With 15 Coloured Plates by T. Rawlins.

AN ACADEMY FOR GROWN HORSEMEN: Containing the completest Instructions for Walking, Trotting, Cantering, Galloping, Stumbling, and Tumbling. Illustrated with 27 Coloured Plates, and adorned with a Portrait of the Author. By Geoffrey Gambado, Esq.

REAL LIFE IN IRELAND, or, the Day and Night Scenes of Brian Boru, Esq., and his Elegant Friend, Sir Shawn O'Dogherty. By a Real Paddy. With 19 Coloured Plates by Heath, Marks, etc.

THE ADVENTURES OF JOHNNY NEWCOME IN THE NAVY. By Alfred Burton. With 16 Coloured Plates by T. Rowlandson.

THE OLD ENGLISH SQUIRE: A Poem. By John Careless, Esq. With 20 Coloured Plates after the style of T. Rowlandson.

THE ENGLISH SPY. By Bernard Blackmantle. An original Work, Characteristic, Satirical, Humorous, comprising scenes and sketches in every Rank of Society, being Portraits of the Illustrious, Eminent, Eccentric, and Notorious. With 72 Coloured Plates by R. CRUIKSHANK, and many Illustrations on wood. Two Volumes. 7s. net.

PLAIN BOOKS

THE GRAVE: A Poem. By Robert Blair. Illustrated by 12 Etchings executed by Louis Schiavonetti from the original Inventions of William Blake. With an Engraved Title Page and a Portrait of Blake by T. Phillips, R.A.

The illustrations are reproduced in Photogravure.

ILLUSTRATIONS OF THE BOOK OF JOB. Invented and engraved by William Blake.

These famous Illustrations—21 in number—are reproduced in Photogravure.

WINDSOR CASTLE. By W. Harrison Ainsworth. With 22 Plates and 87 Woodcuts in the Text by George Cruikshank.

THE TOWER OF LONDON. By W. Harrison Ainsworth. With 40 Plates and 58 Woodcuts in the Text by George Cruikshank.

FRANK FAIRLEGH. By F. E. Smedley. With 30 Plates by George Cruikshank.

HANDY ANDY. By Samuel Lover. With 24 Illustrations by the Author.

THE COMPLEAT ANGLER. By Izaak Walton and Charles Cotton. With 14 Plates and 77 Woodcuts in the Text.

THE PICKWICK PAPERS. By Charles Dickens. With the 43 Illustrations by Seymour and Phiz, the two Buss Plates, and the 32 Contemporary Onwhyn Plates.

Junior Examination Series

Edited by A. M. M. STEDMAN, M.A. Fcap. 8vo. 1s.

JUNIOR ALGEBRA EXAMINATION PAPERS. By S. W. Finn, M.A.

JUNIOR ARITHMETIC EXAMINATION PAPERS. By W. S. Beard. Fifth Edition.

JUNIOR ENGLISH EXAMINATION PAPERS. By W. Williamson, B.A. Second Edition.

JUNIOR FRENCH EXAMINATION PAPERS. By F. Jacob, M.A. Second Edition.

JUNIOR GENERAL INFORMATION EXAMINATION PAPERS. By W. S. Beard. KEY, 3s. 6d. net.

JUNIOR GEOGRAPHY EXAMINATION PAPERS. By W. G. Baker, M.A.

JUNIOR GERMAN EXAMINATION PAPERS. By A. Voegelin, M.A.

JUNIOR GREEK EXAMINATION PAPERS. By T. C. Weatherhead, M.A. KEY, 3s. 6d. net.

JUNIOR LATIN EXAMINATION PAPERS. By C. G. Botting, B.A. Sixth Edition. KEY, 3s. 6d. net.

JUNIOR HISTORY EXAMINATION PAPERS. By W. O. P. Davies.

Methuen's Junior School-Books

Edited by O. D. INSKIP, LL.D., and W. WILLIAMSON, B.A.

A CLASS-BOOK OF DICTATION PASSAGES. By W. Williamson, B.A. Fifteenth Edition. Cr. 8vo. 1s. 6d.

THE GOSPEL ACCORDING TO ST. MATTHEW. Edited by E. Wilton South, M.A. With Three Maps. Cr. 8vo. 1s. 6d.

THE GOSPEL ACCORDING TO ST. MARK. Edited by A. E. Rubie, D.D. With Three Maps. Cr. 8vo. 1s. 6d.

A JUNIOR ENGLISH GRAMMAR. By W. Williamson, B.A. With numerous passages for parsing and analysis, and a chapter on Essay Writing. Fourth Edition. Cr. 2vo. 2s.

A JUNIOR CHEMISTRY. By E. A. Tyler, B.A., F.C.S. With 78 Illustrations. Fifth Edition. Cr. 8vo. 2s. 6d.

THE ACTS OF THE APOSTLES. Edited by A. E. Rubie, D.D. Cr. 8vo. 2s.

A JUNIOR FRENCH GRAMMAR. By L. A. Sornet and M. J. Acatos. Third Edition. Cr. 8vo. 2s.

ELEMENTARY EXPERIMENTAL SCIENCE. Physics by W. T. Clough, A.R.C.Sc. (Lond.), F.C.S. CHEMISTRY by A. E. Dunstan, B.Sc. (Lond.), F.C.S. With 2 Plates and 154 Diagrams. Eighth Edition. Cr. 8vo. 2s. 6d.

A JUNIOR GEOMETRY. By Noel S. Lydon. With 276 Diagrams. Seventh Edition. Cr. 8vo. 2s.

ELEMENTARY EXPERIMENTAL CHEMISTRY. By A. E. Dunstan, B.Sc. (Lond.), F.C.S. With 4 Plates and 109 Diagrams. Third Edition. Cr. 8vo. 2s.

A JUNIOR FRENCH PROSE. By R. R. N. Baron, M.A. Fourth Edition. Cr. 8vo. 2s.

THE GOSPEL ACCORDING TO ST. LUKE. With an Introduction and Notes by William Williamson, B.A. With Three Maps. Cr. 8vo. 2s.

THE FIRST BOOK OF KINGS. Edited by A. E. Rubie, D.D. With 4 Maps. Cr. 8vo. 2s.

A JUNIOR GREEK HISTORY. By W. H. Spragge, M.A. With 4 Illustrations and 5 Maps. Cr. 8vo. 2s. 6d.

A SCHOOL LATIN GRAMMAR. By H. G. Ford, M.A. Cr. 8vo. 2s. 6d.

A JUNIOR LATIN PROSE. By H. N. Asman, M.A., B.D. Cr. 8vo. 2s. 6d.

*ELEMENTARY EXPERIMENTAL ELECTRICITY AND MAGNETISM. By W. T. Clough, A.R.C.Sc. (Lond.), F.C.S. With 200 Illustrations and Diagrams. Cr. 8vo. 2s. 6d.

ENGLISH LITERATURE FOR SCHOOLS. By Edith E. Firth. With 4 Maps. Cr. 8vo. 2s. 6d.

Leaders of Religion

Edited by H. C. BEECHING, M.A., Canon of Westminster. With Portraits.

Cr. 8vo. 2s. net.

CARDINAL NEWMAN. By R. H. Hutton.

JOHN WESLEY. By J. H. Overton, M.A.

BISHOP WILBERFORCE. By G. W. Daniell, M.A.

CARDINAL MANNING. By A. W. Hutton, M.A.

CHARLES SIMEON. By H. C. G. Moule, D.D.

JOHN KNOX. By F. MacCunn. Second Edition.

JOHN HOWE. By R. F. Horton, D.D.

THOMAS KEN. By F. A. Clarke, M.A.

GEORGE FOX, THE QUAKER. By T. Hodgkin, D.C.L. Third Edition.

JOHN KEBLE. By Walter Lock, D.D.

THOMAS CHALMERS. By Mrs. Oliphant.

LANCELOT ANDREWES. By R. L. Ottley, D.D. Second Edition.

AUGUSTINE OF CANTERBURY. By E. L. Cutts, D.D.

WILLIAM LAUD. By W. H. Hutton, M.A. Third Edition.

JOHN DONNE. By Augustus Jessopp, D.D.

THOMAS CRANMER. By A. J. Mason, D.D.

Bishop Latimer. By R. M. Carlyle and A. J. Carlyle, M.A.

BISHOP BUTLER. By W. A. Spooner, M.A.

The Library of Devotion

With Introductions and (where necessary) Notes.

Small Pott 8vo, cloth, 2s.; leather, 2s. 6d. net.

THE CONFESSIONS OF ST. AUGUSTINE. Edited by C. Bigg, D.D. Seventh Edition.

THE IMITATION OF CHRIST: called also the Ecclesiastical Music. Edited by C. Bigg, D.D. Fifth Edition.

THE CHRISTIAN YEAR. Edited by Walter Lock, D.D. Fourth Edition.

LYRA INNOCENTIUM. Edited by Walter Lock, D.D. Second Edition.

THE TEMPLE. Edited by E. C. S. Gibson, D.D. Second Edition.

A BOOK OF DEVOTIONS. Edited by J. W. Stanbridge, B.D. Second Edition.

A SERIOUS CALL TO A DEVOUT AND HOLY LIFE. Edited by C. Bigg, D.D. Fourth Ed.

A GUIDE TO ETERNITY. Edited by J. W. Stanbridge, B.D.

THE INNER WAY. By J. Tauler. Edited by A. W. Hutton, M.A. Second Edition.

ON THE LOVE OF GOD. By St. Francis de Sales. Edited by W. J. Knox-Little, M.A.

THE PSALMS OF DAVID. Edited by B. W. Randolph, D.D.

LYRA APOSTOLICA. By Cardinal Newman and others. Edited by Canon Scott Holland, M.A., and Canon H. C. Beeching, M.A.

THE SONG OF SONGS. Edited by B. Blaxland, M.A.

THE THOUGHTS OF PASCAL. Edited by C. S. Jerram, M.A.

A MANUAL OF CONSOLATION FROM THE SAINTS AND FATHERS. Edited by J. H. Burn, B.D.

DEVOTIONS FROM THE APOCRYPHA. Edited, with an Introduction, by Herbert Pentin, M.A.

THE SPIRITUAL COMBAT. By Dom Lorenzo Scupoli. Newly translated, with an Introduction and Notes, by Thomas Barns, M.A.

THE DEVOTIONS OF ST. ANSELM. Edited by C. C. J. Webb, M.A.

GRACE ABOUNDING TO THE CHIEF OF SINNERS. By John Bunyan. Edited by S. C. Freer, M.A.

BISHOP WILSON'S SACRA PRIVATA. Edited by A. E. Burn, B.D.

LYRA SACRA: A Book of Sacred Verse. Edited by Canon H. C. Beeching, M.A. Second Edition, revised.

A DAY BOOK FROM THE SAINTS AND FATHERS. Edited by J. H. Burn, B.D.

A LITTLE BOOK OF HEAVENLY WISDOM. A Selection from the English Mystics. Edited by E. C. Gregory.

LIGHT, LIFE, AND LOVE. A Selection from the German Mystics. Edited by W. R. Inge, M.A.

AN INTRODUCTION TO THE DEVOUT LIFE. By St. Francis de Sales. Translated and Edited by T. Barns, M.A.

THE LITTLE FLOWERS OF THE GLORIOUS MESSER ST. FRANCIS AND OF HIS FRIARS. Done into English by W. Heywood. With an Introduction by A. G. Ferrers Howell.

MANCHESTER AL MONDO: a Contemplation of Death and Immortality. By Henry Montagu Earl of Manchester. With an Introduction by Elizabeth Waterhouse, Editor of 'A Little Book of Life and Death.'

THE SPIRITUAL GUIDE, which Disentangles the Soul and brings it by the Inward Way to the Fruition of Perfect Contemplation, and the Rich Treasure of Internal Peace. Written by Dr. Michael de Molinos, Priest. Translated from the Italian copy, printed at Venice, 1685. Edited with an Introduction by Kathleen Lyttelton. And a Note by Canon Scott Holland.

DEVOTIONS FOR EVERY DAY OF THE WEEK AND THE GREAT FESTIVALS. By John Wesley. Edited, with an Introduction by Canon C. Bodington.

PRECES PRIVATAE. By Lancelot Andrewes, Bishop of Winchester. Selections from the Translation by Canon F. E. Brightman. Edited, with an Introduction, by A. E. Burn, D.D.

HORAE MYSTICAE: A Day Book from the Writings of Mystics of Many Nations. Edited by E. C. Gregory.

Little Books on Art

With many Illustrations. Demy 16mo. 2s. 6d. net.

Each volume consists of about 200 pages, and contains from 30 to 40 Illustrations, including a Frontispiece in Photogravure.

ALBRECHT DÜRER. J. Allen.

ARTS OF JAPAN, THE. E. Dillon.

BOOKPLATES. E. Almack.

BOTTICELLI. Mary L. Bonnor.

BURNE-JONES. F. de Lisle.

CHRIST IN ART. Mrs. H. Jenner.

CLAUDE. E. Dillon.

CONSTABLE. H. W. Tompkins.

COROT. A. Pollard and E. Birnstingl.

ENAMELS. Mrs. N. Dawson.

FREDERIC LEIGHTON. A. Corkran.

GEORGE ROMNEY. G. Paston.

GREEK ART. H. B. Walters.

GREUZE AND BOUCHER. E. F. Pollard.

HOLBEIN. Mrs. G. Fortescue.

ILLUMINATED MANUSCRIPTS. J. W. Bradley.

JEWELLERY. C. Davenport.

JOHN HOPPNER. H. P. K. Skipton.

SIR JOSHUA REYNOLDS. J. Sime.

MILLET. N. Peacock.

MINIATURES. C. Davenport.

OUR LADY IN ART. Mrs. H. Jenner.

RAPHAEL. A. R. Dryhurst. Second Edition.

REMBRANDT. Mrs. E. A. Sharp.

TURNER. F. Tyrrell-Gill.

VANDYCK. M. G. Smallwood.

VELASQUEZ. W. Wilberforce and A. R. Gilbert.

WATTS. R. E. D. Sketchley.

The Little Galleries

Demy 16mo. 2s. 6d. net.

Each volume contains 20 plates in Photogravure, together with a short outline of the life and work of the master to whom the book is devoted.

A LITTLE GALLERY OF REYNOLDS.

A LITTLE GALLERY OF ROMNEY.

A LITTLE GALLERY OF HOPPNER.

A LITTLE GALLERY OF MILLAIS.

A LITTLE GALLERY OF ENGLISH POETS.

The Little Guides

With many Illustrations by E. H. NEW and other artists, and from photographs.

Small Pott 8vo, cloth, 2s. 6d. net; leather, 3s. 6d. net.

The main features of these Guides are (1) a handy and charming form; (2) illustrations from photographs and by well-known artists; (3) good plans and maps; (4) an adequate but compact presentation of everything that is interesting in the natural features, history, archæology, and architecture of the town or district treated.

CAMBRIDGE AND ITS COLLEGES. A. H. Thompson. Second Edition.

ENGLISH LAKES, THE. F. G. Brabant.

ISLE OF WIGHT, THE. G. Clinch.

MALVERN COUNTRY, THE. B. C. A. Windle.

NORTH WALES. A. T. Story.

OXFORD AND ITS COLLEGES. J. Wells. Eighth Edition.

SHAKESPEARE'S COUNTRY. B. C. A. Windle. Third Edition.

ST. PAUL'S CATHEDRAL. G. Clinch.

WESTMINSTER ABBEY. G. E. Troutbeck. Second Edition.

BUCKINGHAMSHIRE. E. S. Roscoe.

CHESHIRE. W. M. Gallichan.

CORNWALL. A. L. Salmon.

DERBYSHIRE. J. C. Cox.

DEVON. S. Baring-Gould.

DORSET. F. R. Heath. Second Edition.

ESSEX. J. C. Cox.

HAMPSHIRE. J. C. Cox.

HERTFORDSHIRE. H. W. Tompkins.

KENT. G. Clinch.

KERRY. C. P. Crane.

MIDDLESEX. J. B. Firth.

MONMOUTHSHIRE. G. W. Wade and J. H. Wade.

NORFOLK. W. A. Dutt.

NORTHAMPTONSHIRE. W. Dry.

OXFORDSHIRE. F. G. Brabant.

SOMERSET. G. W. and J. H. Wade.

SUFFOLK. W. A. Dutt.

SURREY. F. A. H. Lambert.

SUSSEX. F. G. Brabant. Second Edition.

YORKSHIRE, THE EAST RIDING. J. E. Morris.

YORKSHIRE, THE NORTH RIDING. J. E. Morris.

BRITTANY. S. Baring-Gould.

NORMANDY. C. Scudamore.

ROME. C. G. Ellaby.

SICILY. F. H. Jackson.

The Little Library

With Introductions, Notes, and Photogravure Frontispieces.

Small Pott 8vo. Each Volume, cloth, 1s. 6d. net; leather, 2s. 6d. net.

Anon. A LITTLE BOOK OF ENGLISH LYRICS. Second Edition.

Austen (Jane). PRIDE AND PREJUDICE. Edited by E. V. LUCAS. Two Vols.

NORTHANGER ABBEY. Edited by E. V. LUCAS.

Bacon (Francis). THE ESSAYS OF LORD BACON. Edited by EDWARD WRIGHT.

Barham (R. H.). THE INGOLDSBY LEGENDS. Edited by J. B. ATLAY. Two Volumes.

Barnett (Mrs. P. A.). A LITTLE BOOK OF ENGLISH PROSE. Second Edition.

Beckford (William). THE HISTORY OF THE CALIPH VATHEK. Edited by E. DENISON ROSS.

Blake (William). SELECTIONS FROM WILLIAM BLAKE. Edited by M. PERUGINI.

Borrow (George). LAVENGRO. Edited by F. HINDES GROOME. Two Volumes.

THE ROMANY RYE. Edited by JOHN SAMPSON.

Browning (Robert). SELECTIONS FROM THE EARLY POEMS OF ROBERT BROWNING. Edited by W. HALL GRIFFIN, M.A.

Canning (George). SELECTIONS FROM THE ANTI-JACOBIN: with GEORGE CANNING'S additional Poems. Edited by LLOYD SANDERS.

Cowley (Abraham). THE ESSAYS OF ABRAHAM COWLEY. Edited by H. C. MINCHIN.

Crabbe (George). SELECTIONS FROM GEORGE CRABBE. Edited by A. C. DEANE.

Craik (Mrs.). JOHN HALIFAX, GENTLEMAN. Edited by ANNIE MATHESON. Two Volumes.

Crashaw (Richard). THE ENGLISH POEMS OF RICHARD CRASHAW. Edited by EDWARD HUTTON.

Dante (Alighieri). THE INFERNO OF DANTE. Translated by H. F. CARY. Edited by PAGET TOYNBEE, M.A., D.Litt.

THE PURGATORIO OF DANTE. Translated by H. F. CARY. Edited by PAGET TOYNBEE, M.A., D.Litt.

THE PARADISO OF DANTE. Translated by H. F. CARY. Edited by PAGET TOYNBEE, M.A., D.Litt.

Darley (George). SELECTIONS FROM THE POEMS OF GEORGE DARLEY. Edited by R. A. STREATFEILD.

Deane (A. C.). A LITTLE BOOK OF LIGHT VERSE.

Dickens (Charles). CHRISTMAS BOOKS. Two Volumes.

Ferrier (Susan). MARRIAGE. Edited by A. GOODRICH-FREER and LORD IDDESLEIGH. Two Volumes.

THE INHERITANCE. Two Volumes.

Gaskell (Mrs.). CRANFORD. Edited by E. V. LUCAS. Second Edition.

Hawthorne (Nathaniel). THE SCARLET LETTER. Edited by PERCY DEARMER.

Henderson (T. F.). A LITTLE BOOK OF SCOTTISH VERSE.

Keats (John). POEMS. With an Introduction by L. BINYON, and Notes by J. MASEFIELD.

Kinglake (A. W.). EOTHEN. With an Introduction and Notes. Second Edition.

Lamb (Charles). ELIA, AND THE LAST ESSAYS OF ELIA. Edited by E. V. LUCAS.

Locker (F.). LONDON LYRICS. Edited by A. D. GODLEY, M.A. A reprint of the First Edition.

Longfellow (H. W.). SELECTIONS FROM LONGFELLOW. Edited by L. M. FAITHFULL.

Marvell (Andrew). THE POEMS OF ANDREW MARVELL. Edited by E. WRIGHT.

Milton (John). THE MINOR POEMS OF JOHN MILTON. Edited by H. C. BEECHING, M.A.

Moir (D. M.). MANSIE WAUCH. Edited by T. F. HENDERSON.

Nichols (J. B. B.). A LITTLE BOOK OF ENGLISH SONNETS.

Rochefoucauld (La). THE MAXIMS OF LA ROCHEFOUCAULD. Translated by DEAN STANHOPE. Edited by G. H. POWELL.

Smith (Horace and James). REJECTED ADDRESSES. Edited by A. D. GODLEY, M.A.

Sterne (Laurence). A SENTIMENTAL JOURNEY. Edited by H. W. PAUL.

Tennyson (Alfred, Lord). THE EARLY POEMS OF ALFRED, LORD TENNYSON. Edited by J. CHURTON COLLINS, M.A.

IN MEMORIAM. Edited by H. C. BEECHING, M.A.

THE PRINCESS. Edited by ELIZABETH WORDSWORTH.

MAUD. Edited by ELIZABETH WORDSWORTH.

Thackeray (W. M.). VANITY FAIR. Edited by S. GWYNN. Three Volumes.

PENDENNIS. Edited by S. GWYNN. Three Volumes.

ESMOND. Edited by S. GWYNN.

CHRISTMAS BOOKS. Edited by S. GWYNN.

Vaughan (Henry). THE POEMS OF HENRY VAUGHAN. Edited by EDWARD HUTTON.

Walton (Izaak). THE COMPLEAT ANGLER. Edited by J. BUCHAN.

Waterhouse (Elizabeth). A LITTLE BOOK OF LIFE AND DEATH. Edited by. Twelfth Edition.

Wordsworth (W.). SELECTIONS FROM WORDSWORTH. Edited by NOWELL C. SMITH.

Wordsworth (W.) and Coleridge (S. T.). LYRICAL BALLADS. Edited by GEORGE SAMPSON.

The Little Quarto Shakespeare

Edited by W. J. CRAIG. With Introductions and Notes.

Pott 16mo. In 40 Volumes. Leather, price 1s. net each volume.

Mahogany Revolving Book Case. 10s. net.

Miniature Library

Reprints in miniature of a few interesting books which have qualities of humanity, devotion, or literary genius.

EUPHRANOR: A Dialogue on Youth. By Edward FitzGerald. From the edition published by W. Pickering in 1851. Demy 32mo. Leather, 2s. net.

THE LIFE OF EDWARD, LORD HERBERT OF CHERBURY. Written by himself. From the edition printed at Strawberry Hill in the year 1764. Demy 32mo. Leather, 2s. net.

POLONIUS: or Wise Saws and Modern Instances. By Edward FitzGerald. From the edition published by W. Pickering in 1852. Demy 32mo. Leather, 2s. net.

THE RUBÁIYÁT OF OMAR KHAYYÁM. By Edward FitzGerald. From the 1st edition of 1859, Fourth Edition. Leather, 1s. net.

A New Historical Series

Edited by the Rev. H. N. ASMAN, M.A., B.D.

*STORIES FROM ANCIENT HISTORY. By E. Bower, B.A. Cr. 8vo. 1s. 6d.

STORIES FROM MODERN HISTORY. By E. M. Wilmot-Buxton, F.R.Hist.S. Cr. 8vo. 1s. 6d.

The New Library of Medicine

Edited by C. W. SALEEBY, M.D., F.R.S.Edin. Demy 8vo.

CARE OF THE BODY, THE. F. Cavanagh. Second Edition. 7s. 6d. net.

CHILDREN OF THE NATION, THE. Right Hon. Sir John Gorst. 7s. 6d. net.

CONTROL OF A SCOURGE, THE: or, How Cancer is Curable. Chas. P. Childe. 7s. 6d. net.

DISEASES OF OCCUPATION. Sir Thomas Oliver. 10s. 6d. net.

DRINK PROBLEM, THE, in its Medico-Sociological Aspects. Edited by T. N. Kelynack. 7s. 6d. net.

DRUGS AND THE DRUG HABIT. H. Sainsbury.

FUNCTIONAL NERVE DISEASES. A. T. Schofield. 7s. 6d. net.

HYGIENE OF MIND, THE. T. S. Clouston. Fifth Edition. 7s. 6d. net.

INFANT MORTALITY. George Newman. 7s. 6d. net.

PREVENTION OF TUBERCULOSIS (CONSUMPTION), THE. Arthur Newsholme. 10s. 6d. net.

AIR AND HEALTH. Ronald C. Macfie, M.A., M.B. 7s. 6d. net.

The New Library of Music

Edited by ERNEST NEWMAN. Demy 8vo. 7s. 6d. net.

HUGO WOLF. By Ernest Newman. With 13 Illustrations.

HANDEL. By R. A. Streatfeild. With 12 Illustrations.

Oxford Biographies

Fcap. 8vo. Each volume, cloth, 2s. 6d. net; leather, 3s. 6d. net.

DANTE ALIGHIERI. By Paget Toynbee, M.A., D.Litt. With 12 Illustrations. Third Edition.

GIROLAMO SAVONAROLA. By E. L. S. Horsburgh, M.A. With 12 Illustrations. Second Edition.

JOHN HOWARD. By E. C. S. Gibson, D.D., Bishop of Gloucester. With 12 Illustrations.

ALFRED TENNYSON. By A. C. BENSON, M.A. With 9 Illustrations. Second Edition.

SIR WALTER RALEIGH. By I. A. Taylor. With 12 Illustrations.

ERASMUS. By E. F. H. Capey. With 12 Illustrations.

THE YOUNG PRETENDER. By C. S. Terry. With 12 Illustrations.

ROBERT BURNS. By T. F. Henderson. With 12 Illustrations.

CHATHAM. By A. S. M'Dowall. With 12 Illustrations.

FRANCIS OF ASSISI. By Anna M. Stoddart. With 16 Illustrations.

CANNING. By W. Alison Phillips. With 12 Illustrations.

BEACONSFIELD. By Walter Sichel. With 12 Illustrations.

JOHANN WOLFGANG GOETHE. By H. G. Atkins. With 16 Illustrations.

FRANÇOIS FENELON. By Viscount St. Cyres. With 12 Illustrations.

Romantic History

Edited by MARTIN HUME, M.A. With Illustrations. Demy 8vo.

A series of attractive volumes in which the periods and personalities selected are such as afford romantic human interest, in addition to their historical importance.

THE FIRST GOVERNESS OF THE NETHERLANDS, MARGARET OF AUSTRIA. By Eleanor E. Tremayne. 10s. 6d. net.

TWO ENGLISH QUEENS AND PHILIP. By Martin Hume, M.A. 15s. net.

THE NINE DAYS' QUEEN. By Richard Davey. With a Preface by Martin Hume, M.A. With 12 Illustrations. 10s. 6d. net.

School Examination Series

Edited by A. M. M. STEDMAN, M.A. Crown 8vo. 2s. 6d.

EXAMINATION PAPERS IN ENGLISH HISTORY. By J. Tait Plowden-Wardlaw, B.A.

FRENCH EXAMINATION PAPERS. By A. M. M. Stedman, M.A. Fifteenth Edition.

KEY. Sixth Edition. 6s. net.

GENERAL KNOWLEDGE EXAMINATION PAPERS. By A. M. M. Stedman, M.A. Sixth Edition.

KEY. Fourth Edition. 7s. net.

GERMAN EXAMINATION PAPERS. By R. J. Morich. Seventh Edition.

KEY. Third Edition. 6s. net.

GREEK EXAMINATION PAPERS. By A. M. M. Stedman, M.A. Ninth Edition.

KEY. Fourth Edition. 6s. net.

HISTORY AND GEOGRAPHY EXAMINATION PAPERS. By C. H. Spence, M.A. Third Edition.

LATIN EXAMINATION PAPERS. By A. M. M. Stedman, M.A. Fourteenth Edition.

KEY. Seventh Edition. 6s. net.

PHYSICS EXAMINATION PAPERS. By R. E. Steel, M.A., F.C.S.

School Histories

Illustrated. Crown 8vo. 1s. 6d.

A SCHOOL HISTORY OF WARWICKSHIRE. By B. C. A. Windle, D.Sc., F.R.S.

A SCHOOL HISTORY OF SOMERSET. By Walter Raymond. Second Edition.

A SCHOOL HISTORY OF LANCASHIRE. By W. E. Rhodes, M.A.

A SCHOOL HISTORY OF SURREY. By H. E. Malden, M.A.

A SCHOOL HISTORY OF MIDDLESEX. By V. G. Plarr, M.A., and F. W. Walton, M.A.

Simplified French Texts

Edited by T. R. N. CROFTS, M.A.

Fcap. 8vo. 1s.

ABDALLAH. By Edouard Laboulaye. Adapted by J. A. Wilson.

DEUX CONTES. By P. Mérimée. Adapted by J. F. Rhoades.

EDMOND DANTÈS. By A. Dumas. Adapted by M. Ceppi.

JEAN VALJEAN. By Victor Hugo. Adapted by F. W. M. Draper, M.A.

LA BATAILLE DE WATERLOO. By Erckmann-Chatrian. Adapted by G. H. Evans.

LA BOUILLIE AU MIEL. By A. Dumas. Adapted by P. B. Ingham, M.A.

LA CHANSON DE ROLAND. Adapted by H. Rieu, M.A. Second Edition.

LE CONSCRIT DE 1813. By Erckmann-Chatrian. Adapted by H. Rieu.

LE DOCTEUR MATHÉUS. By Erckmann-Chatrian. Adapted by W. P. Fuller, M.A.

M. DE BEAUFORT À VINCENNES. By A. Dumas. Adapted by P. B. Ingham, M.A.

L'EQUIPAGE DE LA BELLE-NIVERNAISE. By Alphonse Daudet. Adapted by T. R. N. Crofts, M.A.

L'HISTOIRE D'UNE TULIPE. By A. Dumas. Adapted by T. R. N. Crofts, M.A. Second Edition.

L'HISTOIRE DE PIERRE ET CAMILLE. By A. de Musset. Adapted by J. B. Patterson, M.A.

MÉMOIRES DE CADICHON. By Madam de Ségur. Adapted by J. F. Rhoades.

D'AJACCIO À SAINT HELÈNE. By A. Dumas. Adapted by F. W. M. Draper, M.A.

REMY LE CHEVRIER. By E. Souvestre. Adapted by E. E. Chottin, B-es-L.

Simplified German Texts

Edited by T. R. G. CROFTS, M.A. Fcap. 8vo. 1s.

DER MULLER AM RHEIN. By C. Brentano. Adapted by Florence A. Ryan.

DIE GESCHICHTE VON PETER SCHLEMIHL. By A. v. Chamisso. Adapted by R. C. Perry.

DIE NOTHELFER. By W. H. Riehl. Adapted by P. B. Ingham, M.A.

UNDINE UND HULDBRAND. By La Motte Fouqué. Adapted by T. R. N. Crofts, M.A.

Six Ages of European History

Edited by A. H. JOHNSON, M.A. With Maps. Crown 8vo. 2s. 6d.

AGE OF THE ENLIGHTENED DESPOT, THE, 1660-1789. A. H. Johnson.

CENTRAL PERIOD OF THE MIDDLE AGE, THE, 918-1273. Beatrice A. Lees.

DAWN OF MEDIÆVAL EUROPE, THE, 476-918. J. H. B. Masterman.

END OF THE MIDDLE AGE, THE, 1273-1453. E. C. Lodge.

EUROPE IN RENAISSANCE AND REFORMATION, 1453-1659. M. A. Hollings.

REMAKING OF MODERN EUROPE, THE, 1789-1878. J. A. R. Marriott.

Methuen's Standard Library

Cloth, 1s. net; double volumes, 1s. 6d. net. Paper, 6d. net; double volume, 1s. net.

THE MEDITATIONS OF MARCUS AURELIUS. Translated by R. Graves.

SENSE AND SENSIBILITY. Jane Austen.

ESSAYS AND COUNSELS and THE NEW ATLANTIS. Francis Bacon, Lord Verulam.

RELIGIO MEDICI AND URN BURIAL. Sir Thomas Browne. The text collated by A. R. Waller.

THE PILGRIM'S PROGRESS. John Bunyan.

REFLECTIONS ON THE FRENCH REVOLUTION. Edmund Burke.

THE POEMS AND SONGS OF ROBERT BURNS. Double Volume.

THE ANALOGY OF RELIGION, NATURAL AND REVEALED. Joseph Butler.

MISCELLANEOUS POEMS. T. Chatterton.

THE ROWLEY POEMS. T. Chatterton.

TOM JONES. Henry Fielding. Treble Vol.

CRANFORD. Mrs. Gaskell.

THE POEMS AND PLAYS OF OLIVER GOLDSMITH.

THE CASE IS ALTERED. EVERY MAN IN HIS HUMOUR. EVERY MAN OUT OF HIS HUMOUR. Ben Jonson.

CYNTHIA'S REVELS. POETASTER. Ben Jonson.

THE POEMS OF JOHN KEATS. Double volume. The Text has been collated by E. de Sélincourt.

ON THE IMITATION OF CHRIST. By Thomas à Kempis. Translation by C. Bigg.

A SERIOUS CALL TO A DEVOUT AND HOLY LIFE. W. Law.

PARADISE LOST. John Milton.

EIKONOKLASTES AND THE TENURE OF KINGS AND MAGISTRATES. John Milton.

UTOPIA AND POEMS. Sir Thomas More.

THE REPUBLIC OF PLATO. Translated by Sydenham and Taylor. Double Volume. Translation revised by W. H. D. Rouse.

THE LITTLE FLOWERS OF ST. FRANCIS. Translated by W. Heywood.

THE WORKS OF WILLIAM SHAKESPEARE. In 10 volumes.

THE POEMS OF PERCY BYSSHE SHELLEY. In 4 volumes. With Introductions by C. D. Locock.

THE LIFE OF NELSON. Robert Southey.

THE NATURAL HISTORY AND ANTIQUITIES OF SELBORNE. Gilbert White.

Textbooks of Science

Edited by G. F. GOODCHILD, M.A., B.Sc., and G. R. MILLS, M.A.

Fully Illustrated.

COMPLETE SCHOOL CHEMISTRY, THE. By F. M. Oldham, B.A. With 126 Illustrations. Third Edition. Cr. 8vo. 4s. 6d.

ELEMENTARY SCIENCE FOR PUPIL TEACHERS. PHYSICS SECTION. By W. T. Clough, A.R.C.Sc. (Lond.), F.C.S. CHEMISTRY SECTION. By A. E. Dunstan, B.Sc. (Lond.), F.C.S. With 2 Plates and 10 Diagrams. Cr. 8vo. 2s.

EXAMPLES IN ELEMENTARY MECHANICS, Practical, Graphical, and Theoretical. By W. J. Dobbs, M.A. With 52 Diagrams. Cr. 8vo. 5s.

EXAMPLES IN PHYSICS. By C. E. Jackson, M.A. Cr. 8vo. 2s. 6d.

FIRST YEAR PHYSICS. By C. E. Jackson, M.A. With 51 Diagrams. Cr. 8vo. 1s. 6d.

OUTLINES OF PHYSICAL CHEMISTRY. By George Senter, B.Sc. (Lond.), Ph.D. With many Diagrams. Cr. 8vo. 3s. 6d.

ORGANIC CHEMISTRY, AN, FOR SCHOOLS AND TECHNICAL INSTITUTES. By A. E. Dunstan, B.Sc. (Lond.), F.C.S. With many Illustrations. Cr. 8vo. 2s. 6d.

PLANT LIFE, Studies in Garden and School. By Horace F. Jones, F.C.S. With 320 Illustrations. Cr. 8vo. 3s. 6d.

PRACTICAL CHEMISTRY. Part I. W. French, M.A. Fifth Edition. Cr. 8vo. 1s. 6d.

PRACTICAL CHEMISTRY. Part II. W. French, M.A., and T. H. Boardman, M.A. Cr. 8vo. 1s. 6d.

*PRACTICAL CHEMISTRY FOR SCHOOLS AND TECHNICAL INSTITUTES, A. By A. E. Dunstan, B.Sc. (Sheffield and Lond.), F.C.S. Cr. 8vo. 3s. 6d.

PRACTICAL MECHANICS. S. H. Wells. Fourth Edition. Cr. 8vo. 3s. 6d.

TECHNICAL ARITHMETIC AND GEOMETRY. By C. T. Millis, M.I.M.E. Cr. 8vo. 3s. 6d.

Textbooks of Technology

Fully Illustrated.

BUILDERS' QUANTITIES. By H. C. Grubb. Cr. 8vo. 4s. 6d.

CARPENTRY AND JOINERY. By F. C. Webber. Fifth Edition. Cr. 8vo. 3s. 6d.

ELECTRIC LIGHT AND POWER: An Introduction to the Study of Electrical Engineering. By E. E. Brooks, B.Sc. (Lond.), and W. H. N. James, A.M.I.E.E., A.R.C.Sc. Cr. 8vo. 4s. 6d.

ENGINEERING WORKSHOP PRACTICE. By C. C. Allen. Cr. 8vo. 3s. 6d.

HOW TO MAKE A DRESS. By J. A. E. Wood. Fourth Edition. Cr. 8vo. 1s. 6d.

INSTRUCTION IN COOKERY. A. P. Thomson. Cr. 8vo. 2s. 6d.

INTRODUCTION TO THE STUDY OF TEXTILE DESIGN, AN. By Aldred F. Barker. Demy 8vo. 7s. 6d.

MILLINERY, THEORETICAL AND PRACTICAL. By Clare Hill. Fifth Edition. Cr. 8vo. 2s.

RÉPOUSSÉ METAL WORK. By A. C. Horth. Cr. 8vo. 2s. 6d.

Handbooks of Theology

THE DOCTRINE OF THE INCARNATION. By R. L. Ottley, D.D. Fourth Edition revised. Demy 8vo. 12s. 6d.

A HISTORY OF EARLY CHRISTIAN DOCTRINE. By J. F. Bethune-Baker, M.A. Demy 8vo. 10s. 6d.

AN INTRODUCTION TO THE HISTORY OF RELIGION. By. F. B. Jevons, M.A., Litt.D. Fourth Edition. Demy 8vo. 10s. 6d.

AN INTRODUCTION TO THE HISTORY OF THE CREEDS. By A. E. Burn, D.D. Demy 8vo. 10s. 6d.

THE PHILOSOPHY OF RELIGION IN ENGLAND AND AMERICA. By Alfred Caldecott, D.D. Demy 8vo. 10s. 6d.

THE XXXIX. ARTICLES OF THE CHURCH OF ENGLAND. Edited by E. C. S. Gibson, D.D. Sixth Edition. Demy 8vo. 12s. 6d.

The Westminster Commentaries

General Editor, WALTER LOCK, D.D., Warden of Keble College, Dean Ireland's Professor of Exegesis in the University of Oxford.

THE ACTS OF THE APOSTLES. Edited by R. B. Rackham, M.A. Demy 8vo. Fourth Edition. 10s. 6d.

THE FIRST EPISTLE OF PAUL THE APOSTLE TO THE CORINTHIANS. Edited by H. L. Goudge, M.A. Second Ed. Demy 8vo. 6s.

A COMMENTARY ON EXODUS. By A. H. M'Neile, B.D. With a Map and 3 Plans. Demy 8vo. 10s. 6d.

THE BOOK OF EZEKIEL. Edited H. A. Redpath, M.A., D.Litt. Demy 8vo. 10s. 6d.

THE BOOK OF GENESIS. Edited with Introduction and Notes by S. R. Driver, D.D. Seventh Edition. Demy 8vo. 10s. 6d.

Also, to be obtained separately, Additions and Corrections in the Seventh Edition of the Book of Genesis. Demy 8vo. 1s.

THE BOOK OF JOB. Edited by E. C. S. Gibson, D.D. Second Edition. Demy 8vo. 6s.

THE EPISTLE OF ST. JAMES. Edited with Introduction and Notes by R. J. Knowling, D.D. Demy 8vo. 6s.

PART II.—FICTION

Albanesi (E. Maria). SUSANNAH AND ONE OTHER. Fourth Edition. Cr. 8vo. 6s.

THE BLUNDER OF AN INNOCENT. Second Edition. Cr. 8vo. 6s.

CAPRICIOUS CAROLINE. Second Edition. Cr. 8vo. 6s.

LOVE AND LOUISA. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

PETER, A PARASITE. Cr. 8vo. 6s.

THE BROWN EYES OF MARY. Third Edition. Cr. 8vo. 6s.

I KNOW A MAIDEN. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE INVINCIBLE AMELIA: THE POLITE ADVENTURESS. Third Edition. Cr. 8vo. 3s. 6d.

Annesley (Maude). THIS DAY'S MADNESS. Second Edition. Cr. 8vo. 6s.

Anstey (F.). A BAYARD FROM BENGAL. Medium 8vo. 6d.

Austen (Jane). PRIDE AND PREJUDICE. Medium 8vo. 6d.

Aveling (Francis). ARNOUL THE ENGLISHMAN. Cr. 8vo. 6s.

Bagot (Richard). A ROMAN MYSTERY. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE PASSPORT. Fourth Edition. Cr. 8vo.

TEMPTATION. Fifth Edition. Cr. 8vo. 6s.

ANTHONY CUTHBERT. Fourth Edition. Cr. 8vo. 6s.

LOVE'S PROXY. A New Edition. Cr. 8vo. 6s.

DONNA DIANA. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

CASTING OF NETS. Twelfth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Balfour (Andrew). BY STROKE OF SWORD. Medium 8vo. 6d.

Ball (Oona H.) (Barbara Burke). THEIR OXFORD YEAR. With 16 Illustrations Cr. 8vo. 6s.

BARBARA GOES TO OXFORD. With 16 Illustrations. Third Edition. Cr. 8vo. 6s.

Baring-Gould (S.). ARMINELL. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

URITH. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

IN THE ROAR OF THE SEA. Seventh Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

CHEAP JACK ZITA. Medium 8vo. 6d.

MARGERY OF QUETHER. Third Edition. Cr. 8vo. 6s.

THE QUEEN OF LOVE. Fifth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

JACQUETTA. Third Edition. Cr. 8vo. 6s.

KITTY ALONE. Fifth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

NOÉMI. Illustrated. Fourth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE BROOM-SQUIRE. Illustrated. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

DARTMOOR IDYLLS. Cr. 8vo. 6s.

GUAVAS THE TINNER. Illustrated. Second Edition. Cr. 8vo. 6s.

BLADYS OF THE STEWPONEY. Illustrated. Second Edition. Cr. 8vo. 6s.

PABO THE PRIEST. Cr. 8vo. 6s.

WINEFRED. Illustrated. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

ROYAL GEORGIE. Illustrated. Cr. 8vo. 6s.

CHRIS OF ALL SORTS. Cr. 8vo. 6s.

IN DEWISLAND. Second Ed. Cr. 8vo. 6s.

THE FROBISHERS. Crown 8vo. 6s.

Also Medium 8vo. 6d.

DOMITIA. Illus. Second Ed. Cr. 8vo. 6s.

MRS. CURGENVEN OF CURGENVEN. Crown 8vo. 6s.

LITTLE TU'PENNY. Medium 8vo. 6d.

FURZE BLOOM. Medium 8vo. 6d.

Barnett (Edith A.). A WILDERNESS WINNER. Second Edition. Cr. 8vo. 6s.

Barr (James). LAUGHING THROUGH A WILDERNESS. Cr. 8vo. 6s.

Barr (Robert). IN THE MIDST OF ALARMS. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE COUNTESS TEKLA. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE MUTABLE MANY. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE TEMPESTUOUS PETTICOAT. Illustrated. Third Edition. Cr. 8vo. 6s.

JENNIE BAXTER JOURNALIST. Medium 8vo. 6d.

Begbie (Harold). THE CURIOUS AND DIVERTING ADVENTURES OF SIR JOHN SPARROW; or, THE PROGRESS OF AN OPEN MIND. With a Frontispiece. Second Edition. Cr. 8vo. 6s.

Belloc (H.). EMMANUEL BURDEN, MERCHANT. With 36 Illustrations by G. K. CHESTERTON. Second Ed. Cr. 8vo. 6s.

A CHANGE IN THE CABINET. Third Edition. Cr. 8vo. 6s.

Benson (E. F.). DODO: A DETAIL OF THE DAY. Fifteenth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE VINTAGE. Medium 8vo. 6d.

Benson (Margaret). SUBJECT TO VANITY. Cr. 8vo. 3s. 6d.

Birmingham (George A.). THE BAD TIMES. Second Edition. Cr. 8vo. 6s.

SPANISH GOLD. Fourth Edition. Cr. 8vo. 6s.

THE SEARCH PARTY. Third Edition. Cr. 8vo. 6s.

Bowles (G. Stewart). A GUN-ROOM DITTY BOX. Second Ed. Cr. 8vo. 1s. 6d.

Bretherton (Ralph Harold). THE MILL. Cr. 8vo. 6s.

AN HONEST MAN. Second Edition. Cr. 8vo. 6s.

Brontë (Charlotte). SHIRLEY. Medium 8vo. 6d.

Burton (J. Bloundelle). ACROSS THE SALT SEAS. Medium 8vo. 6d.

Caffyn (Mrs.) ('Iota'). ANNE MAULEVERER. Medium 8vo. 6d.

Campbell (Mrs. Vere). FERRIBY. Second Edition. Cr. 8vo. 6s.

Capes (Bernard). THE EXTRAORDINARY CONFESSIONS OF DIANA PLEASE. Third Edition. Cr. 8vo. 6s.

A JAY OF ITALY. Fourth Ed. Cr. 8vo. 6s.

LOAVES AND FISHES. Second Edition. Cr. 8vo. 6s.

A ROGUE'S TRAGEDY. Second Edition. Cr. 8vo. 6s.

THE GREAT SKENE MYSTERY. Second Edition. Cr. 8vo. 6s.

THE LOVE STORY OF ST. BEL. Second Edition. Cr. 8vo. 6s.

THE LAKE OF WINE. Medium 8vo. 6d.

Carey (Wymond). LOVE THE JUDGE. Second Edition. Cr. 8vo. 6s.

Castle (Agnes and Egerton). FLOWER O' THE ORANGE, and Other Tales. With a Frontispiece in Colour by A. H. Buckland. Third Edition. Cr. 8vo. 6s.

Charlton (Randal). MAVE. Second Edition. Cr. 8vo. 6s.

THE VIRGIN WIDOW. Cr. 8vo. 6s.

Chesney (Weatherby). THE MYSTERY OF A BUNGALOW. Second Edition. Cr. 8vo. 6s.

Clifford (Mrs. W. K.). THE GETTING WELL OF DOROTHY. Illustrated by GORDON BROWNE. Second Edition. Cr. 8vo. 3s. 6d.

A FLASH OF SUMMER. Medium 8vo. 6d.

MRS. KEITH'S CRIME. Medium 8vo. 6d.

Conrad (Joseph). THE SECRET AGENT: A Simple Tale. Fourth Ed. Cr. 8vo. 6s.

A SET OF SIX. Fourth Edition. Cr. 8vo. 6s.

Corbett (Julian). A BUSINESS IN GREAT WATERS. Third Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Corelli (Marie). A ROMANCE OF TWO WORLDS. Twenty-Ninth Ed. Cr. 8vo. 6s.

VENDETTA. Twenty-Seventh Edition. Cr. 8vo. 6s.

THELMA. Thirty-Ninth Ed. Cr. 8vo. 6s.

ARDATH: THE STORY OF A DEAD SELF. Nineteenth Edition. Cr. 8vo. 6s.

THE SOUL OF LILITH. Sixteenth Edition. Cr. 8vo. 6s.

WORMWOOD. Sixteenth Ed. Cr. 8vo. 6s.

BARABBAS: A DREAM OF THE WORLD'S TRAGEDY. Forty-Fourth Edition. Cr. 8vo. 6s.

THE SORROWS OF SATAN. Fifty-Fifth Edition. Cr. 8vo. 6s.

THE MASTER CHRISTIAN. Twelfth Edition. 177th Thousand. Cr. 8vo. 6s.

TEMPORAL POWER: A STUDY IN SUPREMACY. Second Edition. 150th Thousand. Cr. 8vo. 6s.

GOD'S GOOD MAN: A SIMPLE LOVE STORY. Thirteenth Edition. 150th Thousand. Cr. 8vo. 6s.

HOLY ORDERS: THE TRAGEDY OF A QUIET LIFE. Second Edition. 120th Thousand. Crown 8vo. 6s.

THE MIGHTY ATOM. Twenty-seventh Edition. Cr. 8vo. 6s.

BOY: a Sketch. Eleventh Edition. Cr. 8vo. 6s.

CAMEOS. Thirteenth Edition. Cr. 8vo. 6s.

Cotes (Mrs. Everard). See Duncan (Sara Jeannette).

Cotterell (Constance). THE VIRGIN AND THE SCALES. Illustrated. Second Edition. Cr. 8vo. 6s.

Crockett (S. R.). LOCHINVAR. Illustrated. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE STANDARD BEARER. Cr. 8vo. 6s.

Croker (Mrs. B. M.). THE OLD CANTONMENT. Cr. 8vo. 6s.

JOHANNA. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE HAPPY VALLEY. Fourth Edition. Cr. 8vo. 6s.

A NINE DAYS' WONDER. Third Edition. Cr. 8vo. 6s.

PEGGY OF THE BARTONS. Seventh Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

ANGEL. Fifth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

A STATE SECRET. Third Edition. Cr. 8vo. 3s. 6d. Also Medium 8vo. 6d.

KATHERINE THE ARROGANT. Fifth Edition. Cr. 8vo. 6s.

Crosbie (Mary). DISCIPLES. Second Ed. Cr. 8vo. 6s.

Cuthell (Edith E.). ONLY A GUARD-ROOM DOG. Illustrated by W. PARKINSON. Crown 8vo. 3s. 6d.

Dawson (Warrington). THE SCAR. Second Edition. Cr. 8vo. 6s.

THE SCOURGE. Cr. 8vo. 6s.

Deakin (Dorothea). THE YOUNG COLUMBINE. With a Frontispiece by LEWIS BAUMER. Cr. 8vo. 6s.

Deane (Mary). THE OTHER PAWN. Cr. 8vo. 6s.

Doyle (A. Conan). ROUND THE RED LAMP. Eleventh Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Dumas (Alexandre). See page 46.

Duncan (Sara Jeannette) (Mrs. Everard Cotes). THOSE DELIGHTFUL AMERICANS. Medium 8vo. 6d.

A VOYAGE OF CONSOLATION. Illustrated. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

COUSIN CINDERELLA. Second Edition. Cr. 8vo. 6s.

THE BURNT OFFERING. Second Edition. Cr. 8vo. 6s.

Eldridge (George D.). IN THE POTTER'S HOUSE. Cr. 8vo. 6s.

Eliot (George). THE MILL ON THE FLOSS. Medium 8vo. 6d.

Erskine (Mrs. Steuart). THE MAGIC PLUMES. Cr. 8vo. 6s.

Fenn (G. Manville). SYD BELTON; or, The Boy who would not go to Sea. Illustrated by GORDON BROWNE. Second Ed. Cr. 8vo. 3s. 6d.

Findlater (J. H.). THE GREEN GRAVES OF BALGOWRIE. Fifth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE LADDER TO THE STARS. Second Edition. Cr. 8vo. 6s.

Findlater (Mary). A NARROW WAY. Third Edition. Cr. 8vo. 6s.

OVER THE HILLS. Second Edition. Cr. 8vo. 6s.

THE ROSE OF JOY. Third Edition. Cr. 8vo. 6s.

A BLIND BIRD'S NEST. With 8 Illustrations. Second Edition. Cr. 8vo. 6s.

Fitzpatrick (K.). THE WEANS AT ROWALLAN. Illustrated. Second Edition. Cr. 8vo. 6s.

Francis (M. E.). (Mrs. Francis Blundell). STEPPING WESTWARD. Second Edition. Cr. 8vo. 6s.

MARGERY O' THE MILL. Third Edition. Cr. 8vo. 6s.

HARDY-ON-THE-HILL. Third Edition. Cr. 8vo. 6s.

GALATEA OF THE WHEATFIELD. Second Edition. Cr. 8vo. 6s.

Fraser (Mrs. Hugh). THE SLAKING OF THE SWORD. Second Edition. Cr. 8vo. 6s.

IN THE SHADOW OF THE LORD. Third Edition. Crown 8vo. 6s.

GIANNELLA. Second Edition. Cr. 8vo. 6s.

Fry (B. and C. B.). A MOTHER'S SON. Fifth Edition. Cr. 8vo. 6s.

Fuller-Maitland (Ella). BLANCHE ESMEAD. Second Edition. Cr. 8vo. 6s.

Gallon (Tom). RICKERBY'S FOLLY. Medium 8vo. 6d.

Gaskell (Mrs.). CRANFORD. Medium 8vo. 6d.

MARY BARTON. Medium 8vo. 6d.

NORTH AND SOUTH. Medium 8vo. 6d.

Gates (Eleanor). THE PLOW-WOMAN. Cr. 8vo. 6s.

Gerard (Dorothea). HOLY MATRIMONY. Medium 8vo. 6d.

MADE OF MONEY. Medium 8vo. 6d.

THE IMPROBABLE IDYL. Third Edition. Cr. 8vo. 6s.

THE BRIDGE OF LIFE. Cr. 8vo. 6s.

THE CONQUEST OF LONDON. Medium 8vo. 6d.

Gibbs (Philip). THE SPIRIT OF REVOLT. Second Edition. Cr. 8vo. 6s.

Gissing (George). THE TOWN TRAVELLER. Medium 8vo. 6d.

THE CROWN OF LIFE. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Glanville (Ernest). THE INCA'S TREASURE. Illustrated. Cr. 8vo. 3s. 6d.

Also Medium 8vo. 6d.

THE KLOOF BRIDE. Medium 8vo. 6d.

Gleig (Charles). BUNTER'S CRUISE. Illustrated. Cr. 8vo. 3s. 6d.

Also Medium 8vo. 6d.

Grimm (The Brothers). GRIMM'S FAIRY TALES. Illustrated. Medium 8vo. 6d.

Haig (J. C.). IN THE GRIP OF THE TRUSTS: A STORY OF 1914. Cr. 8vo. 1s. net.

Hamilton (M.). THE FIRST CLAIM. Second Edition. Cr. 8vo. 6s.

Harraden (Beatrice). IN VARYING MOODS. Fourteenth Edition. Cr. 8vo. 6s.

THE SCHOLAR'S DAUGHTER. Fourth Edition. Cr. 8vo. 6s.

HILDA STRAFFORD and THE REMITTANCE MAN. Twelfth Ed. Cr. 8vo. 6s.

INTERPLAY. Fifth Edition. Cr. 8vo. 6s.

Harrod (F.) (Frances Forbes Robertson). THE TAMING OF THE BRUTE. Cr. 8vo. 6s.

Hart (Mabel). SISTER K. Second Edition. Cr. 8vo. 6s.

Hichens (Robert). THE PROPHET OF BERKELEY SQUARE. Second Edition. Cr. 8vo. 6s.

TONGUES OF CONSCIENCE. Third Edition. Cr. 8vo. 6s.

FELIX. Sixth Edition. Cr. 8vo. 6s.

THE WOMAN WITH THE FAN. Seventh Edition. Cr. 8vo. 6s.

BYEWAYS. Cr. 8vo. 6s.

THE GARDEN OF ALLAH. Eighteenth Edition. Cr. 8vo. 6s.

THE BLACK SPANIEL. Cr. 8vo. 6s.

THE CALL OF THE BLOOD. Seventh Edition. Cr. 8vo. 6s.

BARBARY SHEEP. Second Edition. Cr. 8vo. 3s. 6d.

Hope (Anthony). THE GOD IN THE CAR. Eleventh Edition. Cr. 8vo. 6s.

A CHANGE OF AIR. Sixth Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

A MAN OF MARK. Sixth Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE CHRONICLES OF COUNT ANTONIO. Sixth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

PHROSO. Illustrated by H. R. MILLAR. Eighth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

SIMON DALE. Illustrated. Eighth Edition. Cr. 8vo. 6s.

THE KING'S MIRROR. Fourth Edition. Cr. 8vo. 6s.

QUISANTE. Fourth Edition. Cr. 8vo. 6s.

THE DOLLY DIALOGUES. Cr. 8vo. 6s. Also Medium 8vo. 6d.

A SERVANT OF THE PUBLIC. Illustrated. Fourth Edition. Cr. 8vo. 6s.

TALES OF TWO PEOPLE. With a Frontispiece by A. H. BUCKLAND. Third Ed. Cr. 8vo. 6s.

THE GREAT MISS DRIVER. With a Frontispiece by A. H. BUCKLAND. Fourth Edition. Cr. 8vo. 6s.

Hornung (E. W.). DEAD MEN TELL NO TALES. Medium 8vo. 6d.

Housman (Clemence). THE LIFE OF SIR AGLOVALE DE GALIS. Cr. 8vo. 6s.

Hueffer (Ford Madox). AN ENGLISH GIRL: A ROMANCE. Second Edition. Cr. 8vo. 6s.

MR. APOLLO: A JUST POSSIBLE STORY. Second Edition. Cr. 8vo. 6s.

Hutten (Baroness von). THE HALO. Fifth Edition. Cr. 8vo. 6s.

Hyne (C. J. Cutcliffe). MR. HORROCKS, PURSER. Fifth Edition. Cr. 8vo. 6s.

PRINCE RUPERT, THE BUCCANEER. Illustrated. Third Edition. Cr. 8vo. 6s.

Ingraham (J. H.). THE THRONE OF DAVID. Medium 8vo. 6d.

Jacobs (W. W.). MANY CARGOES. Thirty-first Edition. Cr. 8vo. 3s. 6d.

SEA URCHINS. Fifteenth Edition. Cr. 8vo. 3s. 6d.

A MASTER OF CRAFT. Illustrated by WILL OWEN. Ninth Edition. Cr. 8vo. 3s. 6d.

LIGHT FREIGHTS. Illustrated by WILL OWEN and Others. Eighth Edition. Cr. 8vo. 3s. 6d.

THE SKIPPER'S WOOING. Ninth Edition. Cr. 8vo. 3s. 6d.

AT SUNWICH PORT. Illustrated by WILL OWEN. Ninth Edition. Cr. 8vo. 3s. 6d.

DIALSTONE LANE. Illustrated by WILL OWEN. Seventh Edition. Cr. 8vo. 3s. 6d.

ODD CRAFT. Illustrated by WILL OWEN. Third Edition. Cr. 8vo. 3s. 6d.

THE LADY OF THE BARGE. Illustrated. Eighth Edition. Cr. 8vo. 3s. 6d.

SALTHAVEN. Illustrated by WILL OWEN. Second Edition. Cr. 8vo. 3s. 6d.

SAILORS' KNOTS. Illustrated by WILL OWEN. Second Edition. Cr. 8vo. 3s. 6d.

James (Henry). THE SOFT SIDE. Second Edition. Cr. 8vo. 6s.

THE BETTER SORT. Cr. 8vo. 6s.

THE GOLDEN BOWL. Third Edition. Cr. 8vo. 6s.

Keays (H. A. Mitchell). HE THAT EATETH BREAD WITH ME. Cr. 8vo. 6s.

Kester (Vaughan). THE FORTUNES OF THE LANDRAYS. Cr. 8vo. 6s.

Lawless (Hon. Emily). WITH ESSEX IN IRELAND. Cr. 8vo. 6s.

Le Queux (William). THE HUNCHBACK OF WESTMINSTER. Third Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE CLOSED BOOK. Third Edition. Cr. 8vo. 6s.

THE VALLEY OF THE SHADOW. Illustrated. Third Edition. Cr. 8vo. 6s.

BEHIND THE THRONE. Third Edition. Cr. 8vo. 6s.

THE CROOKED WAY. Second Edition. Cr. 8vo. 6s.

Levett-Yeats (S. K.). ORRAIN. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE TRAITOR'S WAY. Medium 8vo. 6d.

Linton (E. Lynn). THE TRUE HISTORY OF JOSHUA DAVIDSON. Medium 8vo. 6d.

London (Jack). WHITE FANG. With a Frontispiece by CHARLES RIVINGSTON BULL. Seventh Edition. Cr. 8vo. 6s.

Lubbock (Basil). DEEP SEA WARRIORS. With 4 Illustrations. Third Edition. Cr. 8vo. 6s.

Lucas (St. John). THE FIRST ROUND. Second Edition. Cr. 8vo. 6s.

Lyall (Edna). DERRICK VAUGHAN, NOVELIST. 43rd Thousand. Cr. 8vo. 3s. 6d. Also Medium 8vo. 6d.

Maartens (Maarten). THE NEW RELIGION: A Modern Novel. Third Edition. Cr. 8vo. 6s.

THE PRICE OF LIS DORIS. Second Edition. Cr. 8vo. 6s.

BROTHERS ALL; MORE STORIES OF DUTCH PEASANT LIFE. Third Edition. Cr. 8vo. 6s.

M'Carthy (Justin H.). THE LADY OF LOYALTY HOUSE. Illustrated. Third Edition. Cr. 8vo. 6s.

THE DRYAD. Second Edition. Cr. 8vo. 6s.

THE DUKE'S MOTTO. Third Edition. Cr. 8vo. 6s.

Macdonald (Ronald). A HUMAN TRINITY. Second Edition. Cr. 8vo. 6s.

Macnaughtan (S.). THE FORTUNE OF CHRISTINA M'NAB. Fifth Edition. Cr. 8vo. 6s.

Malet (Lucas). COLONEL ENDERBY'S WIFE. Fourth Edition. Cr. 8vo. 6s.

A COUNSEL OF PERFECTION. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE WAGES OF SIN. Sixteenth Edition. Cr. 8vo. 6s.

THE CARISSIMA. Fifth Ed. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE GATELESS BARRIER. Fifth Edition. Cr. 8vo. 6s.

THE HISTORY OF SIR RICHARD CALMADY. Seventh Edition. Cr. 8vo. 6s.

Mann (Mrs. M. E.). OLIVIA'S SUMMER. Second Edition. Cr. 8vo. 6s.

A LOST ESTATE. A New Ed. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE PARISH OF HILBY. A New Edition. Cr. 8vo. 6s.

THE PARISH NURSE. Fourth Edition. Cr. 8vo. 6s.

GRAN'MA'S JANE. Cr. 8vo. 6s.

MRS. PETER HOWARD. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

A WINTER'S TALE. A New Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

ONE ANOTHER'S BURDENS. A New Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

ROSE AT HONEYPOT. Third Ed. Cr. 8vo. 6s.

THERE WAS ONCE A PRINCE. Illustrated by M. B. MANN. Cr. 8vo. 3s. 6d.

WHEN ARNOLD COMES HOME. Illustrated by M. B. MANN. Cr. 8vo. 3s. 6d.

THE EGLAMORE PORTRAITS. Third Edition. Cr. 8vo. 6s.

THE MEMORIES OF RONALD LOVE. Cr. 8vo. 6s.

THE SHEEP AND THE GOATS. Third Edition. Cr. 8vo. 6s.

A SHEAF OF CORN. Second Edition. Cr. 8vo. 6s.

THE HEART-SMITER. Second Edition. Cr. 8vo. 6s.

AVENGING CHILDREN. Second Edition. Cr. 8vo. 6s.

THE PATTEN EXPERIMENT. Medium 8vo. 6d.

THE CEDAR STAR. Medium 8vo. 6d.

Marchmont (A. W.). MISER HOADLEY'S SECRET. Medium 8vo. 6d.

A MOMENT'S ERROR. Medium 8vo. 6d.

Marriott (Charles). GENEVRA. Second Edition. Cr. 8vo. 6s.

Marryat (Captain). PETER SIMPLE. Medium 8vo. 6d.

JACOB FAITHFUL. Medium 8vo. 6d.

Marsh (Richard). THE TWICKENHAM PEERAGE. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE MARQUIS OF PUTNEY. Second Edition. Cr. 8vo. 6s.

IN THE SERVICE OF LOVE. Third Edition. Cr. 8vo. 6s.

THE GIRL AND THE MIRACLE. Third Edition. Cr. 8vo. 6s.

THE COWARD BEHIND THE CURTAIN. Cr. 8vo. 6s.

THE SURPRISING HUSBAND. Second Edition. Cr. 8vo. 6s.

A ROYAL INDISCRETION. Second Edition. Cr. 8vo. 6s.

A METAMORPHOSIS. Medium 8vo. 6d.

THE GODDESS. Medium 8vo. 6d.

THE JOSS. Medium 8vo. 6d.

Marshall (Archibald). MANY JUNES. Second Edition. Cr. 8vo. 6s.

THE SQUIRE'S DAUGHTER. Second Edition. Cr. 8vo. 6s.

Mason (A. E. W.). CLEMENTINA. Illustrated. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

Mathers (Helen). HONEY. Fourth Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

GRIFF OF GRIFFITHSCOURT. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE FERRYMAN. Second Edition. Cr. 8vo. 6s.

TALLY-HO! Fourth Edition. Cr. 8vo. 6s.

SAM'S SWEETHEART. Medium 8vo. 6d.

Maud (Constance). A DAUGHTER OF FRANCE. With a Frontispiece. Second Edition. Cr. 8vo. 6s.

Maxwell (W. B.). VIVIEN. Ninth Edition. Cr. 8vo. 6s.

THE RAGGED MESSENGER. Third Edition. Cr. 8vo. 6s.

FABULOUS FANCIES. Cr. 8vo. 6s.

THE GUARDED FLAME. Seventh Edition. Cr. 8vo. 6s.

ODD LENGTHS. Second Ed. Cr. 8vo. 6s.

HILL RISE. Fourth Edition. Cr. 8vo. 6s.

THE COUNTESS OF MAYBURY: BETWEEN YOU AND I. Fourth Edition. Cr. 8vo. 6s.

Meade (L. T.). DRIFT. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

RESURGAM. Second Edition. Cr. 8vo. 6s.

VICTORY. Cr. 8vo. 6s.

A GIRL OF THE PEOPLE. Illustrated. Fourth Edition. Cr. 8vo. 3s. 6d.

HEPSY GIPSY. Illustrated. Cr. 8vo. 2s. 6d.

THE HONOURABLE MISS: A STORY OF AN OLD-FASHIONED TOWN. Illustrated. Second Edition. Cr. 8vo. 3s. 6d.

Melton (R.). CÆSAR'S WIFE. Second Edition. Cr. 8vo. 6s.

Meredith (Ellis). HEART OF MY HEART. Cr. 8vo. 6s.

Miller (Esther). LIVING LIES. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

Mitford (Bertram). THE SIGN OF THE SPIDER. Illustrated. Sixth Edition. Cr. 8vo. 3s. 6d. Also Medium 8vo. 6d.

IN THE WHIRL OF THE RISING. Third Edition. Cr. 8vo. 6s.

THE RED DERELICT. Second Edition. Cr. 8vo. 6s.

Molesworth (Mrs.). THE RED GRANGE. Illustrated. Second Edition. Cr. 8vo. 3s. 6d.

Montgomery (K. L.). COLONEL KATE. Second Edition. Cr. 8vo. 6s.

Montresor (F. F.). THE ALIEN. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

Morrison (Arthur). TALES OF MEAN STREETS. Seventh Edition. Cr. 8vo. 6s.

A CHILD OF THE JAGO. Fifth Edition. Cr. 8vo. 6s.

THE HOLE IN THE WALL. Fourth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

TO LONDON TOWN. Second Ed. Cr. 8vo. 6s.

DIVERS VANITIES. Cr. 8vo. 6s.

Nesbit (E.). (Mrs. H. Bland). THE RED HOUSE. Illustrated. Fourth Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Noble (Edward). LORDS OF THE SEA. Second Edition. Cr. 8vo. 6s.

Norris (W. E.). HARRY AND URSULA: A STORY WITH TWO SIDES TO IT. Second Edition. Cr. 8vo. 6s.

HIS GRACE. Medium 8vo. 6d.

GILES INGILBY. Medium 8vo. 6d.

THE CREDIT OF THE COUNTY. Medium 8vo. 6d.

LORD LEONARD THE LUCKLESS. Medium 8vo. 6d.

MATTHEW AUSTIN. Medium 8vo. 6d.

CLARISSA FURIOSA. Medium 8vo. 6d.

Oliphant (Mrs.). THE LADY'S WALK. Medium 8vo. 6d.

SIR ROBERT'S FORTUNE. Medium 8vo. 6d.

THE PRODIGALS. Medium 8vo. 6d.

THE TWO MARYS. Medium 8vo. 6d.

Ollivant (Alfred). OWD BOB, THE GREY DOG OF KENMUIR. With a Frontispiece. Eleventh Ed. Cr. 8vo. 6s.

Oppenheim (E. Phillips). MASTER OF MEN. Fourth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

Oxenham (John). A WEAVER OF WEBS. With 8 Illustrations by MAURICE GREIFFENHAGEN. Fourth Edition. Cr. 8vo. 6s.

THE GATE OF THE DESERT. With a Frontispiece in Photogravure by HAROLD COPPING. Fifth Edition. Cr. 8vo. 6s.

PROFIT AND LOSS. With a Frontispiece in Photogravure by HAROLD COPPING. Fourth Edition. Cr. 8vo. 6s.

THE LONG ROAD. With a Frontispiece in Photogravure by HAROLD COPPING. Fourth Edition. Cr. 8vo. 6s.

THE SONG OF HYACINTH, AND OTHER STORIES. Second Edition. Cr. 8vo. 6s.

MY LADY OF SHADOWS. Fourth Edition. Cr. 8vo. 6s.

Pain (Barry). LINDLEY KAYS. Third Edition. Cr. 8vo. 6s.

Parker (Gilbert). PIERRE AND HIS PEOPLE. Sixth Edition. Cr. 8vo. 6s.

MRS. FALCHION. Fifth Edition. Cr. 8vo. 6s.

THE TRANSLATION OF A SAVAGE. Third Edition. Cr. 8vo. 6s.

THE TRAIL OF THE SWORD. Illustrated. Tenth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

WHEN VALMOND CAME TO PONTIAC: The Story of a Lost Napoleon. Sixth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

AN ADVENTURER OF THE NORTH. The Last Adventures of 'Pretty Pierre.' Fourth Edition. Cr. 8vo. 6s.

THE SEATS OF THE MIGHTY. Illustrated. Sixteenth Edition. Cr. 8vo. 6s.

THE BATTLE OF THE STRONG: a Romance of Two Kingdoms. Illustrated. Sixth Edition. Cr. 8vo. 6s.

THE POMP OF THE LAVILETTES. Third Edition. Cr. 8vo. 3s. 6d.

Also Medium 8vo. 6d.

NORTHERN LIGHTS. Third Edition. Cr. 8vo. 6s.

Pasture (Mrs. Henry de la). THE TYRANT. Second Edition. Cr. 8vo. 6s.

Patterson (J. E.). WATCHERS BY THE SHORE. Third Edition. Cr. 8vo. 6s.

Pemberton (Max). THE FOOTSTEPS OF A THRONE. Illustrated. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

I CROWN THEE KING. With Illustrations by Frank Dadd and A. Forrestier. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

LOVE THE HARVESTER: A STORY OF THE SHIRES. Illustrated. Third Edition. Cr. 8vo. 3s. 6d.

Phillpotts (Eden). LYING PROPHETS. Third Edition. Cr. 8vo. 6s.

CHILDREN OF THE MIST. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE HUMAN BOY. With a Frontispiece. Sixth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

SONS OF THE MORNING. Second Edition. Cr. 8vo. 6s.

THE RIVER. Third Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE AMERICAN PRISONER. Fourth Edition. Cr. 8vo. 6s.

THE SECRET WOMAN. Fourth Edition. Cr. 8vo. 6s.

KNOCK AT A VENTURE. With a Frontispiece. Third Edition. Cr. 8vo. 6s.

THE PORTREEVE. Fourth Ed. Cr. 8vo. 6s.

THE POACHER'S WIFE. Second Edition. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE STRIKING HOURS. Second Edition. Crown 8vo. 6s.

THE FOLK AFIELD. Crown 8vo. 6s.

Pickthall (Marmaduke). SAÏD THE FISHERMAN. Seventh Ed. Cr. 8vo. 6s.

BRENDLE. Second Edition. Cr. 8vo. 6s.

THE HOUSE OF ISLAM. Third Edition. Cr. 8vo. 6s.

'Q' (A. T. Quiller Couch). THE WHITE WOLF. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

THE MAYOR OF TROY. Fourth Edition. Cr. 8vo. 6s.

MERRY-GARDEN, AND OTHER STORIES. Cr. 8vo. 6s.

MAJOR VIGOUREUX. Third Edition. Cr. 8vo. 6s.

Querido (Israel). TOIL OF MEN. Translated by F. S. ARNOLD. Cr. 8vo. 6s.

Rawson (Maud Stepney). THE ENCHANTED GARDEN. Fourth Edition. Cr. 8vo. 6s.

THE EASY GO LUCKIES: OR, ONE WAY OF LIVING. Second Edition. Cr. 8vo. 6s.

HAPPINESS. Second Edition. Cr. 8vo. 6s.

Rhys (Grace). THE WOOING OF SHEILA. Second Edition. Cr. 8vo. 6s.

THE BRIDE. Cr. 8vo. 6s.

Ridge (W. Pett). LOST PROPERTY. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

ERB. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

A SON OF THE STATE. Second Edition. Cr. 8vo. 3s. 6d. Also Medium 8vo. 6d.

A BREAKER OF LAWS. A New Edition. Cr. 8vo. 3s. 6d.

MRS. GALER'S BUSINESS. Illustrated. Second Edition. Cr. 8vo. 6s.

THE WICKHAMSES. Fourth Edition. Cr. 8vo. 6s.

NAME OF GARLAND. Third Edition. Cr. 8vo. 6s.

SPLENDID BROTHER. Third Edition. Cr. 8vo. 6s.

GEORGE and THE GENERAL. Medium 8vo. 6d.

Ritchie (Mrs. David G.). MAN AND THE CASSOCK. Second Edition. Cr. 8vo. 6s.

Roberts (C. G. D.). THE HEART OF THE ANCIENT WOOD. Cr. 8vo. 3s. 6d.

Robins (Elizabeth). THE CONVERT. Third Edition. Cr. 8vo. 6s.

Rosenkrantz (Baron Palle). THE MAGISTRATE'S OWN CASE. Cr. 8vo. 6s.

Russell (W. Clark). MY DANISH SWEETHEART. Illustrated. Fifth Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

HIS ISLAND PRINCESS. Illustrated. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

ABANDONED. Second Edition. Cr. 8vo. 6s.

Also Medium 8vo. 6d.

MASTER ROCKAFELLAR'S VOYAGE. Illustrated by GORDON BROWNE. Fourth Edition. Cr. 8vo. 3s. 6d.

A MARRIAGE AT SEA. Medium 8vo. 6d.

Ryan (Marah Ellis). FOR THE SOUL OF RAFAEL. Cr. 8vo. 6s.

Sandys (Sydney). JACK CARSTAIRS OF THE POWER HOUSE. With 4 Illustrations by STANLEY L. WOOD. Cr. 8vo. 6s.

Sergeant (Adeline). THE PASSION OF PAUL MARILLIER. Crown 8vo. 6s.

THE QUEST OF GEOFFREY DARRELL. Cr. 8vo. 6s.

THE COMING OF THE RANDOLPHS. Cr. 8vo. 6s.

THE PROGRESS OF RACHAEL. Cr. 8vo. 6s.

BARBARA'S MONEY. Medium 8vo. 6d.

THE MASTER OF BEECHWOOD. Medium 8vo. 6d.

THE YELLOW DIAMOND. Second Ed. Cr. 8vo. 6s. Also Medium 8vo. 6d.

THE LOVE THAT OVERCAME. Medium 8vo. 6d.

Shelley (Bertha). ENDERBY. Third Ed. Cr. 8vo. 6s.

Sidgwick (Mrs. Alfred). THE KINSMAN. With 8 Illustrations by C. E. BROCK. Third Edition. Cr. 8vo. 6s.

THE SEVERINS. Second Ed. Cr. 8vo. 6s.

Smith (Dorothy V. Horace). MISS MONA. Cr. 8vo. 3s. 6d.

Sonnichsen (Albert). DEEP-SEA VAGABONDS. Cr. 8vo. 6s.

Stewart (Newton V.). A SON OF THE EMPEROR: BEING PASSAGES FROM THE LIFE OF ENZIO, KING OF SARDINIA AND CORSICA. Cr. 8vo. 6s.

Sunbury (George). THE HA'PENNY MILLIONAIRE. Cr. 8vo. 3s. 6d.

Surtees (R. S.). HANDLEY CROSS. Illustrated. Medium 8vo. 6d.

MR. SPONGE'S SPORTING TOUR. Illustrated. Medium 8vo. 6d.

ASK MAMMA. Illus. Medium 8vo. 6d.

Swayne (Martin Lutrell). THE BISHOP AND THE LADY. Second Edition. Cr. 8vo. 6s.

Thurston (E. Temple). MIRAGE. Fourth Edition. Cr. 8vo. 6s.

Underhill (Evelyn). THE COLUMN OF DUST. Cr. 8vo. 6s.

Urquhart (M.). A TRAGEDY IN COMMONPLACE. Second Ed. Cr. 8vo. 6s.

Vorst (Marie Van). THE SENTIMENTAL ADVENTURES OF JIMMY BULSTRODE. Cr. 8vo. 6s.

IN AMBUSH. Second Ed. Cr. 8vo. 6s.

Waineman (Paul). THE BAY OF LILACS: A Romance from Finland. Second Edition. Cr. 8vo. 6s.

THE SONG OF THE FOREST. Cr. 8vo. 6s.

Walford (Mrs. L. B.). MR SMITH. Medium 8vo. 6d.

THE BABY'S GRANDMOTHER. Medium 8vo. 6d.

COUSINS. Medium 8vo. 6d.

TROUBLESOME DAUGHTERS. Medium 8vo. 6d.

Wallace (General Lew). BEN-HUR. Medium 8vo. 6d.

THE FAIR GOD. Medium 8vo. 6d.

Waltz (Elizabeth C.). THE ANCIENT LANDMARK: A KENTUCKY ROMANCE. Cr. 8vo. 6s.

Watson (H. B. Marriott). TWISTED EGLANTINE. Illustrated. Third Edition. Cr. 8vo. 6s.

THE HIGH TOBY: Being further Chapters in the Life and Fortunes of Dick Ryder, otherwise Galloping Dick. With a Frontispiece. Third Edition. Cr. 8vo. 6s.

A MIDSUMMER DAY'S DREAM. Third Edition. Crown 8vo. 6s.

THE PRIVATEERS. Illustrated. Second Edition. Cr. 8vo. 6s.

A POPPY SHOW: BEING DIVERS AND DIVERSE TALES. Cr. 8vo. 6s.

THE FLOWER OF THE HEART. Third Edition. Cr. 8vo. 6s.

THE CASTLE BY THE SEA. Third Edition. Cr. 8vo. 6s.

THE ADVENTURERS. Medium 8vo. 6d.

Webling (Peggy). THE STORY OF VIRGINIA PERFECT. Third Edition. Cr. 8vo. 6s.

Weekes (A. B.). THE PRISONERS OF WAR. Medium 8vo. 6d.

Wells (H. G.). THE SEA LADY. Cr. 8vo. 6s. Also Medium 8vo. 6d.

Weyman (Stanley). UNDER THE RED ROBE. With Illustrations by R. C. WOODVILLE. Twenty-Second Ed. Cr. 8vo. 6s.

Whitby (Beatrice). THE RESULT OF AN ACCIDENT. Second Edition. Cr. 8vo. 6s.

White (Percy). THE SYSTEM. Third Edition. Cr. 8vo. 6s.

A PASSIONATE PILGRIM. Medium 8vo. 6d.

LOVE AND THE WISE MEN. Second Edition. Cr. 8vo. 6s.

Williams (Margery). THE BAR. Cr. 8vo. 6s.

Williamson (Mrs. C. N.). THE ADVENTURE OF PRINCESS SYLVIA. Second Edition. Cr. 8vo. 6s.

THE WOMAN WHO DARED. Cr. 8vo. 6s.

THE SEA COULD TELL. Second Edition. Cr. 8vo. 6s.

THE CASTLE OF THE SHADOWS. Third Edition. Cr. 8vo. 6s.

PAPA. Cr. 8vo. 6s.

Williamson (C. N. and A. M.). THE LIGHTNING CONDUCTOR: The Strange Adventures of a Motor Car. With 16 Illustrations. Seventeenth Edition. Cr. 8vo. 6s. Also Cr. 8vo. 1s. net.

THE PRINCESS PASSES: A Romance of a Motor. With 16 Illustrations. Ninth Edition. Cr. 8vo. 6s.

MY FRIEND THE CHAUFFEUR. With 16 Illustrations. Tenth Edit. Cr. 8vo. 6s.

LADY BETTY ACROSS THE WATER. Tenth Edition. Cr. 8vo. 6s.

THE CAR OF DESTINY AND ITS ERRAND IN SPAIN. With 17 Illustrations. Fourth Edition. Cr. 8vo. 6s.

THE BOTOR CHAPERON. With a Frontispiece in Colour by A. H. BUCKLAND, 16 other Illustrations, and a Map. Fifth Edition. Cr. 8vo. 6s.

SCARLET RUNNER. With a Frontispiece in Colour by A. H. BUCKLAND, and 8 other Illustrations. Third Ed. Cr. 8vo. 6s.

SET IN SILVER. With a Frontispiece. Second Edition. Cr. 8vo. 6s.

Wyllarde (Dolf). THE PATHWAY OF THE PIONEER (Nous Autres). Fourth Edition. Cr. 8vo. 6s.

Yeldham (C. C.). DURHAM'S FARM. Cr. 8vo. 6s.

Books for Boys and Girls

Illustrated. Crown 8vo. 3s. 6d.

THE GETTING WELL OF DOROTHY. By Mrs. W. K. Clifford. Second Edition.

ONLY A GUARD-ROOM DOG. By Edith E. Cuthell.

MASTER ROCKAFELLAR'S VOYAGE. By W. Clark Russell. Fourth Edition.

SYD BELTON: Or, the Boy who would not go to Sea. By G. Manville Fenn. Second Ed.

THE RED GRANGE. By Mrs. Molesworth.

A GIRL OF THE PEOPLE. By L. T. Meade. Fourth Edition.

HEPSY GIPSY. By L. T. Meade. 2s. 6d.

THE HONOURABLE MISS. By L. T. Meade. Second Edition.

THERE WAS ONCE A PRINCE. By Mrs. M. E. Mann.

WHEN ARNOLD COMES HOME. By Mrs. M. E. Mann.

The Novels of Alexandre Dumas

Medium 8vo. Price 6d. Double Volumes, 1s.

ACTÉ.

THE ADVENTURES OF CAPTAIN PAMPHILE.

AMAURY.

THE BIRD OF FATE.

THE BLACK TULIP.

THE CASTLE OF EPPSTEIN.

CATHERINE BLUM.

CECILE.

THE CHEVALIER D'HARMENTAL. (Double volume.) 1s.

CHICOT THE JESTER.

CONSCIENCE.

THE CONVICT'S SON.

THE CORSICAN BROTHERS; and OTHO THE ARCHER.

CROP-EARED JACQUOT.

DOM GORENFLOT.

THE FATAL COMBAT.

THE FENCING MASTER.

FERNANDE.

GABRIEL LAMBERT.

GEORGES.

THE GREAT MASSACRE.

HENRI DE NAVARRE.

HÉLÈNE DE CHAVERNY.

THE HOROSCOPE.

LOUISE DE LA VALLIÈRE. (Double volume.) 1s.

THE MAN IN THE IRON MASK. (Double volume.) 1s.

MAÎTRE ADAM.

THE MOUTH OF HELL.

NANON. (Double volume.) 1s.

PAULINE; PASCAL BRUNO; and BONTEKOE.

PÈRE LA RUINE.

THE PRINCE OF THIEVES.

THE REMINISCENCES OF ANTONY.

ROBIN HOOD.

THE SNOWBALL AND SULTANETTA.

SYLVANDIRE.

TALES OF THE SUPERNATURAL.

TALES OF STRANGE ADVENTURE.

THE THREE MUSKETEERS. (Double volume.) 1s.

THE TRAGEDY OF NANTES.

TWENTY YEARS AFTER. (Double volume.) 1s.

THE WILD-DUCK SHOOTER.

THE WOLF-LEADER.

Methuen's Sixpenny Books

Medium 8vo.

Albanesi (E. Maria). LOVE AND LOUISA.

I KNOW A MAIDEN.

Anstey (F.). A BAYARD OF BENGAL.

Austen (J.). PRIDE AND PREJUDICE.

Bagot (Richard). A ROMAN MYSTERY.

CASTING OF NETS.

DONNA DIANA.

Balfour (Andrew). BY STROKE OF SWORD.

Baring-Gould (S.). FURZE BLOOM.

CHEAP JACK ZITA.

KITTY ALONE.

URITH.

THE BROOM SQUIRE.

IN THE ROAR OF THE SEA.

NOÉMI.

A BOOK OF FAIRY TALES. Illustrated.

LITTLE TU'PENNY.

WINEFRED.

THE FROBISHERS.

THE QUEEN OF LOVE.

ARMINELL.

Barr (Robert). JENNIE BAXTER.

IN THE MIDST OF ALARMS.

THE COUNTESS TEKLA.

THE MUTABLE MANY.

Benson (E. F.). DODO.

THE VINTAGE.

Brontë (Charlotte). SHIRLEY.

Brownell (C. L.). THE HEART OF JAPAN.

Burton (J. Bloundelle). ACROSS THE SALT SEAS.

Caffyn (Mrs.). ANNE MAULEVERER.

Capes (Bernard). THE LAKE OF WINE.

Clifford (Mrs. W. K.). A FLASH OF SUMMER.

MRS. KEITH'S CRIME.

Corbett (Julian). A BUSINESS IN GREAT WATERS.

Croker (Mrs. B. M.). ANGEL.

A STATE SECRET.

PEGGY OF THE BARTONS.

JOHANNA.

Dante (Alighieri). THE DIVINE COMEDY (Cary).

Doyle (A. Conan). ROUND THE RED LAMP.

Duncan (Sara Jeannette). A VOYAGE OF CONSOLATION.

THOSE DELIGHTFUL AMERICANS.

Eliot (George). THE MILL ON THE FLOSS.

Findlater (Jane H.). THE GREEN GRAVES OF BALGOWRIE.

Gallon (Tom). RICKERBY'S FOLLY.

Gaskell (Mrs.). CRANFORD.

MARY BARTON.

NORTH AND SOUTH.

Gerard (Dorothea). HOLY MATRIMONY.

THE CONQUEST OF LONDON.

MADE OF MONEY.

Gissing (G.). THE TOWN TRAVELLER.

THE CROWN OF LIFE.

Glanville (Ernest). THE INCA'S TREASURE.

THE KLOOF BRIDE.

Gleig (Charles). BUNTER'S CRUISE.

Grimm (The Brothers). GRIMM'S FAIRY TALES.

Hope (Anthony). A MAN OF MARK.

A CHANGE OF AIR.

THE CHRONICLES OF COUNT ANTONIO.

PHROSO.

THE DOLLY DIALOGUES.

Hornung (E. W.). DEAD MEN TELL NO TALES.

Ingraham (J. H.). THE THRONE OF DAVID.

Le Queux (W.). THE HUNCHBACK OF WESTMINSTER.

Levett-Yeats (S. K.). THE TRAITOR'S WAY.

ORRAIN.

Linton (E. Lynn). THE TRUE HISTORY OF JOSHUA DAVIDSON.

Lyall (Edna). DERRICK VAUGHAN.

Malet (Lucas). THE CARISSIMA.

A COUNSEL OF PERFECTION.

Mann (Mrs. M. E.). MRS. PETER HOWARD.

A LOST ESTATE.

THE CEDAR STAR.

ONE ANOTHER'S BURDENS.

THE PATTEN EXPERIMENT.

A WINTER'S TALE.

Marchmont (A. W.). MISER HOADLEY'S SECRET.

A MOMENT'S ERROR.

Marryat (Captain). PETER SIMPLE.

JACOB FAITHFUL.

Marsh (Richard). A METAMORPHOSIS.

THE TWICKENHAM PEERAGE.

THE GODDESS.

THE JOSS.

Mason (A. E. W.). CLEMENTINA.

Mathers (Helen). HONEY.

GRIFF OF GRIFFITHSCOURT.

SAM'S SWEETHEART.

Meade (Mrs. L. T.). DRIFT.

Miller (Esther). LIVING LIES.

Mitford (Bertram). THE SIGN OF THE SPIDER.

Montresor (F. F.). THE ALIEN.

Morrison (Arthur). THE HOLE IN THE WALL.

Nesbit (E.). THE RED HOUSE.

Norris (W. E.). HIS GRACE.

GILES INGILBY.

THE CREDIT OF THE COUNTY.

LORD LEONARD THE LUCKLESS.

MATTHEW AUSTIN.

CLARISSA FURIOSA.

Oliphant (Mrs.). THE LADY'S WALK.

SIR ROBERT'S FORTUNE.

THE PRODIGALS.

THE TWO MARYS.

Oppenheim (E. P.). MASTER OF MEN.

Parker (Gilbert). THE POMP OF THE LAVILETTES.

WHEN VALMOND CAME TO PONTIAC.

THE TRAIL OF THE SWORD.

Pemberton (Max). THE FOOTSTEPS OF A THRONE.

I CROWN THEE KING.

Phillpotts (Eden). THE HUMAN BOY.

CHILDREN OF THE MIST.

THE POACHER'S WIFE.

THE RIVER.

'Q' (A. T. Quiller Couch). THE WHITE WOLF.

Ridge (W. Pett). A SON OF THE STATE.

LOST PROPERTY.

GEORGE and THE GENERAL.

ERB.

Russell (W. Clark). ABANDONED.

A MARRIAGE AT SEA.

MY DANISH SWEETHEART.

HIS ISLAND PRINCESS.

Sergeant (Adeline). THE MASTER OF BEECHWOOD.

BARBARA'S MONEY.

THE YELLOW DIAMOND.

THE LOVE THAT OVERCAME.

Sidgwick (Mrs. Alfred). THE KINSMAN.

Surtees (R. S.). HANDLEY CROSS.

MR. SPONGE'S SPORTING TOUR.

ASK MAMMA.

Walford (Mrs. L. B.). MR. SMITH.

COUSINS.

THE BABY'S GRANDMOTHER.

TROUBLESOME DAUGHTERS.

Wallace (General Lew). BEN-HUR.

THE FAIR GOD.

Watson (H. B. Marriott). THE ADVENTURERS.

Weekes (A. B.). PRISONERS OF WAR.

Wells (H. G.). THE SEA LADY.

White (Percy). A PASSIONATE PILGRIM.

Transcriber's Notes

Made minor punctuation corrections and the following changes:

Page 2: Changed Illustratious to Illustrations.

Originally: Ady (Cecilia M.).... With 20 Illustratious and a Map.

Page 6: Spaced out the OE ligature in ARA COELI.

Page 8: Changed Illustratrations to Illustrations.

Originally: D'Este (Margaret).... With 50 Illustratrations,

Page 10: Changed Aubrev to Aubrey.

Originally: Gordon (Lina Duff) ... Illustrations by Aubrev Waterfield

Page 13: Changed 91th to 91st.

Originally: Kipling (Rudyard). BARRACK-ROOM BALLADS. 91th Thousand.

Page 15: Changed MacFie to Macfie.

Originally: MacFie (Ronald C.) ... See New Library of Medicine.

Page 15: Changed Teixera to Teixeira.

Originally: BLUE BIRD ... Translated by Alexander Teixera de Mattos.

Page 16: Changed Text to Texts for consistency.

Originally: Musset (Alfred de). See Simplified French Text.

Page 23: Changed Photogtavure to Photogravure.

Originally: A ROSE OF SAVOY: ... Frontispiece in Photogtavure and 16

Page 25: Changed Abbott to Abbot.

Originally: Parish Life ... By the Right Rev. Abbott Gasquet, O.S.B.

Page 27: Changed Rennaisance to Renaissance.

Originally: Florentine Sculptors of the Rennaisance.

Page 30: Changed Englise to English.

Originally: Englise Literature for Schools. By Edith E. Firth.

Page 37: Changed Genesls to Genesis.

Originally: in the Seventh Edition of the Book of Genesls

*** END OF THE PROJECT GUTENBERG EBOOK A CATALOGUE OF BOOKS PUBLISHED BY METHUEN AND CO., OCTOBER 1909 ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

A CATALOGUE OF BOOKS PUBLISHED BY METHUEN AND COMPANY: LONDON 36 ESSEX STREET W.C.

CONTENTS

A CATALOGUE OF Messrs. Methuen's PUBLICATIONS

Part I.—General Literature

Ancient Cities

The Antiquary's Books

The Arden Shakespeare

The Beginner's Books

Books on Business

Byzantine Texts

The Churchman's Bible

The Churchman's Library

Classical Translations

Classics of Art

Commercial Series

The Connoisseur's Library

Handbooks of English Church History

The Illustrated Pocket Library of Plain and Coloured Books

COLOURED BOOKS

PLAIN BOOKS

Junior Examination Series

Methuen's Junior School-Books

Leaders of Religion

The Library of Devotion

Little Books on Art

The Little Galleries

The Little Guides

The Little Library

The Little Quarto Shakespeare

Miniature Library

A New Historical Series

The New Library of Medicine

The New Library of Music

Oxford Biographies

Romantic History

School Examination Series

School Histories

Simplified French Texts

Simplified German Texts

Six Ages of European History

Methuen's Standard Library

Textbooks of Science

Textbooks of Technology

Handbooks of Theology

The Westminster Commentaries

Part II.—Fiction

Books for Boys and Girls

The Novels of Alexandre Dumas

Methuen's Sixpenny Books

Transcriber's Notes

THE FULL PROJECT GUTENBERG LICENSE